NAME        T1FONT   WINDOWCOMPAT NEWFILES
DESCRIPTION ' pfm2afm - Convert Windows pfm to afm (C) Copyright IBM Corp. 1991 - Ken Borgendale'
DATA        MULTIPLE
STACKSIZE   4096
HEAPSIZE    1024
