 ---------------------------------------------------------------------------- 
 T I M E  COMMAND                                                             
 ---------------------------------------------------------------------------- 
                                                                              
 Purpose: Use to enter or change the time known to DOS.  The time is recorded 
          in the directory when you create or change a file and is recognized 
          by most software programs.                                          
                                                                              
 Format:  TIME                                                                
                                                                              
 Remarks: After entering the TIME command at the DOS prompt, the following    
          appears:  Current time is 10:45:30                                  
                    Enter new time: _                                         
                                                                              
          At this point, you can either enter a new time or press the <Enter> 
          key to cancel the command.  Enter the new time in a military time   
          format.                                                             
