CGA
 45           -93            138.53        5 
 6.707317 ,   Hor,           0 
 9.146341 ,   Vert,          2 
 9.146341 ,   Vert,          2 
 16.76829 ,   Hor,           6 
 9.146341 ,   Vert,          2 
 16.76829 ,   Hor,           6 
 9.146341 ,   Vert,          2 
 16.76829 ,   Hor,           6 
 9.146341 ,   Vert,          2 
 9.146341 ,   Vert,          2 
 9.146341 ,   Vert,          2 
 9.146341 ,   Vert,          2 
 9.146341 ,   Vert,          2 
 9.146341 ,   Vert,          2 
 9.146341 ,   Vert,          2 
 9.146341 ,   Vert,          2 
 600 ,         3 
