                        ANSI Screen Viewer Door
                        Written by Chuck Valecek
                           Suburban Software

    This door will allow you to view ANSI Graphic screens. If the sysop has
elected to divide the screens into categories then a screen will appear showing
you the categories that have been defined.

Select the category by entering the number of the category. The next screen
that will be displayed is a list of all the screens that are available.If there
are more than 76 screens then pressing RETURN will display the remaining screens
    To select a screen or screens to view enter the number(s) of the scrrens
and they will be displayed to you in the order entered.

    Pressing any key will display the next screen you selected or return you
to the menu or display the next screen that you selected.

    You may enter multiple screen numbers like this: 1;2;3;4;5;6 or 1 2 3 4 5 6
Either seperate the screen numbers with a semi-colon or a space.

    You may enter a F to filter out from the display the screens that have been
viewed during this session. If you return to the category menu then the screens
that you viewed will be reset and will appear back on the screen,

    At the prompt you may enter a Q to quit the display and return you to the
Category screen or at the Category screen a Q will return you back to the BBS.


                 Thank you for trying ANSI Screen Viewer!
