 ---------------------------------------------------------------------------- 
 C H D I R  COMMAND                                                           
 ---------------------------------------------------------------------------- 
                                                                              
 Purpose: Changes the DOS current directory of the current drive to a new     
          directory or displays the current directory path of a drive.        
                                                                              
 Format:  CHDIR[\path]  or  CD[\path]                                         
                                                                              
 Remarks: [\path]  if specified will change the current directory path to the 
          new directory path specified.                                       
                                                                              
          Type CHDIR or CD with no parameters to display the current direc-   
          tory path of the current drive.                                     
                                                                              
          DOS looks in the current directory to find files whose names are    
          entered without specifying a path.  If you do not specify a drive   
          and/or path, the current drive/path is assumed.  Changing the cur-  
          rent directory allows you to find files in different directories.   
                                                                              
                                                                              
 Example: CD\  changes from the current directory to the root directory.      
                                                                              
          CD\PROGRAMS changes from the current directory to the \PROGRAMS     
          subdirectory.                                                       
