Display Icon Boxes

The Display Icon Boxes are the 60 white boxes on the right
of your screen, this is were all Icons will be displayed as I
just mentioned you can only display 60 at any one time.  If
more then 60 Icons are in the directory use the Scroll Bar
under the Display Boxes to view additional Icons.

To delete Icons from the directory click (ONLY ONCE) on the
Icon Display Box you wish to remove and the box will reverse
to show the Icon was selected, also note the filename of the
Icon will be displayed in the second File List Box.

If you make a mistake and decide to keep one of the Icons you
have selected, double click on the file name you wish to
remove from the second File List Box, the file name will be
removed from the second File List Box and the Icon Display
box will reverse the Icon back to its original state.

TIP:  When you click the Icon Display Box the second button
on the bottom of the screen will change to CANCEL.  If the
cancel button is pressed the Second File List Box is removed
and the Icons are reset to there original state.  None of the
Icons will be deleted.