 ---------------------------------------------------------------------------- 
 D A T E  COMMAND                                                             
 ---------------------------------------------------------------------------- 
                                                                              
 Purpose: Use to enter or change the date known to DOS.  The date is recorded 
          in the directory when you create or change a file and is recognized 
          by most software programs.                                          
                                                                              
 Format:  DATE                                                                
                                                                              
 Remarks: After entering the DATE command at the DOS prompt, the following    
          appears:  Current date is  10-15-1988                               
                    Enter new date (mm-dd-yy):_                               
                                                                              
          At this point you may either enter a new date or press the <Enter>  
          key to cancel the command.                                          
