                                 CONVERSIONS               HEP10.HLP

    Use the up and down cursor keys to move the highlight to conversions in
    the same column.  Use the left and right cursor keys to change columns.

    The "Home" key and  the "End" key will take the  highlight to the upper
    left  or  the  lower  right  position  on  the  page  being  displayed.
    "Ctrl+Home", holding the  "Ctrl" key down and pressing  the "Home" key,
    will  take  the  highlight  to  the   first  conversion  on  page  one.
    "Ctrl+End" will take  the highlight to the last conversion  on the last
    page.

    The "PgUp" key causes the previous page to be displayed.  "PgDn" causes
    the next  page to  be displayed. "Ctrl+PgUp"  and "Ctrl+PgDn"  causes a
    page to be skipped.

    Once you have selected  the units to be converted, key  in the value of
    the first  unit and  press "Enter".  The input  values may  be numbers,
    variables or  expressions and you  may use  the cursor keys,  "Ins" and
    "Del" to edit  your input data. (See help screens  to Calculator.)  The
    converted value  is left  in the  Accumulator and  may be  used in  any
    routine requiring values to be input by using the variable name "ACC".



