

                          AUTOMAXX INSTALLATION

    AUTOMAXX is a powerful fixed disk manager.  To install the software

    you must first make the hard disk directory onto which AUTOMAXX is
    to be installed the current directory, then you log onto drive A

    and type


		'INSTALL' for installation to drive C

   For installation to a subdirectory or the root directory of another
   drive please refer to the section on parameters in the documentation.

   Press control-break keys now if you do not wish to continue, or ...



