                     The TYPE-SET-IT Trial disk

This trial disk was designed to provide you with enough information to make a
sound business decision on purchasing the complete program. There are three
key points needed for this decision. The trial disk helps you to:

   1. ... determine if it will work on your present computer equipment.

   2. ... determine the percentage of your work that can be produced
          with Type-Set-It.

   3. ... experience the advantage of having copy appear on your screen
          in the actual size and style ... at typing speed.

The programs require 512K of memory, a graphics adaptor and a dot-matrix
printer compatible with IBM or Epson. If you have both color and Hercules
graphics, use the Hercules graphics with a monochrome monitor for best results.

If need more information about the operation or the capability of the program,
please give us a call. Our number in Massachusetts is (617) 475-7238.
We normally provide instructional and technical support 11 hours a day,
8:00 am to 7:00 Pm EST.


The trial program includes all the placement, editing and productivity
capabilities.  If you don't have the complete instruction manual, don't expect
to experience all of them. Do feel free to call us for more instructions on
any features that you need to try to determine suitability for your use.

The only two files required to produce new work are:

     TSETIT.EXE   FACES.TSF

The following test files show a few of the capabilities of Type-Set-It.

     TEMP.TSI    Default temporary file name. Initially contains TEST.TSI
     TEST.TSI    "This is not ..." sample
     TEST1.TSI   Medium size sample of default faces in upright and italic.
     TEST2.TSI   All characters in default type faces
     TEST3.TSI   One character, in one size in 91 variations
     TEST4.TSI   One line of text in various faces, and small sizes
     TEST5.TSI   "Gardening Shop Flyer" sample
     TEST6.TSI   Newsletter Masthead
     TEST9.TSI   96 sizes of the letter "A"

The rest of the files ending in .TSI are for use with the tutorial.

Other helpful files included on the disk are:

     HELP2       Prints a help file on importing word processor text files.

     TSI.TXT     A sample ASCII text file for import. This example file 
                 also contains instructions and a listing of word
                 processor coding that may be used.

     MEM.COM     This program shows the amount of memory available in your
                 system. At the Dos prompt type MEM. Should be over 475,000.

     WHATCARD.EXE Tests and reports on presence of video graphics cards.

     PRN-TEST.EXE  Prints a graphics compatibility test of your printer.

     SWAPLPTS.COM  Swaps lineprinters. If your dot-matrix printer is
                 connected to LPT2, run SWAPLPTS before using Type-Set-It.

To view a demo, set up your printer and type DEMO <ENTER> and sit back.

To use the program, type TSETIT <ENTER> and "do-it-yourself".


Enjoy
