Message Text
============

     Type the message you want scrolled and press [ENTER]; the message 
must be no longer than the message box provided.

     To remove MQE from memory, type "MQE" at the command prompt and
press [ENTER].  You must be in MQE's directory when you do this, or the
MQE directory must be in the PATH statement.
: