Form G/V10-0793
VAL-COMP.HLP

Ada Information Clearinghouse, 1-800-AdaIC-11, 1-703-685-1477

                   Ada VALIDATED COMPILERS LIST - 1 July 1993

     The following are Ada compilers that have been validated by the Ada Joint
Program Office (AJPO).  Compilers are listed in order of vendor.  The list is
updated monthly, and presently includes 317 base compilers and 306 compilers
derived from base implementations.  For the most current information on
validated Ada compilers, please contact the Ada Information Clearinghouse at
(703) 685-1477.

For background information, please see "An Introduction to the Validation
Process", which follows at the end of the compiler list.

(Key:  * = Validated through Registration, base system above)
(Key:  (#YYMMDDFX.XXNNN):  YYMMDD is the date on-site testing was completed;
                       F is the Ada Validation Facility; 
                       X.XX is the ACVC Version;
                       NNN is a unique sequence number that is assigned by 
                       the AVO)

For example, the certificate number #901120W1.11087 means the compiler
completed on-site testing November 20, 1990, at Wright-Patterson AFB under ACVC
1.11.  

On April 14, 1992, the AJPO announced it was "freezing" the Ada Compiler
Validation Capability (ACVC) on version 1.11.  Current ACVC 1.11 certificates
will expire two years after Ada 9X has been adopted by ANSI.  The ACVC version
1.11 will expire one year before certificates (i.e., 12 months after ANSI Ada
9X adoption) as has been the practice.  This extended life for ACVC 1.11 means
that there will be an overlap period between ACVC 1.11 (for ANSI/MIL-STD-1815A
validations) and ACVC 2.0 (for ANSI/MIL-STD-1815B validations).

*******************************************************************************
                   Ada VALIDATED COMPILERS LIST--1 July 1993
*******************************************************************************
Vendor &            HOST                           TARGET
Compiler            Machine                        Machine
===============================================================================
AETECH, Inc.        Northgate 386/25 (under        Northgate 386/25 (under MS
IntegrAda 386       Phar Lap/DOS 3.3)              DOS 3.3)
5.1.0
(#901120W1.11087)

*Validated by Registration
AETECH, Inc.        Any Computer System            Any Computer System
IntegrAda 386       Comprising:  cpu: Intel        Comprising:  cpu: Intel
5.1.0               80386, fpu: optional,          80386, fpu: optional,
(BASE               memory: 4 MByte RAM, disk:     memory: 4 MByte RAM, disk:
#901120W1.11087)    40 MByte hard drive (under     40 MByte hard drive (under
                    Phar Lap/DOS 3.3)              MS DOS 3.3)

AETECH, Inc.        Unisys PW/2 386 (under SCO     Same as Host
IntegrAda 5.1.0     Unix 3.2)
POSIX
(#901129W1.11086)

*Validated by Registration
AETECH, Inc.        Any Computer System            Same as Host
IntegrAda Posix     Comprising:  cpu: Intel
5.1.0               80386, fpu: optional,
(BASE               memory: 4 MByte RAM, disk:
#901129W1.11086)    60 MByte hard drive (under
                    SCO Unix 3.2)

*Validated by Registration
AETECH, Inc.        Any Computer System            Same as Host
AETECH POSIX        Comprising: cpu:  Intel
Compiler, Version   80386 & 80486, fpu: 
5.1.0               optional, memory:  4 MByte
(BASE               RAM, disk:  60 MByte hard
#901129W1.11086)    drive (under Interactive
                    Unix System V, Release 3.2)

*Validated by Registration
AETECH, Inc.        Any Computer System            Same as Host
AETECH POSIX        Comprising: cpu:  Intel
Compiler Version    80386 & 80486; fpu: 
5.1.0               optional; memory:  4 MByte
(BASE               RAM; disk:  60 MByte hard
#901129W1.11086)    drive (under ESIX System V,
                    Release 4.0)

Aitech Defense      VAXstation 3100 Cluster        Tadpole TP880V (88100-based
Systems, Inc.       (under VMS 5.3)                VME board) (bare machine)
AI-ADA/88K
Version 2.4
(#900930W1.11030)

*Validated by Registration
Aitech Defense      All DEC MicroVAX,              Tadpole TP880V (88100-based
Systems, Inc.       VAXstation, VAXserver,         VME board) & Motorola
AI-ADA/88K,         VAX-11, VAX 8xxx & VAX 6xxx    MVME181 (88100-based VME
Version 2.4         series (under VMS versions     board) (bare machines)
(BASE               5.0, 5.1, 5.2 & 5.3, as
#900930W1.11030)    supported)

Aitech Defense      VAXstation 3100 Cluster        DSP96002 ADS board (bare
Systems, Inc.       (under VMS 5.3)                machine)
AI-ADA/96K,
Version 3.0
(#911012W1.11224)

Aitech Defense      Sun-4/330 (under SunOS         DSP96002 ADS board (bare
Systems, Inc.       4.1.1)                         machine)
AI-ADA/96K,
Version 3.0
(#911012W1.11225)

Alenia Aeritalia    MicroVAX 4000/200 (under       Alenia MARA (80286-based)
& Selenia S.p.A     VMS Version 5.4)               (under Alenia Operating
DACS VAX/VMS to                                    System, Version 8.6 System)
80x86 PM MARA Ada
Cross Compiler,
Version 4.6
(#920509S1.11259)

*Validated by Registration
Alenia Aeritalia    DEC VAX-11, VAXserver,         Alenia MARA 80386- &
& Selenia S.p.A     VAXstation, MicroVAX, VAX      80486-based computers (under
DACS 80x86PM,       4000, VAX 6000, VAX 8000, &    Alenia Operating System 8.6)
Version 4.60        VAX 9000 Series of
(BASE               computers (under VMS 5.4)
#920509S1.11259)

Alliant Computer    Alliant FX/2800 (under         Same as Host
Systems             Concentrix Release 2.0)
Corporation
Alliant
FX/Ada-2800
Compiler, Version
1.0
(#901218W1.11105)

Alliant Computer    Alliant FX/80 (under           Same as Host
Systems             Concentrix Release 5.7)
Corporation
Alliant FX/Ada
Compiler, Version
2.3
(#901218W1.11106)

Alsys               VAX 8530 (under VMS,           Same as Host
AlsyCOMP_053,       Version 5.1)
Version 1.82
(#900509I1.11009)

Alsys               IBM 9370 Model 90 (under       Same as Host
AlsyCOMP_042,       AIX/370 Version 1.2)
Version 5.3
(#900627N1.11013)

Alsys               Sun-3/60 (under SunOS,         Same as Host
AlsyCOMP_026,       Version 4.0.3)
Version 1.82
(#900814I1.11040)

Alsys               MIPS M/120-5 (under            Same as Host
AlsyCOMP_025,       RISC/os, Version 4.0)
Version 1.83
(#900814I1.11041)

Alsys               Sony NEWS NWS-1850 (under      Same as Host
AlsyCOMP_046,       NEWS-OS 3.3)
Version 5.3
(#901022A1.11043)

*Validated by Registration
Alsys               Sony NEWS series 1250,         Any Host
AlsyCOMP_046,       15xx, 17xx, 18xx & 19xx
Version 5.3         (under NEWS-OS versions 3.3
(BASE               & 3.4)
#901022A1.11043)

Alsys               Apollo DN4000 (under           Same as Host
AlsyCOMP_004,       Domain/OS SR10.2)
Version 5.3
(#901022A1.11044)

*Validated by Registration
Alsys               Apollo DN3000, DN3500,         Any Host
AlsyCOMP_004,       DN4000 & DN4500 (under
Version 5.3         Domain/OS SR10.2 & SR10.3)
(BASE
#901022A1.11044)

*Validated by Registration
Alsys               HP Apollo 9000 Series 400      Any Host
AlsyCOMP_004        (under Domain/OS SR10.4)
Version 5.5.1
(BASE
#901022A1.11044)

Alsys               Bull DPX/2 320 (under          Same as Host
AlsyCOMP_050,       B.O.S. 02.00.05)
Version 5.3
(#901022A1.11045)

*Validated by Registration
Alsys               Bull DPX 2/210, /220, /320,    Any Host
AlsyCOMP_050,       /340 & /360 (under BOS
Version 5.3         02.00.05 & 2.00.10)
(BASE
#901022A1.11045)

Alsys               HP 9000s350 (under HP-UX       Same as Host
AlsyCOMP_002,       6.5)
Version 5.3
(#901022A1.11046)

*Validated by Registration
Alsys               HP 9000 Series 300, all        Any Host
AlsyCOMP_002,       models (under HP-UX 6.5 &
Version 5.3         7.0)
(BASE
#901022A1.11046)

*Validated by Registration
Alsys               HP 9000 Series 300 & 400       Any Host
AlsyCOMP_002        (all models) (under HP-UX
Version 5.5.1       8.0)
(BASE
#901022A1.11046)

Alsys               Sun-3/260 (under SunOS 3.2)    Same as Host
AlsyCOMP_005,
Version 5.3
(#901022A1.11047)

*Validated by Registration
Alsys               Sun 3/50, /60, /75, /80,       Any Host
AlsyCOMP_005,       /160, /260, /280, /470 &
Version 5.3         /480 (under SunOS 3.2, 3.5,
(BASE               4.0 & 4.1)
#901022A1.11047)

*Validated by Registration
Alsys               Sun Microsystems Sun-3         Any Host
AlsyCOMP_005        computer family (under
Version 5.5.1       SunOS 4.1.1)
(BASE
#901022A1.11047)

Alsys               CETIA Unigraph 6000 (under     Same as Host
AlsyCOMP_035,       Unigraph/X 3.1)
Version 5.3
(#901022A1.11048)

*Validated by Registration
Alsys               Unigraph 1000/325, 2000/50,    Any Host
AlsyCOMP_035,       2000/250, 2000/325,
Version 5.3         3000/325-333, 6000/325-333,
(BASE               7000/325, 8000/325 & 9000
#901022A1.11048)    (under Unigraph/X 3.1 &
                    3.1.1)

*Validated by Registration
Alsys               CETIA Unigraph models          Any Host
AlsyCOMP_035        1000/325; 2000/50, /250,
Version 5.5.1       /325; 3000/325-333;
(BASE               6000/325-333; 7000/325/
#901022A1.11048)    8000/325; & 9000 (under
                    Unigraph/X 3.2c.1)

Alsys               Compaq Deskpro 386 (under      Same as Host
AlsyCOMP_016        MS-DOS 3.30, Phar Lap 2.0)
Version 5.1
(#901102W1.11055)

*Validated by Registration
Alsys               Any Computer System that       Any Host
AlsyCOMP_016        executes the Intel 80386 or
Version 5.1.1       80486 instruction set
(BASE               (under MS/DOS 5.0 & Phar
#901102W1.11055)    Lap 4.0)

Alsys               CompuAdd 320 (under MS-DOS     Same as Host
AlsyCOMP_016        3.30, Phar Lap 2.0)
Version 5.1
(#901102W1.11056)

*Validated by Registration
Alsys               HP Vectra RS/20, RS/20C,       Any Host
AlsyCOMP_016,       RS/25 & RS/25C; AST Premium
Version 5.1         386; and Unisys 386 &
(BASE               Desktop III (under MS-DOS
#901102W1.11056)    3.30, Phar Lap 2.0)

*Validated by Registration
Alsys               Any Computer System            Same as Host
AlsyCOMP_016        Comprising:  cpu: Intel
Version 5.1         80386; fpu: optional;
(BASE               memory: 5 MByte RAM; disk:
#901102W1.11056)    10 MByte (under MS-DOS
                    3.30, Phar Lap 2.0)

Alsys               ALR Power Veisa 486 (under     Same as Host
AlsyCOMP_016        MS-DOS 3.30, Phar Lap 2.0)
Version 5.1
(#901102W1.11057)

Alsys               HP Vectra RS/25C (under        Same as Host
AlsyCOMP_003        MS-DOS 3.30)
Version 5.1
(#901102W1.11058)

*Validated by Registration
Alsys               Unisys Desktop III (under      Same as Host
AlsyCOMP_003,       MS-DOS 3.30)
Version 5.1
(BASE
#901102W1.11058)

*Validated by Registration
Alsys               Any Computer System that       Any Host
AlsyCOMP_003        executes the Intel 80286,
Version 5.1         80386, or 80486 instruction
(BASE               set (under MS/DOS 5.0)
#901102W1.11058)

Alsys               Zenith Z-248 Model 50          Same as Host
AlsyCOMP_003        (under MS-DOS 3.30)
Version 5.1
(#901102W1.11059)

*Validated by Registration
Alsys               ICS SB286SC/12 (under          Same as Host
AlsyCOMP_003,       MS-DOS 3.30)
Version 5.1
(BASE
#901102W1.11059)

*Validated by Registration
Alsys               HP Vectra ES/12; and IBM       Any Host
AlsyCOMP_003,       PC/AT (all models) (under
Version 5.1         MS-DOS 3.30)
(BASE
#901102W1.11059)

Alsys               INMOS T800 transputer on a     INMOS T800 transputer on a
AlsyCOMP_037,       B405 TRAM (bare) with an       B405 TRAM (bare) using an
Version 5.2         INMOS B008 Communications      IBM PC/AT under MS-DOS 3.1
(#901114N1.11065)   link implemented in an IBM     running INMOS Iserver 1.3
                    PC/AT (under MS-DOS 3.1 and    for file-server support via
                    INMOS Iserver V1.3)            an INMOS B008 board link

*Validated by Registration
Alsys               INMOS T800 transputer on a     INMOS T800 transputer on a
AlsyCOMP_037,       B403 TRAM (bare) with an       B405 TRAM (bare) using an
V5.3                INMOS B008 Communications      IBM PC/AT under MS-DOS 3.1
(BASE               link implemented in an IBM     running INMOS Iserver 1.3
#901114N1.11065)    PC/AT (under MS-DOS 3.1 and    for file-server support via
                    INMOS Iserver V1.3)            an INMOS B008 board link;
                                                   INMOS T425 transputer on a
                                                   B403 TRAM (bare) using an
                                                   IBM PC/AT under MS-DOS 3.1
                                                   running INMOS Iserver 1.3
                                                   for file-server support via
                                                   an INMOS B008 board link

*Validated by Registration
Alsys               INMOS T800 transputer on a     INMOS T800 transputer on a
Alsycomp_037        B405 TRAM board (bare),        B405 TRAM (bare), using an
Version 5.4.2       with an INMOS B008             IBM PC/AT under MS-DOS 3.1
(BASE               Communications link            running INMOS Iserver V1.42h
#901114N1.11065)    implemented in an IBM PC/AT    for file-server support via
                    (under MS-DOS 3.1 and INMOS    an INMOS B008 board link and
                    Iserver V1.42h)                INMOS T425 transputer on a
                                                   B403 TRAM (bare), using an
                                                   IBM PC/AT under MS-DOS 3.1
                                                   running INMOS Iserver V1.42h
                                                   for file-server support via
                                                   an INMOS B008 board link

Alsys               HP 9000s350 (under HP-UX       Motorola MVME101 (68000)
AlsyCOMP_012,       6.5)                           (bare machine, using ARTK
Version 5.3                                        Version 5.3)
(#901116A1.11066)

*Validated by Registration
Alsys               HP 9000 Series 300, Models     Motorola MVME101 (68000),
AlsyCOMP_012,       340, 345, 360, 370 & 375       MVME121 (68010), MVME135-1
Version 5.3         (under HP-UX 6.5 & 7.0)        (68020/68881) & MVME147-1
(BASE                                              (68030/68882) (bare
#901116A1.11066)                                   machines, using ARTK 5.3)

*Validated by Registration
Alsys               HP 9000 Series 300 (all        Motorola M68332EVS
AlsyCOMP_012,       models) (under HP-UX 6.5 &     Evaluation System Customers
Version 5.3         7.0)                           (CPU32) (bare machine, using
(BASE                                              ARTK 5.3)
#901116A1.11066)

*Validated by Registration
Alsys               HP 9000 Series 400 (all        Motorola MVME 131, MVME133,
AlsyCOMP_012        models) (under HP-UX 8.0)      MVME133XT, MVME135, &
Version 5.5.1                                      MVME147 (68020 & 68030
(BASE                                              cpu.s) (bare machines, using
#901116A1.11066)                                   VRTX32); Motorola MVME101,
                                                   MVME121, MVME 131, MVME133,
                                                   MVME133XT, MVME135, MVME147,
                                                   & MVME167 (68000, 68010,
                                                   68020, 68030, & 68040 cpu.s)
                                                   (bare machines, using ARTK
                                                   Version 5.5.1)

*Validated by Registration
Alsys               Sun SPARCstation &             Motorola MVME101, MVME121,
AlsyCOMP_048        SPARCserver computer           MVME131, MVME133, MVME133XT,
Version 5.5.1       families; SPARCcenter 2000     MVME135, M68332EVS, MVME147,
(BASE               (under SunOS 4.1.2);           & MVME167 (68000, 68010,
#901116A1.11066)    Solbourne Series 5/100,        68020, 68030, & 68040 cpu.s)
                    /530, /600, /670, /800,        (bare machines, using ARTK
                    5E/900;  & S4000 (under        Version 5.5.1)
                    OS/MP 4.1A.1)

*Validated by Registration
Alsys               HP 9000 Series 700 (all        Motorola MVME101, MVME121,
AlsyCOMP_063        models) (under HP-UX 9.0)      M68332EVS, MVME131, MVME133,
Version 5.5.1                                      MVME133XT, MVME135, MVME147,
(BASE                                              & MVME167 (68000-, 68010-,
#901116A1.11066)                                   68020-, 68030-, &
                                                   68040-based single-board
                                                   computers) (bare machines,
                                                   using ARTK 5.5.1)

Alsys               Apollo DN4000 (under           Motorola MVME147-1
AlsyCOMP_036,       Domain/OS SR10.2)              (68030/68882) (bare machine,
Version 5.3                                        using ARTK Version 5.3)
(#901116A1.11067)

*Validated by Registration
Alsys               Apollo DN 3000, 3500, 4000     Motorola MVME101 (68000),
AlsyCOMP_036,       & 4500 (under Domain/OS        MVME121 (68010), MVME135-1
Version 5.3         SR10.2 & SR10.3)               (68020/68881) & MVME147-1
(BASE                                              (68030/68882) (bare
#901116A1.11067)                                   machines, using ARTK 5.3)

*Validated by Registration
Alsys               HP 9000 Series 400 (all        Motorola MVME101, MVME121,
AlsyCOMP_036        models) (under DomainOS SR     MVME131, MVME133, MVME133XT,
Version 5.5.1       10.4)                          MVME135, M68332EVS, MVME147,
(BASE                                              & MVME167 (68000, 68010,
#901116A1.11067)                                   68020, 68030, & 68040 cpu.s)
                                                   (bare machines, using ARTK
                                                   Version 5.5.1)

Alsys               Sun 3/260 (under SunOS 3.2)    Motorola MVME121 (68010)
AlsyCOMP_015,                                      (bare machine, using ARTK
Version 5.3                                        Version 5.3)
(#901116A1.11068)

*Validated by Registration
Alsys               Sun 3/50, /60, /75, /80,       Motorola MVME101 (68000),
AlsyCOMP_015,       /160, /260, /280, /470 &       MVME121 (68010), MVME135-1
Version 5.3         /480 (under SunOS 3.2, 3.5,    (68020/68881) & MVME147-1
(BASE               4.0 & 4.1)                     (68030/68882) (bare
#901116A1.11068)                                   machines, using ARTK 5.3)

*Validated by Registration
Alsys               Sun Microsystems Sun-3         Motorola MVME 131, MVME133,
AlsyCOMP_015        computer family (under         MVME133XT, MVME135, &
Version 5.5.1       SunOS 4.1.1)                   MVME147 (68020 & 68030
(BASE                                              cpu.s) (bare machines, using
#901116A1.11068)                                   VRTX32); Motorola MVME101,
                                                   MVME121, MVME131, MVME133,
                                                   MVME133XT, MVME135,
                                                   M68332EVS, MVME147, &
                                                   MVME167 (68000, 68010,
                                                   68020, 68030, & 68040 cpu.s)
                                                   (bare machines, using ARTK
                                                   Version 5.5.1)

Alsys               MicroVAX II (under VMS         INMOS T425 transputer on a
AlsyCOMP_017,       V5.3)                          B403 TRAM (bare) using the
Version 5.2                                        Host running INMOS Iserver
(#901118N1.11064)                                  1.3 for file-server support
                                                   via a CAPLIN QT0 board link

*Validated by Registration
Alsys               MicroVAX II (under VMS         INMOS T425 transputer on a
AlsyCOMP_017,       V5.3)                          B403 TRAM (bare) using the
V5.3                                               Host running INMOS Iserver
(BASE                                              1.3 for file-server support
#901118N1.11064)                                   via a CAPLIN QT0 board link;
                                                   INMOS T800 transputer on a
                                                   B405 TRAM (bare) using the
                                                   Host running INMOS Iserver
                                                   1.3 for file-server support
                                                   via a CAPLIN QT0 board link

*Validated by Registration
Alsys               MicroVAX II (under VMS         INMOS T425 transputer on a
Alsycomp_017        V5.3)                          B403 TRAM (bare), using the
Version 5.4.3                                      Host running INMOS Iserver
(BASE                                              V1.42i for file-server
#901118N1.11064)                                   support via a CAPLIN QT0
                                                   board link and INMOS T800
                                                   transputer on a B405 TRAM
                                                   (bare), using the Host
                                                   running INMOS Iserver V1.42i
                                                   for file-server support via
                                                   a CAPLIN QT0 board link

Alsys               MicroVAX 3100 (under VMS       Same as Host
AlsyCOMP_018        5.3)
Version 5.2
(#901120A1.11070)

*Validated by Registration
Alsys               DEC VAX-11, VAXserver,         Any Host
AlsyCOMP_018,       VAXstation, MicroVAX, VAX
Version 5.2         4000, VAX 6000, VAX 8000 &
(BASE               VAX 9000 Series of
#901120A1.11070)    computers (as supported)
                    (under VMS 5.2 & 5.4)

Alsys               IBM 9370 Model 90 (under       Same as Host
AlsyCOMP_006,       VM/IS CMS release 5.1)
Version 5.3
(#901125N1.11071)

Alsys               IBM 370 3084Q (under MVS/XA    Same as Host
AlsyCOMP_023,       release 3.2)
Version 5.3
(#901125N1.11072)

Alsys               VAX 6210 (under VMS 5.2)       Motorola MVME135-1
AlsyCOMP_011,                                      (68020/68881) (bare machine,
Version 5.3                                        using ARTK Version 5.3)
(#901127A1.11069)

*Validated by Registration
Alsys               DEC VAX-11, VAXserver,         Motorola MVME101 (68000),
AlsyCOMP_011,       VAXstation, MicroVAX, VAX      MVME121 (68010), MVME135-1
Version 5.3         4000, VAX 6000, VAX 8000 &     (68020/68881) & MVME147-1
(BASE               VAX 9000 Series of             (68030/68882) (bare
#901127A1.11069)    computers (as supported)       machines, using ARTK 5.3)
                    (under VMS 5.2, 5.3 & 5.4)

*Validated by Registration
Alsys               DEC VAX-11, VAXserver,         Motorola MVME101 (68000),
AlsyCOMP_011        VAXstation, MicroVAX, VAX      MVME121 (68010), MVME133XT &
Version 5.3.1       4000, VAX 6000, VAX 8000, &    MVME135-1 (68020), &
(BASE               VAX 9000 series of             MVME147-1 (68030) (bare
#901127A1.11069)    computers (under VMS 5.2,      machines, using ARTK 5.3.1)
                    5.3, & 5.4, as supported)

*Validated by Registration
Alsys               Compaq Deskpro 386/20          Motorola MVME101, MVME121,
AlsyCOMP_028        (under DOS 3.31 & 5.0)         MVME131, MVME133, MVME133XT,
Version 5.3                                        MVME135-1, MVME147-1,
(BASE                                              M68332EVS (68000, 68010,
#901127A1.11069)                                   68020, & 68030 cpu.s) (bare
                                                   machine, using ARTK Version
                                                   5.3)

*Validated by Registration
Alsys               DEC VAX-11, VAXserver,         Motorola MVME 131, MVME133,
AlsyCOMP_011        VAXstation, MicroVAX, VAX      MVME133XT, MVME135, &
Version 5.5.1       4000, VAX 6000, VAX 8000, &    MVME147 (68020 & 68030
(BASE               VAX 9000 computer series       cpu.s) (bare machines, using
#901127A1.11069)    (under VMS 5.4)                VRTX32); Motorola MVME101,
                                                   MVME121, MVME131, MVME133,
                                                   MVME133XT, MVME135,
                                                   M68332EVS, MVME147, &
                                                   MVME167 (68000, 68010,
                                                   68020, 68030, & 68040 cpu.s)
                                                   (bare machines, using ARTK
                                                   Version 5.5.1)

Alsys               Multitech 1100 (under SCO      Same as Host
AlsyCOMP_034,       Unix 3.2)
Version 5.1
(#901221W1.11103)

*Validated by Registration
Alsys               Everex AGI 3000D, Compaq       Each Host, self-targetted
AlsyCOMP_034,       Deskpro 386 & SAI
Version 5.1         Technologies Army
(BASE               Lightweight Computer Unit
#901221W1.11103)    (LCU V2) (under Interactive
                    Unix 3.2)

*Validated by Registration
Alsys               Prime MBX (under Prime Unix    Same as Host
AlsyCOMP_034,       V.4)
Version 5.1
(BASE
#901221W1.11103)

*Validated by Registration
Alsys               Any Computer System            Each Host, self-targetted
AlsyCOMP_034,       comprising: cpu: Intel
Version 5.1         80386 or 80486; fpu:
(BASE               optional (under a Unix
#901221W1.11103)    3.2-based OS)

*Validated by Registration
Alsys               Any Computer System that       Any Host
AlsyCOMP_034        executes the Intel 80386 or
Version 5.1         80486 instruction set
(BASE               (under SCO Open Desktop 1.1
#901221W1.11103)    & SCO Unix 3.2, SCO Open
                    Desktop 2.0 & SCO Unix
                    3.2.4, Interactive Unix
                    3.2.2, and AT&T Unix System
                    V Release 4.0)

*Validated by Registration
Alsys               Zenith Data Systems            Same as Host
AlsyCOMP_034,       Z-Station 433 DEh (under
Version 5.1.2       SCO Unix 3.2.4 running
(BASE               SecureWare CMW+ Version
#901221W1.11103)    2.2)

Alsys               Apple Macintosh IIcx (under    Same as Host
AlsyCOMP_043,       Macintosh System Software
Version 5.3         6.0.5)
(#901221W1.11104)

Alsys               IBM PS/2 Model 80 (under       Same as Host
AlsyCOMP_034        LynxOS Version 2.0 +
Version 5.1         Threads Release 11)
(#910129W1.11113)

*Validated by Registration
Alsys               IBM PS/2 Models 70-xxx &       Any Host
AlsyCOMP_034,       80-xxx (under LynxOS
Version 5.1         Version 2.0 Release 15)
(BASE
#910129W1.11113)

Alsys               Sun 3/60 (under SunOS,         KWS EB68020 (under
AlsyCOMP_056,       Version 4.0.3)                 OS-9/68020, Version 2.3)
Version 1.82
(#910131I1.11127)

Alsys               VAX 8530 (under VMS,           KWS EB68020 (under
AlsyCOMP_055,       Version 5.3-1)                 OS-9/68020, Version 2.3)
Version 1.82
(#910201I1.11128)

Alsys               CompuAdd 325 (under DOS        Intel iSBC 386/116 (bare
AlsyCOMP_029,       3.31)                          machine, using ARTK 5.3)
Version 5.3
(#910323W1.11131)

*Validated by Registration
Alsys               Any Computer System that       Any 80486 single board
AlsyCOMP_029,       executes the Intel 80386 or    computer (bare machine,
Version 5.3.1       80486 instruction set          using ARTK 5.3)
(BASE               (under MS-DOS version 5.0 &
#910323W1.11131)    Phar Lap version 4.0)

Alsys               MicroVAX II (under VMS 5.2)    Intel iSBC 386/31 (bare
AlsyCOMP_030,                                      machine, using ARTK 5.3)
Version 5.3
(#910323W1.11132)

*Validated by Registration
Alsys               MicroVAX II (under VMS 5.2)    Any 80386 single board
AlsyCOMP_030,                                      computer (bare machine,
Version 5.3.1                                      using ARTK 5.3)
(BASE
#910323W1.11132)

Alsys               Sun 3/140 (under SunOS 4.1)    Intel iSBC 386/12 (bare
AlsyCOMP_033,                                      machine, using ARTK 5.3)
Version 5.3
(#910323W1.11133)

*Validated by Registration
Alsys               Sun Microsystems Sun-4,        Intel iSBC 386/31, iSBC
AlsyCOMP_052,       SPARCserver, & SPARCstation    386/1xx, iSBC 486/1xx (bare
Version 5.3.1       computer families (under       machines, using ARTK 5.3)
(BASE               SunOS 4.1)
#910323W1.11133)

Alsys               VAX 8530 (under VMS Version    Integrated Device Technology
AlsyCOMP_049,       5.3-1)                         IDT7RS301 System
Version 1.83                                       (R3000/R3010) (bare machine)
(#910407I1.11144)

*Validated by Registration
Alsys               VAX 8530 (under VMS 5.3-1)     Lockheed Sanders STAR MVP
AlsyCOMP_049,                                      (R3000/R3010) (bare machine)
Version 1.83-01
(BASE
#910407I1.11144)

*Validated by Registration
Alsys               DEC VAX-11, VAXserver,         Lockheed Sanders STAR MVP
AlsyCOMP_049,       VAXstation, MicroVAX, VAX      board (R3000/R3010) (bare
Version 1.84        4000, VAX 6000, VAX 8000, &    machine)
(BASE               VAX 9000 series of
#910407I1.11144)    computers (under VMS 5.3 &
                    5.4)

Alsys               DECstation 3100 (under         Same as Host
AlsyCOMP_057,       ULTRIX Version 4.0)
Version 1.83
(#910625I1.11193)

*Validated by Registration
Alsys               DEC DECstation & DECsystem     Any Host
AlsyCOMP_057,       computer families (under
Version 1.83-01     ULTRIX 4.0 & 4.2)
(BASE
#910625I1.11193)

Alsys               IBM RISC System 6000, model    Same as Host
AlsyCOMP_024,       520 (under AIX v3.1)
Version 5.3
(#910809W1.11195)

*Validated by Registration
Alsys               IBM RISC System 6000 (all      Any Host
AlsyCOMP_024 V5.4   models) (under AIX 3.2)
(BASE
#910809W1.11195)

Alsys               Unisys B39 (under BTOS II,     Same as Host
AlsyCOMP_058,       v3.2.0)
Version 5.3
(#910809W1.11196)

Alsys               HP Vectra RS/25C (under DOS    Unisys B39 (under BTOS II,
AlsyCOMP_040,       3.30)                          v3.2.0)
Version 5.3
(#910809W1.11197)

Alsys               HP 9000 Series 700 Model       Same as Host
AlsyCOMP_062,       720 (under HP-UX, Version
Version 5.35        A.B8.05 (release 8.05))
(#911107W1.11227)

*Validated by Registration
Alsys               HP 9000 Series 700, all        HP 9000 Series 700, all
AlsyCOMP_062        models (under HP-UX,           models (under HP-UX, Version
Version 5.35        Version A.B8.05 (release       A.B8.05 (release 8.05))
(BASE               8.05)); HP 9000 Series 800,
#911107W1.11227)    all models (under HP-UX,
                    Version A.B8.00 (release
                    8.00))

*Validated by Registration
Alsys               HP 9000 Series 700, all        HP 9000 Series 700, all
AlsyCOMP_062        models (under HP-UX,           models (under HP-UX, Version
Version 5.5.1       Version 9.01); HP 9000         9.01)
(BASE               Series 800, all models
#911107W1.11227)    (under HP-UX, Version 9.0)

Alsys               HP 9000 Series 800 Model       Same as Host
AlsyCOMP_062,       835 (under HP-UX, Version
Version 5.35        A.B8.00 (release 8.00))
(#911107W1.11228)

*Validated by Registration
Alsys               HP 9000 Series 700, all        HP 9000 Series 800, all
AlsyCOMP_062        models (under HP-UX,           models (under HP-UX, Version
Version 5.35        Version A.B8.05 (release       A.B8.00 (release 8.00))
(BASE               8.05)); HP 9000 Series 800,
#911107W1.11228)    all models (under HP-UX,
                    Version A.B8.00 (release
                    8.00))

*Validated by Registration
Alsys               HP 9000 Series 800 Models      Any Host
AlsyCOMP_062        807, 817, 847, & 867 (under
Version 5.35        HP-UX B-Level Security
(BASE               Operating System, Version
#911107W1.11228)    A.08.08)

*Validated by Registration
Alsys               HP 9000 Series 700, all        HP 9000 Series 800, all
AlsyCOMP_062        models (under HP-UX,           models (under HP-UX, Version
Version 5.5.1       Version 9.01); HP 9000         9.0)
(BASE               Series 800, all models
#911107W1.11228)    (under HP-UX, Version 9.0)

Alsys               Sun SPARCstation 2 (under      Same as Host
AlsyCOMP_072        SunOS 4.1.1)
Version 5.37
(#911119A1.11231)

*Validated by Registration
Alsys               Sun SPARCstation ELC, IPC &    Any Host
AlsyCOMP_047,       IPX; SPARCserver 330, 370,
Version 5.37        390, 470, 490, 630MP, 670MP
(BASE               & 690MP (under SunOS 4.1.1)
#911119A1.11231)

*Validated by Registration
Alsys               Solbourne Series 5/500,        Any Host
AlsyCOMP_047,       /530, /600, /670, /800 &
Version 5.37        5E/900; and S4000 (under
(BASE               OS/MP 4.1)
#911119A1.11231)

*Validated by Registration
Alsys               SPARCstation ELC, IPC, &       Any Host
AlsyCOMP_047        IPX; SPARCserver 330, 370,
Version 5.5.1       390, 490, 690MP, 670MP, &
(BASE               690MP (under SunOS 4.1.1)
#911119A1.11231)

*Validated by Registration
Alsys               Solbourne Series 5/500,        Any Host
AlsyCOMP_047        /530, /600, /670, /800, &
Version 5.5.1       5E/900; & S4000 (under
(BASE               OS/MP 4.1)
#911119A1.11231)

*Validated by Registration
Alsys               Sun Microsystems Sun-4,        Any Host
AlsyCOMP_047        SPARCstation, & SPARCserver
Version 5.5.1       computer series (all
(BASE               models) (under Solaris 2.1)
#911119A1.11231)

Alsys               DECstation 3100 (under         Lockheed Sanders STAR MVP
AlsyCOMP_061,       ULTRIX Version 4.2)            board (R3000/3010) (bare
Version 1.83                                       machine)
(#920429I1.11251)

*Validated by Registration
Alsys               DEC DECstation & DECsystem     Lockheed Sanders STAR MVP
AlsyCOMP_061,       computer families (under       board (R3000/R3010) (bare
Version 1.84        ULTRIX 4.2)                    machine)
(BASE
#920429I1.11251)

*Validated by Registration
Alsys               DEC DECstation & DECsystem     Lockheed Sanders STAR MVP
AlsyCOMP_061,       computer families (under       board (R3000/R3010),
Version 1.84-01     ULTRIX 4.2)                    Integrated Device Technology
(BASE                                              IDT7RS385 board (R3081E)
#920429I1.11251)                                   (bare machines)

Alsys               Control Data 4336 (under       Same as Host
AlsyCOMP_069,       TC/IX 1.0.2)
Version 1.83
(#920730I1.11262)

*Validated by Registration
Alsys               Control Data 4000 series of    Any Host
AlsyCOMP_069,       computers (under TC/IX
Version 1.83        1.0.2 & 1.1)
(BASE
#920730I1.11262)

*Validated by Registration
Alsys               Control Data 4000 series of    Any Host
AlsyCOMP_069,       computers (under TC/IX 1.2)
Version 1.83
(BASE
#920730I1.11262)

Alsys               HP 9000 Series 800 Model       Same as Host
AlsyCOMP_062        827 (under HP-UX Version
Version 5.35        8.02)
(#921118N1.11298)

Alsys               IBM ES/9000 Model 610          Same as Host
AlysCOMP_073,       (under AIX/ESA Version 2)
Version 5.3
(#921126N1.11300)

Alsys               CompuAdd 433 (under MS-DOS     Intel iSBC 186/100 (bare
AlsyCOMP_019        5.0 running Phar Lap 4.0)      machine)
Version 5.3.1
(#921210W1.11302)

*Validated by Registration
Alsys               Sun Microsystems Sun-4,        Any Intel 8086, 80186, or
AlsyCOMP_065,       SPARCserver, and               80286 single-board computer
Version 5.3         SPARCstation computer          (bare machine, running ARTK
(BASE               families (under SunOS 4.1)     5.3)
#921210W1.11302)

Alsys               HP 9000 Series 800 Model       Same as Host
Alsys Ada           807 (under HP-UX BLS
Software            Version A.08.08)
Development
Environment for
HP 9000 Series
600, 700 & 800,
Version 5.35
(#930115S1.11305)

Alsys               HP 9000 Series 800 Model       Same as Host
Alsys Ada           817 (under HP-UX BLS
Software            Version A.08.08)
Development
Environment for
HP 9000 Series
600, 700 & 800,
Version 5.35
(#930115S1.11306)

Alsys               HP 9000 Series 800 Model       Same as Host
Alsys Ada           847 (under HP-UX BLS
Software            Version A.08.08)
Development
Environment for
HP 9000 Series
600, 700 & 800,
Version 5.35
(#930115S1.11307)

Alsys               HP 9000 Series 800 Model       Same as Host
Alsys Ada           867 (under HP-UX BLS
Software            Version A.08.08)
Development
Environment for
HP 9000 Series
600, 700 & 800,
Version 5.35
(#930115S1.11308)

Alsys               Zenith Data Systems            Same as Host
Alsys Ada           Z-Station 433 DEh (under
Software            SCO Unix 3.2 running
Development         SecureWare CMW+ Version 2.2
Environment for     w/MaxSix)
HP 9000 Series
700/800, Version
5.35
(#930115S1.11309)

Alsys               Control Data 4680 (under       Same as Host
AlsyCOMP_068,       EP/IX 1.4.3)
Version 1.83
(#930125I1.11310)

Alsys / German      Sun-3/60 (under SunOS          Sun-3/60 (under SunOS
MoD                 Version 4.0.3, with CAIS       Version 4.0.3)
NATO SWG on APSE    Version 5.5D)
Compiler for
Sun3/SunOS,
Version
S3C1.82-02
(#911016I1.11233)

Alsys / German      VAX 8350 (under VMS Version    VAX 8350 (under VMS Version
MoD                 5.4-1, with CAIS Version       5.4-1)
NATO SWG on APSE    5.5E)
Compiler for
VAX/VMS, Version
VC1.82-02
(#911118I1.11236)

Alsys / German      VAX 8350 (under VMS Version    Motorola MVME133XT (MC68020)
MoD                 5.4-1, with CAIS Version       (bare machine)
NATO SWG on APSE    5.5E)
Compiler for
VAX/VMS to
MC68020, Version
VCM1.82-02
(#920306I1.11248)

Alsys / German      Sun-3/60 (under SunOS          Motorola MVME133XT (MC68020)
MoD                 Version 4.0.3, with CAIS       (bare machine)
NATO SWG on APSE    Version 5.5E)
Compiler for
Sun3/SunOS to
MC68020, Version
S3CM1.82
(#920728I1.11261)

ATLAS ELEKTRONIK    VAX 6000-410 (under VMS        ATLAS ELEKTRONIK GmbH MPR
GmbH                Version 5.2)                   2300 (under MOS 2300,
ATLAS ELEKTRONIK                                   Version 2.1)
Ada Compiler VVME
1.82
(#910324I1.11136)

Concurrent          Concurrent Computer            Same as Host
Computer            Corporation 8400 (MIPS
Corporation         R3000/3010) (under RTU
C3Ada, Version      Version 5.1)
0.5
(#900427I1.11008)

*Validated by Registration
Concurrent          Concurrent Computer            Same as Host
Computer            Corporation 8500 (MIPS
Corporation         R3000/R3010) (under RTU
C3Ada, Version      Version 5.1)
0.5
(BASE
#900427I1.11008)

Concurrent          Concurrent Computer            Same as Host
Computer            Corporation 6650 with Super
Corporation         Lightning Floating Point
C3 Ada Version      (under RTU Version 5.0C)
1.1v
(#901130W1.11107)

*Validated by Registration
Concurrent          Concurrent Computer            Any Host
Computer            Corporation Series 6000
Corporation         with Super Lightning
C3 Ada, Version     Floating Point, and Series
1.1v                5000 with Lightning
(BASE               Floating Point (all models)
#901130W1.11107)    (under RTU Version 5.0A,
                    5.0B & 5.0C)

*Validated by Registration
Concurrent          Concurrent Computer            Same as Host
Computer            Corporation Series 6000
Corporation         (MC68030, with Super
C3 Ada, Version     Lightning Floating Point) &
1.1                 Series 5000 (MC68020, with
(BASE               Lightning Floating Point)
#901130W1.11107)    (under RTU Versions 5.0A,
                    5.0B, 5.0C & 6.0)

Concurrent          Concurrent Computer            Same as Host
Computer            Corporation 3280MPS (under
Corporation         OS/32 Version R08-03.2)
C3 Ada Version
R03-00V
(#901130W1.11108)

*Validated by Registration
Concurrent          Concurrent Computer            Any Host
Computer            Corporation Series 3200:
Corporation         3200 MPS, 3203, 3205, 3210,
C3 Ada, Version     3220, 3230, 3250, 3230XP,
R03-00V             3250XP, 3230MPS, 3260MPS,
(BASE               Micro4, and Micro5 (under
#901130W1.11108)    OS/32 Versions R08-03,
                    R08-03.1 & R08-03.2)

*Validated by Registration
Concurrent          Concurrent Computer            Any Host
Computer            Corporation System Bus
Corporation         Processor family of
C3Ada Version       computers (under Trusted
R03-00              OS/32 and MTM Version
(BASE               R08-03.3S, and OS/32
#901130W1.11108)    Version R09-01.1)

Concurrent          Concurrent Computer            Same as Host
Computer            Corporation 8400 (MIPS
Corporation         R3000/3010) (under RTU
C3 Ada Version      Version 5.1)
1.0v
(#901130W1.11109)

*Validated by Registration
Concurrent          Concurrent Computer            Any Host
Computer            Corporation Series 8000
Corporation         (all models) (under RTU
C3 Ada, Version     Versions 5.1, 5.1A & 5.1B)
1.0v
(BASE
#901130W1.11109)

*Validated by Registration
Concurrent          Concurrent Computer            Same as Host
Computer            Corporation Series 8000
Corporation         (MIPS R3000/3010) (under
C3 Ada, Version     RTU Versions 5.1A, 5.1B &
1.0                 6.0)
(BASE
#901130W1.11109)

*Validated by Registration
Concurrent          Concurrent Computer            Same as Host
Computer            Corporation Series 8000
Corporation         (R3000/3010), all models
C3 Ada, Version     (under RTU Versions 5.1A,
2.0p                5.1B & 6.0)
(BASE
#901130W1.11109)

*Validated by Registration
Concurrent          Concurrent Computer            Any Host
Computer            Corporation Series 8000
Corporation         (MIPS R3000/3010) (under
C3 Ada, Version     RTU Version 6.0)
2.0b
(BASE
#901130W1.11109)

Concurrent          Concurrent Computer            Same as Host
Computer            Corporation 6650 with
Corporation         MC68882 Floating Point
C3 Ada Version      (under RTU Version 5.0C)
1.1v
(#901130W1.11110)

*Validated by Registration
Concurrent          Concurrent Computer            Any Host
Computer            Corporation Series 6000
Corporation         with an MC68882 fpu, and
C3 Ada, Version     Series 5000 with an MC68881
1.1v                fpu (all models) (under RTU
(BASE               Versions 5.0A, 5.0B & 5.0C)
#901130W1.11110)

*Validated by Registration
Concurrent          Concurrent Computer            Same as Host
Computer            Corporation Series 6000
Corporation         (MC68030/MC68882) & Series
C3 Ada, Version     5000 (MC68020/MC68881)
1.1                 (under RTU Versions 5.0A,
(BASE               5.0B, 5.0C & 6.0)
#901130W1.11110)

*Validated by Registration
Concurrent          Concurrent Computer            Any Host
Computer            Corporation Series 7000
Corporation         (MC68040) (under RTU
C3 Ada, Version     Version 6.1)
1.2 & 2.0b
(BASE
#901130W1.11110)

*Validated by Registration
Concurrent          Concurrent Computer            Any Host
Computer            Corporation Series 7000
Corporation         (MC68040) (under RTU
C3 Ada, Version     Version 6.1)
2.0b
(BASE
#901130W1.11110)

CONVEX Computer     CONVEX C220 (under ConvexOS    Same as Host
Corporation         8.1)
CONVEX Ada,
Version 2.0
(#900910W1.11027)

*Validated by Registration
CONVEX Computer     CONVEX C120, C201, C202,       Any Host
Corporation         C210, C220, C230, C240,
CONVEX Ada,         C210i, C220i & C230i (under
Version 2.0         ConvexOS, Versions 8.1 and
(BASE               9.0)
#900910W1.11027)

*Validated by Registration
CONVEX Computer     CONVEX C120, C201, C202,       Each Host, self-targetted
Corporation         C210, C210i, C220, C220i,
CONVEX Ada,         C230, C230i, C240, C3210,
Version 2.0         C3220, C3230, C3240, C3410,
(BASE               C3420, C3430, C3440, C3450,
#900910W1.11027)    C3460, C3470, C3480, C3810,
                    C3820, C3830, C3840, C3850,
                    C3860, C3870, C3880 (under
                    ConvexOS versions 8.1, 9.0,
                    9.1 & 10.0)

*Validated by Registration
CONVEX Computer     CONVEX C120, and C2xx,         Same as Host
Corporation         C32xx, C34xx, & C38xx
CONVEX Ada,         computer series (under
Version 2.1         ConvexOS, Versions 8.1,
(BASE               9.0, 9.1, 10.0, & 10.1; and
#900910W1.11027)    ConvexOS/Secure Versions
                    9.5 & 10.0 )

*Validated by Registration
Cray Research       CRAY X-MP/EA & X-MP (all       Any Host
Inc.                models) (under UNICOS
Cray Ada Compiler   Releases 6.1 & 7.0)
Release 3.1
(BASE
#901112W1.11116)

*Validated by Registration
Cray Research       CRAY Y-MP & Y-MP EL (all       Any Host
Inc.                models) (under UNICOS
Cray Ada Compiler   Releases 6.1 & 7.0)
Release 3.1
(BASE
#901112W1.11117)

*Validated by Registration
Cray Research       CRAY CRAY-2/4-128 (all         Any Host
Inc.                models) (under UNICOS
Cray Ada Compiler   Releases 6.1 & 7.0)
Release 3.1
(BASE
#911006W1.11223)

Cray Research,      Cray X-MP/EA (under UNICOS     Same as Host
Inc.                Release 5.0)
Cray Ada Compiler
Release 2.0
(#901112W1.11116)

*Validated by Registration
Cray Research,      CRAY X-MP & X-MP/EA, all       Each Host, self-targeted
Inc.                models (under UNICOS
Cray Ada Compiler   Releases 5.1, 6.0 & 6.1)
Release 2.0
(BASE
#901112W1.11116)

*Validated by Registration
Cray Research,      X-MP/EA (all models) (under    Same as Host
Inc.                UNICOS Release 6.1)
Cray Ada Compiler
3.0
(BASE
#901112W1.11116)

Cray Research,      Cray Y-MP (under UNICOS        Same as Host
Inc.                Release 5.0)
Cray Ada Compiler
Release 2.0
(#901112W1.11117)

*Validated by Registration
Cray Research,      Cray Y-MP, all models          Each Host, self-targeted
Inc.                (under UNICOS Releases 5.1,
Cray Ada Compiler   6.0 & 6.1)
Release 2.0
(BASE
#901112W1.11117)

*Validated by Registration
Cray Research,      CRAY Y-MP EL (under UNICOS     Same as Host
Inc.                Releases 6.0 & 6.1)
Cray Ada Compiler
Release 2.0
(BASE
#901112W1.11117)

*Validated by Registration
Cray Research,      CRAY Y-MP & Y-MP EL (all       Each Host, self-targeted
Inc.                models) (under UNICOS
Cray Ada Compiler   Releases 6.1)
3.0
(BASE
#901112W1.11117)

Cray Research,      CRAY-2/4-128 (under UNICOS     Same as Host
Inc.                Release 6.1)
Cray Ada Compiler
Release 2.0
(#911006W1.11223)

*Validated by Registration
Cray Research,      CRAY-2 (all models) (under     Each Host, self-targeted
Inc.                UNICOS Release 6.1)
Cray Ada Compiler
Release 2.0
(BASE
#911006W1.11223)

*Validated by Registration
Cray Research,      CRAY-2/4-128 (all models)      Each Host, self-targeted
Inc.                (under UNICOS Release 6.1)
Cray Ada Compiler
3.0
(BASE
#911006W1.11223)

DDC International   VAX 8530 (under VMS Version    Same as Host
A/S                 5.3)
DACS VAX/VMS
Native Ada
Compiler System,
Version 4.6
(#901129S1.11050)

DDC International   MicroVAX 3100 (under VMS       Motorola MVME133 board
A/S                 Version 5.3)                   (68020/68881) (bare machine)
DACS VAX/VMS to
68020 Bare Cross
Compiler System,
Version 4.6
(#901129S1.11051)

DDC International   VAX 8530 (under VMS Version    Intel iSBC 386/21 (bare
A/S                 5.3)                           machine)
DACS VAX/VMS to
80386 PM Bare Ada
Cross Compiler
System, Version
4.6
(#901129S1.11074)

DDC International   ICL DRS300 (under DRS/NX,      Same as Host
A/S                 Version 3.2 (UNIX System
DACS 80386 UNIX V   V/386 release 3.2))
Ada Compiler
System, Version
4.6
(#901129S1.11075)

DDC International   Sun-3/60 (under SunOS,         Same as Host
A/S                 Version 4.0_Export)
DACS Sun3/SunOS
Native Ada
Compiler System,
Version 4.6
(#901129S1.11076)

DDC International   VAX 8530 (under VMS Version    Intel iSBC 186/03 (bare
A/S                 5.3)                           machine)
DACS VAX/VMS to
80186 Bare Ada
Cross Compiler
System with Rate
Monotonic
Scheduling,
Version 4.6
(#901129S1.11077)

*Validated by Registration
DDC International   DEC VAX-11, VAXserver,         Intel iSBC 186/03 (bare
A/S                 VAXstation, MicroVAX, VAX      machine)
DACS VAX/VMS to     6000, VAX 8000 & VAX 9000
80186 Bare Ada      Series of computers,
Cross Compiler      including Raytheon Military
System with Rate    VAX computer model 860
Monotonic           (under VMS Version 5.3)
Scheduling,
Version 4.6
(BASE
#901129S1.11077)

*Validated by Registration
DDC International   DEC VAX-11, VAXserver,         Intel iSBC 86/35 (bare
A/S                 VAXstation, MicroVAX, VAX      machine)
DACS VAX/VMS to     6000, VAX 8000 & VAX 9000
8086 Bare Ada       Series of computers,
Cross Compiler      including Raytheon Military
System with Rate    VAX computer model 860
Monotonic           (under VMS Version 5.3)
Scheduling,
Version 4.6
(BASE
#901129S1.11077)

*Validated by Registration
DDC International   DEC VAX-11, VAXserver,         Intel iSBC 286/12 (bare
A/S                 VAXstation, MicroVAX, VAX      machine)
DACS VAX/VMS to     6000, VAX 8000 & VAX 9000
80286 Bare Ada      Series of computers,
Cross Compiler      including Raytheon Military
System with Rate    VAX computer model 860
Monotonic           (under VMS Version 5.3)
Scheduling,
Version 4.6
(BASE
#901129S1.11077)

*Validated by Registration
DDC International   DEC VAX-11, VAXserver,         Intel iSBC 286/12 in
A/S                 VAXstation, MicroVAX, VAX      Protected Mode (bare
DACS VAX/VMS to     6000, VAX 8000 & VAX 9000      machine)
80286 PM Bare Ada   Series of computers,
Cross Compiler      including Raytheon Military
System with Rate    VAX computer model 860
Monotonic           (under VMS Version 5.3)
Scheduling,
Version 4.6
(BASE
#901129S1.11077)

DDC International   VAX 8530 (under VMS Version    Intel iSBC 386/21 (bare
A/S                 5.3)                           machine)
DACS VAX/VMS to
80386 Bare Ada
Cross Compiler
System with Rate
Monotonic
Scheduling,
Version 4.6
(#901129S1.11078)

DDC International   VAX 8530 (under VMS Version    Intel iSBC 186/03 (bare
A/S                 5.3)                           machine)
DACS VAX/VMS to
80186 Bare Ada
Cross Compiler
System, Version
4.6
(#901129S1.11079)

*Validated by Registration
DDC International   DEC VAX-11, VAXserver,         Intel iSBC 186/03 (bare
A/S                 VAXstation, MicroVAX, VAX      machine)
DACS VAX/VMS to     6000, VAX 8000 & VAX 9000
80186 Bare Ada      Series of computers,
Cross Compiler      including Raytheon Military
System, Version     VAX computer model 860
4.6                 (under VMS Version 5.3)
(BASE
#901129S1.11079)

*Validated by Registration
DDC International   DEC VAX-11, VAXserver,         Intel iSBC 86/35 (bare
A/S                 VAXstation, MicroVAX, VAX      machine)
DACS VAX/VMS to     6000, VAX 8000 & VAX 9000
8086 Bare Ada       Series of computers,
Cross Compiler      including Raytheon Military
System, Version     VAX computer model 860
4.6                 (under VMS Version 5.3)
(BASE
#901129S1.11079)

*Validated by Registration
DDC International   DEC VAX-11, VAXserver,         Intel iSBC 286/12 (bare
A/S                 VAXstation, MicroVAX, VAX      machine)
DACS VAX/VMS to     6000, VAX 8000 & VAX 9000
80286 Bare Ada      Series of computers,
Cross Compiler      including Raytheon Military
System, Version     VAX computer model 860
4.6                 (under VMS Version 5.3)
(BASE
#901129S1.11079)

*Validated by Registration
DDC International   DEC VAX-11, VAXserver,         Intel iSBC 286/12 in
A/S                 VAXstation, MicroVAX, VAX      Protected Mode (bare
DACS VAX/VMS to     6000, VAX 8000 & VAX 9000      machine)
80286 PM Bare Ada   Series of computers,
Cross Compiler      including Raytheon Military
System, Version     VAX computer model 860
4.6                 (under VMS Version 5.3)
(BASE
#901129S1.11079)

DDC International   IBM PS/2 Model 80-311          Same as Host
A/S                 (under LynxOS 386/PS2,
DACS 80386 DMS/OS   Version 2.0A)
Ada Compiler
System, Version
4.6
(#901129S1.11112)

DDC International   VAX 8530 (under VMS Version    Tadpole Technology plc
A/S                 5.3)                           TP860M (bare machine)
DACS VAX/VMS to
80860 Bare Ada
Cross Compiler
System, Version
4.6.1
(#910502S1.11158)

DDC International   Sun-3/50 (under SunOS          Motorola MVME143 board
A/S                 Release 4.0_Export)            (68030/68882) (bare machine)
DACS Sun-3/SunOS
to 68030 Bare Ada
Cross Compiler
System, Version
4.6.4, MRI IEEE
695 (BASIC_MODE)
(#910502S1.11159)

DDC International   Sun-3/50 (under SunOS          Motorola MVME143 board
A/S                 Release 4.0_Export)            (68030/68882) (bare machine)
DACS Sun-3/SunOS
to 68030 Bare Ada
Cross Compiler
System, Version
4.6.4, MRI IEEE
695 (SECURE_MODE)
(#910502S1.11160)

*Validated by Registration
DDC-I, Inc.         VAX 8530 (under VMS Version    Intel iSBC 486/125 (bare
DACS VAX/VMS to     5.3)                           machine)
80486 PM Bare Ada
Cross Compiler
System, Version
4.6
(BASE
#901129S1.11074)

DDC-I, Inc.         MIPS M/120-5 (under RISC/os    Lockheed Sanders STAR MVP
DACS MIPS RISC/os   Version 4.50)                  R3000/R3010 Board (bare
to MIPS R3000                                      machine)
Bare Ada Cross
Compiler System,
Release 2.1-16
(#920805S1.11263)

DDC-I, Inc.         DECstation 3100 (under         Integrated Device Technology
DACS                ULTRIX Version 4.0)            IDT7RS301 R3000/R3010 Board
DECstation/ULTRIX                                  (bare machine)
to MIPS R3000
Bare Ada Cross
Compiler System,
Release 2.1-16
(#920805S1.11264)

DDC-I, Inc.         SPARCstation 2 (under          Same as Host
DACS Sun            SunOS, Version 4.1.1)
SPARC/SunOS
Native Ada
Compiler System,
Version 4.6.1
(#920805S1.11265)

DDC-Inter, Inc.     MicroVAX 3100 Cluster          InterACT MIL-STD-1750A
InterACT Ada        (under VMS 5.2)                Instruction Set Architecture
1750A Compiler                                     Simulator Release 2.3 (bare
System, Release                                    machine simulation)
3.5
(#910705S1.11191)

DDC-Inter, Inc.     MicroVAX 3100 Cluster          Lockheed Sanders STAR MVP
InterACT Ada MIPS   (under VMS 5.2)                R3000/R3010 Board (bare
Cross-Compiler                                     machine)
System, Release
2.0
(#910705S1.11192)

*Validated by Registration
DDC-Inter, Inc.     MicroVAX 3100 Cluster          Lockheed Sanders STAR MVP
InterACT Ada MIPS   (under VMS 5.2)                R3000/R3010 Board (bare
Cross-Compiler                                     machine)
System, Release
2.1
(BASE
#910705S1.11192)

*Validated by Registration
DESC Ltd.           ICL Series 39 Level 80         Same as Host
VME Ada Compiler    (under VME with VMEB
VA3.20              Environment Option Version
(BASE               SV292)
#921008N1.11293)

Digital Equipment   VAX 8800 (under VMS Version    Same as Host
Corporation         5.4)
VAX Ada, Version
2.2
(#901109S1.11053)

*Validated by Registration
Digital Equipment   DEC VAX-11, VAXserver,         Any Host
Corporation         VAXstation, VAXft,
VAX Ada Version     MicroVAX, VAX 4000, VAX
2.2                 6000, VAX 8000 & VAX 9000
(BASE               Series of computers (as
#901109S1.11053)    supported); Ratheon
                    Military VAX Computer Model
                    860; and Norden MilVAX
                    Computer Model MilVAX II
                    (under VMS Version 5.4)

Digital Equipment   VAX 8800 (under VMS Version    MicroVAX II (under VAXELN
Corporation         5.4)                           Version 4.1, using VAXELN
VAX Ada, Version                                   Ada Version 2.2)
2.2
(#901109S1.11054)

*Validated by Registration
Digital Equipment   DEC VAX-11, VAXserver,         VAX 4000 Models 200 & 300;
Corporation         VAXstation, VAXft,             VAX 6000 Series 200, 300 &
VAX Ada Version     MicroVAX, VAX 4000, VAX        400; VAX 8200, 8250, 8500,
2.2                 6000, VAX 8000 & VAX 9000      8530, 8550, 8700, 8800 &
(BASE               Series of computers (as        8810; VAX-11/730 & /750;
#901109S1.11054)    supported); Ratheon            MicroVAX II, 2000, 3100,
                    Military VAX Computer Model    3300, 3400, 3500, 3600, 3800
                    860; and Norden MilVAX         & 3900; VAXstation 2000,
                    Computer Model MilVAX II       3100, 3150, 3200, 3500 &
                    (under VMS Version 5.4)        II/GPX; VAXserver 3100,
                                                   3300, 3400, 3500, 3600,
                                                   3800, 3900; VAXserver
                                                   4000-300; VAXserver 6000
                                                   Models 210, 220, 310, 320,
                                                   410 & 420; Ratheon Military
                                                   VAX Computer Models 810 &
                                                   860; Norden MilVAX Computer
                                                   Model MilVAX II, IVAX 620 &
                                                   630; VAX RTA; KA620-BA &
                                                   KA800-M; rtVAX 300, 1000,
                                                   3200, 3300, 3305, 3400,
                                                   3500, 3600, 3800, 4000 Model
                                                   300, 8550, 8700, rtVAX 6000
                                                   Models 200, 300 & 400 Series
                                                   and rtVAXstation 3100 Models
                                                   30 & 38 (under VAXELN
                                                   Version 4.2, using VAXELN
                                                   Ada Version 2.2)

*Validated by Registration
Digital Equipment   VAX 6000 Model 200, 300 &      VAX 6000 Model 200, 300 &
Corporation         400 Series; VAX 8200, 8250,    400 Series; VAX 8200, 8250,
VAX Ada Version     8300, 8350, 8500, 8530,        8500, 8530, 8550, 8700, 8800
2.2                 8550, 8600, 8650, 8700,        & 8810; VAX-11/730 & /750;
(BASE               8800, 8810, 8820, 8830,        MicroVAX II, 2000, 3100,
#901109S1.11054)    8840, 8842, 8974 & 8978;       3300, 3400, 3500, 3600, 3800
                    VAX-11/730, /750, /780,        & 3900; VAXstation 2000,
                    /785; MicroVAX II, 2000,       3100, 3150, 3200, 3500 &
                    3100, 3300, 3400, 3500,        II/GPX; VAXserver 3100,
                    3600, 3800 & 3900;             3300, 3400, 3500, 3600,
                    VAXstation II, 2000, 3100      3602, 3800, 3900; VAXserver
                    series, 3200, 3500, 3520,      6000 Models 210 220, 310,
                    3540 & 8000; VAXserver         320, 410 & 420; Ratheon
                    3100, 3300, 3400, 3500,        Military VAX Computer Models
                    3600, 3602, 3800, 3900;        810 & 860; Norden Systems:
                    VAXserver 6000-310,            Mil Vax II, IVAX 620 & 630;
                    6000-410 & 6000-420;           VAX RTA; KA620-BA, rtVAX
                    Ratheon Military VAX           300, 1000, 3200, 3300, 3305,
                    Computer Model 860 (under      3400, 3500, 3600, 3800,
                    VMS Version 5.4)               8550, 8700, rtVAX 6000 Model
                                                   200, 300 & 400 Series &
                                                   rtVAXstation 3100 Models 30
                                                   & 38 (under VAXELN Version
                                                   4.1 using VAXELN Ada Version
                                                   2.2)

Digital Equipment   DECstation 5000 Model 200      Same as Host
Corporation         (under ULTRIX 4.2)
DEC Ada, Version
1.0
(#911025S1.11226)

*Validated by Registration
Digital Equipment   DECstation 2100, 3100,         Any Host
Corporation         3100s, 5000 Models 120/125,
DEC Ada, Version    120/125CX, 120/125PXG,
1.0                 120/125PXG TURBO, 200,
(BASE               200CX, 200PX, 200PXG,
#911025S1.11226)    200PXG TURBO; and DECsystem
                    3100, 5000 Model 200, 5100,
                    5400, 5500, 5810, 5820,
                    5830 & 5840 (under ULTRIX
                    Versions 4.0, 4.1 & 4.2)

*Validated by Registration
Digital Equipment   DEC DECstation 2100, 3100,     Any Host
Corporation         & 5000, and DECsystem 5000,
DEC Ada, Version    5100, 5400, 5500, 5800, &
1.0                 5900 series of computers
(BASE               (under ULTRIX Versions 4.0,
#911025S1.11226)    4.1, 4.2, & 4.2A)

*Validated by Registration
Digital Equipment   DECstation 2100, 3100, &       Any Host
Corporation         5000; and DECsystem 3100,
DEC Ada, Version    5000, 5100, 5400, 5500,
1.1                 5810, 5820, 5840, & 5900
(BASE               series of computers (under
#911025S1.11226)    Ultrix Version 4.2)

Digital Equipment   DEC 3000 Model 400 (under      Same as Host
Corporation         OpenVMS AXP Operating
DEC Ada for         System, Version 1.0)
OpenVMS AXP
Systems, Version
3.0-5
(#930319S1.11315)

*Validated by Registration
Digital Equipment   DEC 3000 Workstation and       Any Host
Corporation         Server models, 4000, 7000,
DEC Ada for         & 10000 series of AXP
OpenVMS AXP         computers (under OpenVMS
Systems, Version    Version 1.0)
3.0-5
(BASE
#930319S1.11315)

Digital Equipment   VAXstation 4000 Model 60       Same as Host
Corporation         (under VMS Version 5.5)
DEC Ada for
OpenVMS VAX
Systems, Version
3.0-7
(#930319S1.11316)

*Validated by Registration
Digital Equipment   VAXft, VAX 4000, 6000,         Any Host
Corporation         8000, 9000, & 10000; 
DEC Ada for         MicroVAX II, 2000, & 3000;
OpenVMS VAX         VAXstation II, 2000, 3000,
Systems, Version    4000; VAXserver 3000, 4000,
3.0-7               & 6000 series of computers
(BASE               (as supported) (under VMS
#930319S1.11316)    Version 5.4 & 5.5)

Digital Equipment   VAXstation 4000 Model 60       VAXstation 3100 Model 48
Corporation         (under VMS Version 5.5)        (under VAXELN Version 4.4,
DEC Ada for                                        using VAXELN Ada Version
OpenVMS VAX                                        2.2)
Systems, Version
3.0-7
(#930319S1.11317)

*Validated by Registration
Digital Equipment   VAXft, VAX 4000, 6000,         VAX 4000, 6000, & 9000;
Corporation         8000, 9000, & 10000;           MicroVAX II, 2000, 3000;
DEC Ada for         MicroVAX II, 2000, & 3000;     KA620-BA, KAV30 VME SBC,
OpenVMS VAX         VAXstation II, 2000, 3000,     KA800-M; rtVAX 300, 1000,
Systems, Version    4000; VAXserver 3000, 4000,    3000, 4000, 6000, 9000, &
3.0-7               & 6000 series of computers     rtVAXstation 3100; IVAX 620
(BASE               (as supported) (under VMS      & 630; VAXstation II, 2000,
#930319S1.11317)    Version 5.4 & 5.5)             3000, & 4000; VAXserver
                                                   3000, 4000, & 6000 series of
                                                   computers (as supported)
                                                   (under VAXELN Version 4.4,
                                                   using VAXELN Ada Version
                                                   2.2)

E-Systems/ECI       Tolerant Eternity (under       Same as Host
Division            TX, 5.4.0)
Tolerant Ada
Development
System, Version
6.0
(#901003W1.11039)

EDS-Scicon          Local Area VAX Cluster         Motorola MVME167 (68040)
Defence Limited     (comprising VAXserver 3600,    (bare machine)
XD Ada              MicroVAX 2000 (2), &
MC68040/ARTX        MicroVAX II machines)
Version 1.2         (under VMS 5.5)
(#921112N1.11297)

Encore Computer     Encore 91 Series Model         Same as Host
Corporation         91-0340 (under UMAX 3.0)
Parallel Ada
Development
System, Revision
1.0
(#910130W1.11114)

*Validated by Registration
Encore Computer     Encore 91 Series, all          Any Host
Corporation         models (under UMAX 3.0)
Parallel Ada
Development
System, Revision
1.0
(BASE
#910130W1.11114)

*Validated by Registration
Encore Computer     Encore 91, 93, & 94 Series,    Any Host
Corporation         all models (under UMAX 3.0)
Parallel Ada
Development
System, Revision
2.0
(BASE
#910130W1.11114)

Encore Computer     Encore 91 Series Model         Encore 91 Series Model
Corporation         91-0340 (under UMAX 3.0)       91-0430 (under uMPX 1.0)
Parallel Ada
Development
System, Revision
1.0
(#910130W1.11115)

*Validated by Registration
Encore Computer     Encore 91 Series, all          Encore 91 Series, all models
Corporation         models (under UMAX 3.0)        (under microMPX 1.0)
Parallel Ada
Development
System, Revision
1.0
(BASE
#910130W1.11115)

*Validated by Registration
Encore Computer     Encore 91 Series, all          Encore 91 Series, all models
Corporation         models (under UMAX 3.0)        (under microMPX 1.0 &
Parallel Ada                                       microARTE 1.0)
Development
System, Revision
2.0
(BASE
#910130W1.11115)

GSE Gesellschaft    MIPS M/120 RISComputer         Same as Host
fur Software-       (under UMIPS 4.51)
Engineering mbH
Meridian Ada,
Version 4.1
(#910711W1.11180)

GSE Gesellschaft    IBM RISC System 6000/520       Same as Host
fur Software-       (under AIX Version 3)
Engineering mbH
Meridian Ada,
Version 4.1
(#910711W1.11182)

GSE Gesellschaft    HP 9000 Series 400 Model       Same as Host
fur Software-       400T (under HP-UX 7.03)
Engineering mbH
Meridian Ada,
Version 4.1
(#910711W1.11184)

GSE Gesellschaft    Concurrent Computer            Same as Host
fur Software-       Corporation M6000 Model
Engineering mbH     6450 (under RTU 5.0C)
Meridian Ada,
Version 4.1
(#910711W1.11186)

GSE Gesellschaft    Concurrent Computer            Same as Host
fur Software-       Corporation M8000 Model
Engineering mbH     8500 (under RTU 5.1A)
Meridian Ada,
Version 4.1
(#910711W1.11187)

GSE Gesellschaft    Data General AViiON 400        Same as Host
fur Software-       Model 402 (under DG/UX
Engineering mbH     4.31)
Meridian Ada,
Version 4.1
(#910711W1.11188)

GSE Gesellschaft    HP 9000 Series 700 Model       Same as Host
fur Software-       720 (under HP-UX 8.01)
Engineering mbH
Meridian Ada,
Version 4.1
(#910711W1.11190)

Harris              Harris NH-4400 (under CX/UX    Same as Host
Corporation,        5.1)
Computer Systems
Division
Harris Ada 5.1
(#900918W1.11028)

*Validated by Registration
Harris              Harris NH-4400 (under CX/UX    Any Host
Corporation,        5.1, CX/RT 5.1, OR CX/SX
Computer Systems    5.1)
Division
Harris Ada 5.1
(BASE
#900918W1.11028)

*Validated by Registration
Harris              Harris NH-4400 (under CX/UX    Same as Host
Corporation,        5.2, CX/RT 5.2 & CX/SX 5.2)
Computer Systems
Division
Harris Ada
Compiler, Version
5.1
(BASE
#900918W1.11028)

*Validated by Registration
Harris              Harris NH-4400 & NH-4800       Any Host (using either
Corporation,        (under CX/UX 5.3, CX/RT 5.3    Harris Ada Run-time System
Computer Systems    & CX/SX 5.3)                   or ARMS Run-time System)
Division
Harris Ada 5.1.1
(BASE
#900918W1.11028)

*Validated by Registration
Harris              NH-4400 & NH-4800 (under       Any Host (using either
Corporation,        CX/UX 6.1, CX/RT 6.1, &        Harris Ada Run-time System
Computer Systems    CX/SX 6.1)                     or ARMS Run-time System)
Division
Harris Ada
Compiler 5.1.1
(BASE
#900918W1.11028)

*Validated by Registration
Harris              NH-4400, NH-4800, & NH-5800    Any Host (using either
Corporation,        (under CX/UX 6.2, CX/RT        Harris Ada Run-time System
Computer Systems    6.2, & CX/SX 6.2)              or ARMS Run-time System)
Division
Harris Ada
Compiler 5.1.1
(BASE
#900918W1.11028)

*Validated by Registration
Harris              Harris NH-4400, -4800, &       Harris NH-4400, NH-4800, &
Corporation,        -5800 (under CX/UX 6.2,        NH-5800 (Harris Ada runtime
Computer Systems    CX/RT 6.2, & CX/SX 6.2)        System & ARMS Runtime
Division                                           System)
Harris Ada
version 5.2
(BASE
#900918W1.11028)

Harris              Harris NH-3800 (under CX/UX    Same as Host
Corporation,        5.1)
Computer Systems
Division
Harris Ada 5.1
(#900918W1.11029)

*Validated by Registration
Harris              Harris NH-1200, NH-3400 &      Any Host
Corporation,        NH-3800 (under CX/UX 5.1,
Computer Systems    CX/RT 5.1, OR CX/SX 5.1)
Division
Harris Ada 5.1
(BASE
#900918W1.11029)

*Validated by Registration
Harris              NH-1200, NH-3400 & NH-3800     Same as Host
Corporation,        (under CX/UX 5.2, CX/RT 5.2
Computer Systems    & CX/SX 5.2)
Division
Harris Ada
Compiler, Version
5.1
(BASE
#900918W1.11029)

*Validated by Registration
Harris              Harris NH-1200, NH-3400 &      Any Host
Corporation,        NH-3800 (under CX/UX 5.3,
Computer Systems    CX/RT 5.3 & CX/SX 5.3)
Division
Harris Ada 5.1.1
(BASE
#900918W1.11029)

*Validated by Registration
Harris              Harris NH-1200, NH-3400, &     Any Host
Corporation,        NH-3800 (under CX/UX 6.1,
Computer Systems    CX/RT 6.1, & CX/SX 6.1)
Division
Harris Ada
Compiler 5.1.1
(BASE
#900918W1.11029)

Hewlett-Packard     DN4500 (under Domain/OS        Same as Host
Co./Apollo          SR10.3)
Systems Division
Domain Ada V6.0m
(#910411W1.11137)

Hewlett-Packard     DN10000 (under Domain/OS       Same as Host
Co./Apollo          SR10.3.p)
Systems Division
Domain Ada V6.0p
(#910411W1.11138)

Hewlett-Packard     HP 9000 Series 300 Model       Same as Host
Company             370 (under HP-UX, Version
HP 9000 Series      A.07.00)
300 Ada Compiler,
Version 5.35
(#901022W1.11049)

*Validated by Registration
Hewlett-Packard     HP 9000 Series 300 & 400,      Any Host
Company             all models (under HP-UX,
HP 9000 Series      Version A.B7.03)
300 Ada Compiler,
Version 5.35
(BASE
#901022W1.11049)

*Validated by Registration
Hewlett-Packard     HP 9000 Series 300 & 400,      Any Host from the same
Company             all Models (under HP-UX,       Series, under the same OS
HP 9000 Series      Versions A.B7.00 (release      version
300 Ada Compiler,   7.0), A.B7.03 (release
Version 5.35t       7.3), A.B7.05 (release 7.5)
(BASE               & A.B8.00 (release 8.0), as
#901022W1.11049)    supported)

IBM Canada, Ltd.    RISC System/6000 model         Same as Host
AIX Ada/6000        7013-530 (under AIX 3.1)
Release 2,
Preliminary
Version
(#901127W1.11085)

*Validated by Registration
IBM Canada, Ltd.    RISC System/6000 models        Any Host
AIX Ada/6000        7013-320, -520, -530, -540,
Release 2.0         -550, -730 & -930 (under
(BASE               AIX 3.1)
#901127W1.11085)

*Validated by Registration
IBM Canada, Ltd.    RISC System/6000 models        Any Host, running same AIX
AIX Ada/6000        7013-320, -520, -530, -540,    version as Host
Release 2.2         -550, -730, & -930 (under
(BASE               AIX 3.1 & 3.2)
#901127W1.11085)

IBM Canada, Ltd.    RISC System/6000 model         Same as Host
AIX Ada/6000        7012-320 (under AIX 3.2)
Internal
Development
Version
(#920121W1.11234)

*Validated by Registration
IBM Canada, Ltd.    RISC System/6000, all          Any Host
AIX Ada/6000        models (under AIX 3.2)
Release 3.0
(BASE
#920121W1.11234)

IBM Canada, Ltd.    RISC System/6000, model        Same as Host
XL Ada/6000         7013-520 (under AIX 3.2)
Internal
Development
Version
(#921119W1.11299)

Intel Corporation   Intel i860 Station (under      Intel iPSC/860 (under
iPSC/860 Ada        Unix System V/860, Version     Ada-NX, Release 3.3.1)
Release 6.1.0(E)    4)
Unix System V/860
Release 4 Version
3, 312425-0001
(#920513W1.11255)

*Validated by Registration
Intermetrics        Amdahl 5890/180E (under        Same as Host
Intermetrics MVS    MVS/XA Release 2.2)
Ada Compiler,
Version 8.1
(BASE
#910622W1.11170)

Intermetrics,       IBM 3083 (under UTS 580        Same as Host
Inc.                Release 1.2.3)
UTS Ada Compiler,
Version 302.03
(#910425W1.11141)

Intermetrics,       Amdahl 5890/180E (under        Same as Host
Inc.                MVS/XA Release 2.2)
Intermetrics MVS
Ada Compiler,
Version 7.0
(#910622W1.11170)

International       IBM 3083 (under VM/SP HPO      Same as Host
Business Machines   Release 5.0)
Corporation
IBM Ada/370,
Version 1.1.0
(#901128W1.11091)

*Validated by Registration
International       IBM 3090 (under VM/ESA         Same as Host
Business Machines   Release 1.0 ESA Feature)
Corporation
IBM Ada/370,
Version 1.1.0
(BASE
#901128W1.11091)

*Validated by Registration
International       IBM 3084 (under VM/ESA         Same as Host
Business Machines   Release 1.0 370 Feature)
Corporation
IBM Ada/370,
Version 1.1.0
(BASE
#901128W1.11091)

*Validated by Registration
International       IBM 3090 (under VM/XA          Same as Host
Business Machines   Release 2.1)
Corporation
IBM Ada/370,
Version 1.1.0
(BASE
#901128W1.11091)

*Validated by Registration
International       IBM 3090 (under VM/SP          Same as Host
Business Machines   Release 6.0 HPO 60)
Corporation
IBM Ada/370,
Version 1.1.0
(BASE
#901128W1.11091)

International       IBM 4381 (under MVS/XA         Same as Host
Business Machines   Release 3.8)
Corporation
IBM Ada/370,
Version 1.1.0
(#901128W1.11092)

*Validated by Registration
International       IBM 3090 (under MVS/ESA        Same as Host
Business Machines   Release 4.1)
Corporation
IBM Ada/370,
Version 1.1.0
(BASE
#901128W1.11092)

International       IBM 3083 (under VM/SP HPO      Same as Host
Business Machines   Release 5.0)
Corporation
IBM Ada/370,
Version 1.2.0
(optimized)
(#910612W1.11166)

International       IBM 4381 (under MVS/ESA        Same as Host
Business Machines   Release 3.1)
Corporation
IBM Ada/370,
Version 1.2.0
(optimized)
(#910612W1.11167)

International       IBM 3083 (under VM/SP HPO      Same as Host
Business Machines   Release 5.0)
Corporation
IBM Ada/370,
Version 1.2.0
(unoptimized)
(#910612W1.11168)

*Validated by Registration
International       IBM 3090 (under VM/SP HPO      IBM 937x, 43xx, 308x, 3090 &
Business Machines   6.0)                           ES/9000 processors (under
Corporation                                        VM/SP HPO 6.0)
IBM Ada/370,
Version 1.2.0
(BASE
#910612W1.11168)

*Validated by Registration
International       IBM 3090 (under VM/XA 2.1)     IBM 937x, 43xx, 308x, 3090 &
Business Machines                                  ES/9000 processors (under
Corporation                                        VM/XA 2.1)
IBM Ada/370,
Version 1.2.0
(BASE
#910612W1.11168)

*Validated by Registration
International       IBM 3084 (under VM/ESA         IBM 937x, 43xx, 308x, 3090 &
Business Machines   1.1.0 (370 Feature))           ES/9000 processors (under
Corporation                                        VM/ESA 1.1.0 (370 Feature)))
IBM Ada/370,
Version 1.2.0
(BASE
#910612W1.11168)

*Validated by Registration
International       IBM 3090 (under VM/ESA         IBM 937x, 43xx, 308x, 3090 &
Business Machines   1.1.0 (ESA Feature))           ES/9000 processors (under
Corporation                                        VM/ESA 1.1.0 (ESA Feature))
IBM Ada/370,
Version 1.2.0
(BASE
#910612W1.11168)

*Validated by Registration
International       IBM 3090 (under VM/ESA         IBM 937x, 43xx, 308x, 3090 &
Business Machines   1.1.1)                         ES/9000 processors (under
Corporation                                        VM/ESA 1.1.1)
IBM Ada/370,
Version 1.2.0
(BASE
#910612W1.11168)

*Validated by Registration
International       IBM 3084 (under VM/ESA         IBM 937x, 43xx, 308x 8090, &
Business Machines   1.1.0(370 Feature)); IBM       ES/9000 processors (under
Corporation         3090 (under VM/ESA             same OS as Host)
IBM Ada/370,        1.1.0(ESA Feature), VM/ESA
VM/CMS Ada          1.1.1, VM/XA 2.1, & VM/SP
Compiler, Version   HPO 5.0 & 6.0)
1.4.0
(BASE
#910612W1.11168)

International       IBM 4381 (under MVS/ESA        Same as Host
Business Machines   Release 3.1)
Corporation
IBM Ada/370,
Version 1.2.0
(unoptimized)
(#910612W1.11169)

*Validated by Registration
International       IBM 3090 (under MVS/SP XA      IBM 937x, 43xx, 308x, 3090 &
Business Machines   2.2)                           ES/9000 processors (under
Corporation                                        MVS/SP XA 2.2)
IBM Ada/370,
Version 1.2.0 &
1.3.0
(BASE
#910612W1.11169)

*Validated by Registration
International       IBM 3090 (under MVS/ESA        IBM 937x, 43xx, 308x, 3090 &
Business Machines   Release 4.1.0)                 ES/9000 processors (MVS/ESA
Corporation                                        Release 4.1.0)
IBM Ada/370,
Version 1.2.0
(BASE
#910612W1.11169)

*Validated by Registration
International       IBM 3090 (under MVS/ESA        IBM 937x, 43xx, 308x, 3090 &
Business Machines   Release 4.2.0)                 ES/9000 processors (MVS/ESA
Corporation                                        Release 4.2.0)
IBM Ada/370,
Version 1.2.0
(BASE
#910612W1.11169)

*Validated by Registration
International       IBM 3090 (under MVS/ESA        IBM 937x, 43xx, 308x, 3090,
Business Machines   4.1.0 & 4.2.0)                 & ES/9000 computers (under
Corporation                                        same OS as Host)
IBM Ada/370,
Version 1.3.0
(BASE
#910612W1.11169)

*Validated by Registration
International       IBM 4381 (under MVS/ESA        IBM 937x, 43xx, 308x, 3090,
Business Machines   3.1.0)                         & ES/9000 computers (under
Corporation                                        same OS as Host)
IBM Ada/370,
Version 1.3.0
(BASE
#910612W1.11169)

*Validated by Registration
International       IBM 3090 (under MVS/ESA        IBM 937x, 43xx, 308x 8090, &
Business Machines   3.1.0, 4.1.0, & 4.2.0, &       ES/9000 processors (under
Corporation         MVS/SP XA 2.2)                 same OS as Host)
IBM Ada/370 MVS
Compiler, Version
1.4.0
(BASE
#910612W1.11169)

International       ICL Series 39 Level 80         Same as Host
Computers Limited   (under VME with VMEB
VME Ada Compiler    Environment Option Version
VA3,00              SV291)
(#911003N1.11222)

International       ICL Series 39 Level 80         Same as Host
Computers Limited   (under VME with VMEB
VME Ada Compiler    Environment Option Version
VA3.10              SV292)
(#921008N1.11293)

Irvine Compiler     HP 9000 Model 720 (under       Same as Host
Corporation         HP-UX Release 8.01)
ICC Ada v7.0.0
(#910510W1.11145)

*Validated by Registration
Irvine Compiler     HP 9000 Series 700 & 800,      Any Host
Corporation         all Models (under HP-UX
ICC Ada for HP      Version A.B8.05 (release
9000 Series         8.05))
700/800, Version
7.4
(BASE
#910510W1.11145)

*Validated by Registration
Irvine Compiler     HP 9000 Series 700 & 800,      Same as Host
Corporation         all models (under HP-UX
ICC Ada for HP      Versions 8.0 & 9.0, all
9000 Series         releases; and HP-UX BLS
700/800 7.4         Version 8.0, all releases)
(BASE
#910510W1.11145)

Irvine Compiler     Sun 3/50 (under SunOS V4.0)    Same as Host
Corporation
ICC Ada v7.0.0
(#910510W1.11146)

*Validated by Registration
Irvine Compiler     Sun Microsystems Sun-3         Any Host
Corporation         computer family (under
ICC Ada for Sun3,   SunOS 4.0 & 4.1)
Version 7.4
(BASE
#910510W1.11146)

Irvine Compiler     HP 9000 Model 400 (under       Same as Host
Corporation         HP-UX Release 7.03)
ICC Ada v7.0.0
(#910510W1.11147)

*Validated by Registration
Irvine Compiler     HP 9000 Series 300 & 400,      Any Host
Corporation         all Models (under HP-UX
ICC Ada for HP      Version A.B8.05 (release
9000 Series         8.05))
300/400, Version
7.4
(BASE
#910510W1.11147)

Irvine Compiler     VAXstation 3100 Model M38      Intel i80960MC (bare
Corporation         (under VMS 5.3-1)              machine)
ICC Ada v7.0.0
(#910510W1.11148)

*Validated by Registration
Irvine Compiler     DEC VAX-11, VAXserver,         Intel i960MC with or without
Corporation         VAXstation, MicroVAX, VAX      ICE960 on an Intel
ICC Ada for         4000, VAX 6000, VAX 8000,      EXV80960MC board; any
i960MC, Version     VAX 9000, & VAX 10000          single-board computer that
7.4                 series of computers (under     uses the i960 chip; Intel
(BASE               VMS 5.4)                       i960 simulator (executing on
#910510W1.11148)                                   the Host) (bare machine)

*Validated by Registration
Irvine Compiler     HP 9000 Series 300 & 400,      Intel i960MC, with/without
Corporation         all models (under HP-UX        ICE 960, on an EXV80960MC
ICC Ada for         Version 8.0, all releases)     board; any single-board
i960MC 7.4                                         computer using the i960
(BASE                                              chip; and Intel i060
#910510W1.11148)                                   simulator, executing on the
                                                   Host (bare machines)

*Validated by Registration
Irvine Compiler     HP 9000 Series 700, all        Intel i960MC, with/without
Corporation         models (under HP-UX Version    ICE 960, on an EXV80960MC
ICC Ada for         8.0, all releases)             board; any single-board
i960MC 7.4                                         computer using the i960
(BASE                                              chip; and Intel i060
#910510W1.11148)                                   simulator, executing on the
                                                   Host (bare machines)

*Validated by Registration
Irvine Compiler     Sun Microsystems Sun-3         Intel i960MC, with/without
Corporation         computers, all models          ICE 960, on an EXV80960MC
ICC Ada for         (under SunOS version 4.1.2     board; any single-board
i960MC 7.4          & Solaris version 1.0.1,       computer using the i960
(BASE               all releases)                  chip; and Intel i060
#910510W1.11148)                                   simulator, executing on the
                                                   Host (bare machines)

*Validated by Registration
Irvine Compiler     Sun Microsystems Sun-4,        Intel i960MC, with/without
Corporation         SPARCstation, & SPARCserver    ICE 960, on an EXV80960MC
ICC Ada for         computers, all models          board; any single-board
i960MC 7.4          (under SunOS version 4.1.2     computer using the i960
(BASE               & Solaris version 1.0.1,       chip; and Intel i060
#910510W1.11148)    all releases)                  simulator, executing on the
                                                   Host (bare machines)

Irvine Compiler     VAXstation 3100 Model M38      Intel i960MX in Hughes DMV
Corporation         (under VMS Version 5.3-1)      running in tagged mode (bare
ICC Ada v7.4.0                                     machine, using CHKSYS kernel
(#920520I1.11260)                                  version 104)

*Validated by Registration
Irvine Compiler     DEC VAX-11, VAXserver,         Intel i960MM & i960MX on a
Corporation         VAXstation, MicroVAX, VAX      TRONIX PI960MX-JXV JIAWG
ICC Ada for         4000, VAX 6000, VAX 8000,      Execution Vehicle board; any
i960MX and          VAX 9000, & VAX 10000          single-board computer that
i960MM, Version     Series of computers (under     uses the i960MM/MX
7.4                 VMS 5.4)                       superscalar chip; Intel i960
(BASE                                              simulator (executing on the
#920520I1.11260)                                   Host) (bare machine)

*Validated by Registration
Irvine Compiler     HP 9000 Series 300 & 400,      Intel i960MM & i960MX,
Corporation         all models (under HP-UX        with/without ICE 960, on a
ICC Ada for         Version 8.0, all releases)     TRONIX PI960MX-JXV JIAWG
i960MM and i960MX                                  Execution Vehicle board; any
Version 7.4                                        single-board computer using
(BASE                                              the i960MM/MX superscalar
#920520I1.11260)                                   chip; and Intel i060
                                                   simulator, executing on the
                                                   Host (bare machines)

*Validated by Registration
Irvine Compiler     HP 9000 Series 700, all        Intel i960MM & i960MX,
Corporation         models (under HP-UX Version    with/without ICE 960, on a
ICC Ada for         8.0, all releases)             TRONIX PI960MX-JXV JIAWG
i960MM and i960MX                                  Execution Vehicle board; any
Version 7.4                                        single-board computer using
(BASE                                              the i960MM/MX superscalar
#920520I1.11260)                                   chip; and Intel i060
                                                   simulator, executing on the
                                                   Host (bare machines)

*Validated by Registration
Irvine Compiler     Sun Microsystems Sun-3         Intel i960MM & i960MX,
Corporation         computers, all models          with/without ICE 960, on a
ICC Ada for         (under SunOS version 4.1.2     TRONIX PI960MX-JXV JIAWG
i960MM and i960MX   & Solaris version 1.0.1,       Execution Vehicle board; any
Version 7.4         all releases)                  single-board computer using
(BASE                                              the i960MM/MX superscalar
#920520I1.11260)                                   chip; and Intel i060
                                                   simulator, executing on the
                                                   Host (bare machines)

*Validated by Registration
Irvine Compiler     Sun Microsystems Sun-4,        Intel i960MM & i960MX,
Corporation         SPARCstation, & SPARCserver    with/without ICE 960, on a
ICC Ada for         computers, all models          TRONIX PI960MX-JXV JIAWG
i960MM and i960MX   (under SunOS version 4.1.2     Execution Vehicle board; any
Version 7.4         & Solaris version 1.0.1,       single-board computer using
(BASE               all releases)                  the i960MM/MX superscalar
#920520I1.11260)                                   chip; and Intel i060
                                                   simulator, executing on the
                                                   Host (bare machines)

Meridian Software   Sun-3/260 (under SunOS,        Same as Host
Systems, Inc.       Version 4.1)
Meridian Ada,
Version 4.1
(#900909W1.11031)

Meridian Software   Sun-4/110 (under SunOS,        Same as Host
Systems, Inc.       Version 4.1)
Meridian Ada,
Version 4.1
(#900909W1.11032)

*Validated by Registration
Meridian Software   Sun Microsystems Sun-4,        Any Host
Systems, Inc.       SPARCserver & SPARCstation
Meridian Ada,       computer families (under
Version 4.1         SunOS Versions 4.1 & 4.1.1)
(BASE
#900909W1.11032)

Meridian Software   DECstation 3100 (under         Same as Host
Systems, Inc.       Ultrix, Version 3.0)
Meridian Ada,
Version 4.1
(#900909W1.11033)

*Validated by Registration
Meridian Software   DECstation 2100, 3100 &        Any Host
Systems, Inc.       5000 (under Ultrix 3.0)
Meridian Ada,
Version 4.1
(BASE
#900909W1.11033)

Meridian Software   IBM PS/2 Model 60 (with        Same as Host
Systems, Inc.       Floating-Point
Meridian Ada,       Co-Processor) (under IBM
Version 4.1         PC-DOS 3.30)
(#900909W1.11034)

*Validated by Registration
Meridian Software   Any Computer System            Any Host
Systems, Inc.       comprising: cpu: any that
Meridian Ada,       executes the Intel 80286,
Version 4.1         80386, or 80486 instruction
(BASE               set, fpu: Intel 80287,
#900909W1.11034)    80387, or equivalent, as
                    appropriate, memory: 640
                    KByte RAM minimum, disk: 20
                    MByte hard drive, OS: IBM
                    PC-DOS 3.30

*Validated by Registration
Meridian Software   Any Computer System            Any Host
Systems, Inc.       Comprising: Cpu: any that
Meridian Ada,       executes the Intel 80286,
Version 4.1.1       80386, or 80486 instruction
(BASE               set; Fpu: Intel 80287,
#900909W1.11034)    80387, or equivalent, as
                    appropriate; Memory: 640 or
                    greater KByte RAM; Disk: 20
                    MByte hard drive (under IBM
                    PC-DOS 3.30)

*Validated by Registration
Meridian Software   Any Computer System            Any Host
Systems, Inc.       Comprising: cpu:  any that
Meridian Ada,       executes the Intel 80286,
Version 4.1.4       80386, or 80486 instruction
(BASE               set; fpu:  Intel 80287,
#900909W1.11034)    80387, or equivalent, as
                    appropriate; memory:  640
                    KByte RAM; disk:  20 MByte
                    hard drive (under IBM
                    PC-DOS 3.30)

Meridian Software   IBM PS/2 Model 30 (with        Same as Host
Systems, Inc.       Floating-Point
Meridian Ada,       Co-Processor) (under IBM
Version 4.1         PC-DOS 3.30)
(#900909W1.11035)

*Validated by Registration
Meridian Software   Any Computer System            Any Host
Systems, Inc.       comprising: cpu: any that
Meridian Ada,       executes the Intel 8086
Version 4.1         instruction set, fpu: Intel
(BASE               8087 or equivalent, as
#900909W1.11035)    appropriate, memory: 640
                    KByte RAM minimum, disk: 20
                    MByte hard drive, OS: IBM
                    PC-DOS 3.30

*Validated by Registration
Meridian Software   Any Computer System            Any Host
Systems, Inc.       Comprising: Cpu: any that
Meridian Ada,       executes the Intel 8086
Version 4.1.1       instruction set; Fpu: Intel
(BASE               8087 or equivalent, as
#900909W1.11035)    appropriate; Memory: 640 or
                    greater KByte RAM; Disk: 20
                    MByte hard drive (under IBM
                    PC-DOS 3.30)

*Validated by Registration
Meridian Software   Any Computer System            Any Host
Systems, Inc.       Comprising: cpu:  any that
Meridian Ada,       executes the Intel 8086
Version 4.1.4       instruction set; fpu: 
(BASE               Intel 8087 or equivalent,
#900909W1.11035)    as appropriate; memory: 
                    640 KByte RAM; disk:  20
                    MByte hard drive (under IBM
                    PC-DOS 3.30)

Meridian Software   ITT XTRA/286 (with             Same as Host
Systems, Inc.       Floating-Point
Meridian Ada,       Co-Processor) (under MS-DOS
Version 4.1         3.20/OS286)
(#900909W1.11036)

*Validated by Registration
Meridian Software   Any Computer System            Any Host
Systems, Inc.       comprising: cpu: any that
Meridian Ada,       executes the Intel 80286,
Version 4.1         80386, or 80486 instruction
(BASE               set, fpu: Intel 80287,
#900909W1.11036)    80387, or equivalent, as
                    appropriate, memory: 1.5
                    MByte RAM minimum, disk: 20
                    MByte hard drive, OS:
                    MS-DOS 3.20/OS286

*Validated by Registration
Meridian Software   Any Computer System            Any Host
Systems, Inc.       Comprising: Cpu: any that
Meridian Ada,       executes the Intel 80286,
Version 4.1.1       80386, or 80486 instruction
(BASE               set; Fpu: Intel 80287,
#900909W1.11036)    80387, or equivalent, as
                    appropriate; Memory: 1.5 or
                    greater MByte RAM; Disk: 20
                    MByte hard drive (under
                    MS-DOS 3.30/OS286)

*Validated by Registration
Meridian Software   Any Computer System            Any Host
Systems, Inc.       Comprising: cpu:  any that
Meridian Ada,       executes the Intel 80286,
Version 4.1.4       80386, or 80486 instruction
(BASE               set; fpu:  Intel 80287,
#900909W1.11036)    80387, or equivalent, as
                    appropriate; memory:  1.5
                    MByte RAM; disk:  20 MByte
                    hard drive (under MS-DOS
                    3.20/OS286)

Meridian Software   80 Data 386/25 (under          Same as Host
Systems, Inc.       386/ix 1.0.6)
Meridian Ada,
Version 4.1
(#900909W1.11037)

*Validated by Registration
Meridian Software   Any Computer System            Any Host machine running the
Systems, Inc.       comprising: cpu: any that      same OS
Meridian Ada,       executes the Intel 80386 or
Version 4.1         80486 instruction set, fpu:
(BASE               optional Intel 80387 or
#900909W1.11037)    equivalent, for 80386 cpu,
                    memory: 2 MByte RAM
                    minimum, disk: 40 MByte
                    hard drive, OS: SCO Unix
                    3.2 or Interactive 386/ix
                    1.0.6

*Validated by Registration
Meridian Software   Sequent Symmetry 2000/40,      Any Host
Systems, Inc.       /200, /400 & /700 (under
Meridian Ada,       DYNIX/ptx V1.2.0)
Version 4.1
(BASE
#900909W1.11037)

*Validated by Registration
Meridian Software   Any Computer System            Any Host with the same OS
Systems, Inc.       Comprising: Cpu: any that
Meridian Ada,       executes the Intel 80386 or
Version 4.1.1       80486 instruction set; Fpu:
(BASE               Intel 80387 or equivalent,
#900909W1.11037)    for 80386 cpu; Memory: 2 or
                    greater MByte RAM; Disk: 40
                    MByte hard drive (under SCO
                    Unix 3.2 or INTERACTIVE
                    UNIX System V/386 Release
                    3.2)

Meridian Software   Apple Macintosh II (under      Same as Host
Systems, Inc.       System 6.0.3)
Meridian Ada,
Version 4.1
(#900909W1.11038)

*Validated by Registration
Meridian Software   Apple Macintosh SE 30          Same as Host
Systems, Inc.       (under System 6.0.3)
Meridian Ada,
Version 4.1
(BASE
#900909W1.11038)

Meridian Software   Apple Macintosh II (under      Same as Host
Systems, Inc.       A/UX 2.0)
Meridian Ada,
Version 4.1
(#901108W1.11060)

Meridian Software   Stardent Titan P3 (under       Same as Host
Systems, Inc.       Stardent/Unix 3.0)
Meridian Ada,
Version 4.1
(#901108W1.11061)

Meridian Software   MicroVAX 3100 (under Ultrix    Same as Host
Systems, Inc.       3.1)
Meridian Ada,
Version 4.1
(#901108W1.11062)

Meridian Software   MicroVAX II (under VMS 5.2)    Same as Host
Systems, Inc.
Meridian Ada,
Version 4.1
(#901108W1.11063)

Meridian Software   IBM PS/2 Model 80 (with        Same as Host
Systems, Inc.       Floating Point
Meridian Ada,       Co-Processor) (under IBM
Version 4.1.1       PC-DOS 3.30/OS386)
(#911002W1.11218)

*Validated by Registration
Meridian Software   Any Computer System            Any Host
Systems, Inc.       Comprising: cpu:  any that
Meridian Ada,       executes the Intel 80386 or
Version 4.1.4       80486 instruction set; fpu: 
(BASE               Intel 80387 or equivalent,
#911002W1.11218)    as appropriate; memory: 
                    1.5 MByte RAM; disk:  20
                    MByte hard drive (under IBM
                    PC-DOS 3.30/OS386)

Meridian Software   NeXTstation (under System      Same as Host
Systems, Inc.       Release 2.0)
Meridian Ada,
Version 4.1
(#911002W1.11219)

Meridian Software   SGI PowerSeries 4D/310S        Mercury MC860 VM (under
Systems, Inc.       (under IRIX Sys V 3.3.2)       MC/OS, Version 2.0)
Meridian Ada,
Version 4.1
(#911002W1.11220)

*Validated by Registration
Meridian Software   SGI PowerSeries 4D/310S        Mercury MC860VB & MC860VM
Systems, Inc.       (under IRIX Sys V 3.3.2)       (under MC/OS, Version 2.0)
Meridian Ada,
Version 4.1
(BASE
#911002W1.11220)

*Validated by Registration
Meridian Software   SGI PowerSeries 4D/310S        Mercury MC860VS (under
Systems, Inc.       (under IRIX Sys V 3.3.2)       MC/OS, Version 2.VS)
Meridian Ada,
Version 4.1
(BASE
#911002W1.11220)

Meridian Software   Sun-4/110 (under SunOS,        Mercury MC860 VM (under
Systems, Inc.       Version 4.1)                   MC/OS, Version 2.0)
Meridian Ada,
Version 4.1
(#911002W1.11221)

*Validated by Registration
Meridian Software   Sun Microsystems Sun-4/110,    Mercury MC860VB & MC860VM
Systems, Inc.       /150, /260 & /280;             (under MC/OS, Version 2.0)
Meridian Ada,       SPARCserver 330, 370, 390,     and Mercury MC860VS (under
Version 4.1         470 & 490; and SPARCstation    MC/OS, Version 2.VS)
(BASE               2, IPC & IPX (under SunOS
#911002W1.11221)    Versions 4.1 & 4.1.1) and
                    SPARCengine 1E (under SunOS
                    Version 4.1e)

Meridian Software   Sequoia Series 400 (under      Same as Host
Systems, Inc.       Topix, Version 6.5)
Meridian Ada,
Version 4.1
(#911216W1.11232)

Meridian Software   Intergraph Interpro 2400       Same as Host
Systems, Inc.       (under CLIX System 5,
Meridian Ada,       Release 3.1)
Version 4.1.3
(#920915W1.11266)

*Validated by Registration
Meridian Software   InterGraph InterPro Series     Any Host
Systems, Inc.       C300- & C400-based models
Meridian Ada,       (under CLIX, System 5
Version 4.1.3       Release 3.1)
(BASE
#920915W1.11266)

Meridian Software   Essence 836 (under DOS 5.0,    Same as Host
Systems, Inc.       running Microsoft Windows
Meridian Ada,       3.0)
Version 4.1.3
(#920915W1.11267)

Meridian Software   BBN TC2000 (under nX 3.0.1)    Same as Host
Systems, Inc.
Meridian Ada,
Version 4.1.3
(#920915W1.11268)

Meridian Software   BBN TC2000 (under nX 3.0.1)    BBN TC2000 (under pSOS+/88k)
Systems, Inc.
Meridian Ada,
Version 4.1.3
(#920915W1.11269)

Meridian Software   HP 9000/827 (under HP-UX       Same as Host
Systems, Inc.       8.02)
Meridian Ada,
Version 4.1.3
(#921202W1.11301)

Meridian Software   Motorola VME 167-68040         Same as Host
Systems, Inc.       (under OS/9 68K, v2.4)
Meridian Ada,
Version 4.1.3
(#930401W1.11313)

Meridian Software   Essence 486 (under MS-DOS      ADSP-21020 (bare machine)
Systems, Inc.       5.0)
Meridian Ada,
Version 4.1.3
(#930401W1.11314)

MIPS Computer       MIPS M/2000 (under RISC/os     R3200-6 CPU board (bare
Systems             4.50)                          machine)
MIPS ASAPP 3.0
(#900619W1.11010)

MIPS Computer       MIPS M/2000 (under RISC/os     Same as Host
Systems             4.50)
MIPS Ada 3.0
(#900619W1.11011)

NEC Corporation     NEC EWS4800/220 (under         Same as Host
NEC Ada Compiler    EWS-UX/V (Release 4.0)
System for          R2.1)
EWS-UX/V (Release
4.0), Version
Release 2.1(4.6)
(#910918S1.11216)

NEC Corporation     NEC EWS4800/60 (under          NEC MV4000 (under RX-UX832
NEC Ada Compiler    EWS-UX/V R8.1)                 V1.6)
System for
EWS-UX/V to
V70/RX-UX832,
Version 1.0
(#910918S1.11217)

*Validated by Registration
NEC Corporation     All RISC (MIPS R3000- &        NEC MV4000 (under RX-UX832
NEC Ada Compiler    R4000-based) models of the     V1.6)
System for          EWS4800 series (under
EWS-UX/V (Rel       EWS-UX/V (4.0) R2.1)
4.0) to
V70/RX-UX832,
Version 1.0
(BASE
#910918S1.11217)

North China         MicroVAX II (under ULTRIX      Same as Host
Institute of        3.0)
Computing
Technology
C_Ada, Version
1.0
(#910902N1.11198)

Proprietary         VAX 8350 (under VMS Version    PSS Zoran ZR34325 Digital
Software Systems,   5.4)                           Signal Processor AdaRAID
Inc.                                               Version XK-01.000 (bare
PSS VAX/ZR34325                                    machine simulation,
Compiler Version                                   executing on the Host)
XB-01.000
(#920423I1.11250)

R.R. Software,      IBM PS/2 Model 80 (under       IBM PS/2 Model 80 (under MS
Inc.                Phar Lap/DOS 3.3)              DOS  3.3)
Janus/Ada 2.2.0
Phar Lap/DOS
(#901120W1.11088)

*Validated by Registration
R.R. Software,      Any Computer System            Any Computer System
Inc.                Comprising:  cpu: Intel        Comprising:  cpu: Intel
Janus/Ada 2.2.0     80386, fpu: optional,          80386, fpu: optional,
Phar Lap/DOS        memory: 4 MByte RAM, disk:     memory: 4 MByte RAM, disk:
(BASE               40 MByte hard drive (under     40 MByte hard drive (under
#901120W1.11088)    Phar Lap/DOS 3.3)              MS DOS 3.3)

*Validated by Registration
R.R. Software,      Any Computer System            Same as Host
Inc.                Comprising:  cpu:  any that
Janus/Ada 2.2.1     executes Intel 8086/8088
DOS                 instructions; fpu: 
(BASE               optional; memory:  640
#901120W1.11088)    KByte RAM; disk:  20 MByte
                    hard drive (under MS DOS
                    3.3)

*Validated by Registration
R.R. Software,      Any Computer System            Any Host
Inc.                Comprising: cpu:  any that
Janus/Ada 2.2.2     executes the Intel
DOS                 8086/8088 instruction set;
(BASE               fpu:  optional; memory: 
#901120W1.11088)    640 KByte RAM; disk:  20
                    MByte hard drive (under
                    MS-DOS 3.3)

*Validated by Registration
R.R. Software,      Any Computer System            Any Host (under MS-DOS 3.3)
Inc.                Comprising: cpu:  any that
Janus/Ada 2.2.2     executes the Intel 80386
386 to DOS          instruction set; fpu: 
(BASE               optional; memory:  2 MByte
#901120W1.11088)    RAM; disk:  40 MByte hard
                    drive (under Phar Lap /
                    MS-DOS 3.3)

R.R. Software,      Northgate 386/25 (under SCO    Same as Host
Inc.                Unix 3.2)
Janus/Ada 2.2.0
Unix
(#901129W1.11089)

*Validated by Registration
R.R. Software,      Any Computer System            Same as Host
Inc.                Comprising:  cpu: Intel
Janus/Ada 2.2.0     80386, fpu: optional,
UNIX                memory: 4 MByte RAM, disk:
(BASE               60 MByte hard drive (under
#901129W1.11089)    SCO Unix 3.2)

*Validated by Registration
R.R. Software,      Any Computer System            Any Host
Inc.                Comprising: cpu:  any that
Janus/Ada 2.2.2     executes the Intel 80386
UNIX                instruction set; fpu: 
(BASE               optional; memory:  4 MByte
#901129W1.11089)    RAM; disk:  40 MByte hard
                    drive (under SCO Unix 3.2)

Rational            R1000 Series 300 (under        Phillips PG2100 (OS-2000
M68020/OS-2000      Rational Environment           Release 2.0)
Cross-Development   Version D_12_24_0)
Facility, Version
7
(#901116W1.11081)

Rational            R1000 Series 300 (under        HP 9000 Model 370MH (under
M68020/Unix         Rational Environment           HP-UX Version 7.0)
Cross-Development   Version D_12_24_0)
Facility, Version
7
(#901116W1.11082)

Rational            R1000 Series 300 (under        Motorola MVME135 (68020)
M68020/Bare         Rational Environment           (bare machine)
Cross-Development   Version D_12_24_0)
Facility, Version
7
(#901116W1.11083)

Rational            R1000 Series 300 (under        Same as Host
Rational            Rational Environment
Environment,        Version D_12_24_0)
D_12_24_0
(#901116W1.11084)

Rockwell            VAX 8650 (under VMS,           CAPS/AAMP1 (bare machine)
International       Version 5.3-1)
Corporation
DDC-Based
Ada/CAPS
Compiler, Version
6.0
(#910306W1.11129)

*Validated by Registration
Rockwell            DEC VAX-11, VAXserver,         CAPS/AAMP1 (bare machine)
International       VAXstation, MicroVAX, VAX
Corporation         6000, VAX 8000 & VAX 9000
DDC-Based           Series of computers (under
Ada/CAPS            VMS Versions 5.3-1 & 5.4)
Compiler, Version
6.1
(BASE
#910306W1.11129)

Rockwell            VAXstation 3100 Model 30       CAPS/AAMP2 (bare machine)
International       (under VMS 5.4)
Corporation
DDC-Based
Ada/CAPS
Compiler, Version
6.0
(#910306W1.11130)

*Validated by Registration
Rockwell            DEC VAX-11, VAXserver,         CAPS/AAMP2 (bare machine)
International       VAXstation, MicroVAX, VAX
Corporation         6000, VAX 8000 & VAX 9000
DDC-Based           Series of computers (under
Ada/CAPS            VMS Versions 5.3-1 & 5.4)
Compiler, Version
6.1
(BASE
#910306W1.11130)

*Validated by Registration
Rockwell            DEC VAX-11, VAXserver,         CAPS/AAMP2 & CAPS/AAMP3
International       VAXstation, MicroVAX, VAX      (bare machines)
Corporation         4000, VAX 6000, VAX 8000,
DDC-Based           VAX 9000, & VAX 10000
Ada/CAPS Compiler   series of computers (under
System, Version     VMS 5.5-2)
6.3
(BASE
#910306W1.11130)

SD-Scicon UK Ltd    VAX Cluster (comprising        Motorola MVME133XT board
XD Ada MC68020,     VAXserver 3600, MicroVAX       (MC68020) (bare machine)
Version 1.2         2000 (2) & MicroVAX II
(#901007N1.11042)   machines) (under VMS
                    Version 5.3)

*Validated by Registration
SD-Scicon UK Ltd    VAX Cluster (comprising        Motorola MVME135-1 board
XD Ada MC68020      VAXserver 3600, MicroVAX       (MC68020) and Motorola
Version 1.2         2000 (2) & MicroVAX II         MVME147S-1 board (MC68030)
(BASE               machines) (under VMS 5.3)      (bare machines)
#901007N1.11042)

*Validated by Registration
SD-Scicon UK Ltd    VAX Cluster (comprising        Motorola MVME133XT board
XD Ada MC68020,     VAXserver 3600, MicroVAX       (MC68020) (bare machine)
Version 1.2A        2000 (2) & MicroVAX II
(BASE               machines) (under VMS 5.4)
#901007N1.11042)

*Validated by Registration
SD-Scicon UK Ltd    VAX Cluster (comprising        Motorola MVME135-1 (MC68020)
XD Ada MC68020      VAXserver 3600, MicroVAX       & MVME147S-1 (MC68030)
MVME135 &           2000 (2) & MicroVAX II         boards (bare machines)
MVME147, Version    machines) (under VMS 5.4)
1.2A
(BASE
#901007N1.11042)

*Validated by Registration
SD-Scicon UK Ltd    VAX Cluster (comprising        Motorola MVME135-1 board
XD Ada              VAXserver 3600, MicroVAX       (MC68020) (bare machine)
MC68020/EFA,        2000 (2) & MicroVAX II
Version 1.2A        machines) (under VMS 5.4)
(BASE
#901007N1.11042)

*Validated by Registration
SD-Scicon UK Ltd    VAX Cluster (comprising        Motorola M68340EVS
XD Ada CPU32        VAXserver 3600, MicroVAX       Evaluation System CPU32
Version 1.2         2000 (2), & MicroVAX II        (bare machine)
(BASE               machines) (under VMS 5.4)
#901007N1.11042)

*Validated by Registration
SD-Scicon UK Ltd    VAX Cluster (comprising        Motorola M68332EVS
XD Ada              VAXserver 3600, MicroVAX       Evaluation System CPU32
CPU32/MC68332       2000 (2), & MicroVAX II        (bare machine)
Version 1.2         machines) (under VMS 5.4)
(BASE
#901007N1.11042)

SD-Scicon UK Ltd    Local Area VAX Cluster         Fairchild F9450 on a SBC-50
XD Ada              (comprising VAXserver 3600,    board (MIL-STD-1750A) (bare
MIL-STD-1750A,      MicroVAX 2000 (2) &            machine)
Version 1.2         MicroVAX II machines)
(#901214N1.11080)   (under VMS 5.3)

SD-Scicon UK Ltd    Local Area VAX Cluster         Motorola MC68000 on an
XD Ada MC68000,     (comprising VAXserver 3600,    MVME117-3FP board (bare
Version 1.2         MicroVAX 2000 (2) &            machine)
(#910314N1.11134)   MicroVAX II machines)
                    (under VMS 5.4)

*Validated by Registration
SD-Scicon UK Ltd    Local Area VAX Cluster         Motorola MC68000 on an
XD Ada              (comprising VAXserver 3600,    MVME117-3FP board (bare
MC68000/EFA,        MicroVAX 2000 (2) &            machine)
Version 1.2         MicroVAX II machines)
(BASE               (under VMS 5.4)
#910314N1.11134)

SD-Scicon UK Ltd    Local Area VAX Cluster         Motorola MVME147S-1
XD Ada              (comprising VAXserver 3600,    (MC68030) (bare machine)
MC68020/ARTX,       MicroVAX 2000 (2) &
Version T1.2        MicroVAX II machines)
(#910911N1.11199)   (under VMS 5.4)

SD-Scicon UK Ltd    Local Area VAX Cluster         Motorola MVME165 (MC68040)
XD Ada MC68040,     (comprising VAXserver 3600,    (bare machine)
Version 1.2         MicroVAX 2000 (2) &
(#911128N1.11230)   MicroVAX II machines)
                    (under VMS 5.4)

*Validated by Registration
SD-Scicon UK Ltd    Local Area VAX Cluster         FORCE CPU-40 (MC68040) (bare
XD Ada              (comprising VAXserver 3600,    machine)
MC68040/FORCE       MicroVAX 2000 (2), &
CPU-40, Version     MicroVAX II machines)
1.2                 (under VMS 5.5)
(BASE
#911128N1.11230)

*Validated by Registration
SD-Scicon UK Ltd    Local Area VAX Cluster         Motorola MVME167 (68040)
XD Ada MC68040,     (comprising VAXserver 3600,    (bare machine)
Version 1.2         MicroVAX 2000 (2), &
(BASE               MicroVAX II machines)
#911128N1.11230)    (under VMS 5.5)

Siemens Nixdorf     SIEMENS NIXDORF 7.590G         Same as Host
Informations-       (under BS2000 V9.5)
systeme AG
SIEMENS NIXDORF
BS2000 Ada
Compiler V2.1
(#901119I1.11111)

*Validated by Registration
Siemens Nixdorf     SIEMENS NIXDORF 7.530,         Same as Host
Informations-       7.536, 7.541, 7.550, 7.551,
systeme AG          7.560, 7.561, 7.570, 7.571,
SIEMENS NIXDORF     7.580 & 7.590; 7.500-C30,
BS2000 Ada          -C40, -H60, -H90 & -H120
Compiler V2.1       (under BS2000 V9.5 & V10.0)
(BASE
#901119I1.11111)

Siemens Nixdorf     Siemens Nixdorf WX200          Same as Host
Informations-       (SINIX-ODT) (under
systeme AG          SINIX-ODT V1.0)
Ada (SINIX) V4.1
(#910711W1.11181)

*Validated by Registration
Siemens Nixdorf     Siemens Nixdorf WX200          Same as Host
Informations-       (SINIX-ODT) (under
systeme AG          SINIX-ODT V1.5)
Ada (SINIX) V4.1
(BASE
#910711W1.11181)

Siemens Nixdorf     Siemens Nixdorf MX300i         Same as Host
Informations-       (under SINIX Version V5.41)
systeme AG
Ada (SINIX) V4.1
(#920325I1.11249)

*Validated by Registration
Siemens Nixdorf     Siemens Nixdorf WX200 &        Each Host, self targeted
Informations-       MX500i (under SINIX Version
systeme AG          5.41)
Ada (SINIX) V4.1
(BASE
#920325I1.11249)

Siemens Nixdorf     Siemens Nixdorf RM600          Same as Host
Informations-       (under SINIX Version V5.41)
systeme AG
Ada (SINIX) V4.1
(#920922I1.11276)

*Validated by Registration
Siemens Nixdorf     Siemens Nixdorf RM400          Same as Host
Informations-       (under SINIX Version V5.41)
systeme AG
Ada (SINIX) V4.1
(BASE
#920922I1.11276)

Silicon Graphics    Iris-4D/380 (under IRIX        Same as Host
Computer Systems    Release 4D-3.3)
4D ADA 3.0
(#900703W1.11014)

Silicon Graphics    Iris-4D/220S (under IRIX       Same as Host
Computer Systems    Release 4D-3.3)
4D ADA 3.0
(#900703W1.11015)

Silicon Graphics    Iris-4D/25 (under IRIX         Same as Host
Computer Systems    Release 4D-3.3)
4D ADA 3.0
(#900703W1.11016)

Silicon Graphics,   SGI Indigo (under Irix         Same as Host
Inc.                V4.0)
VADS SGI-Irix,
SC4-ADA-4.0,
Version 6.1
(#910920W1.11203)

*Validated by Registration
Silicon Graphics,   IRIS Indigo, Personal IRIS     Any Host
Inc.                4D, IRIS 4D series of
VADS SGI-Irix,      computers (under Irix V4.0)
SC4-ADA-4.0,
Version 6.1
(BASE
#910920W1.11203)

Silicon Graphics,   SGI 4D/440 (under Irix         Same as Host
Inc.                V3.3)
VADS SGI-Irix,
SC4-ADA-4.0,
Version 6.1
(#910920W1.11204)

SKY Computers,      SGI Personal Iris W-4D25       SKYbolt 8116-V (under
Inc.                (under Irix System V 3.3)      SKYbolt kernel version 2.33)
Meridian Ada,
Version 4.1
(#910711W1.11183)

SKY Computers,      SPARCstation 1 (under SunOS    SKYstation 8117-P (under
Inc.                release 4.1)                   SKYstation kernel version
Meridian Ada,                                      2.33)
Version 4.1
(#910711W1.11185)

SKY Computers,      SGI Personal Iris W-4D25       Same as Host
Inc.                (under Irix System V 3.3)
Meridian Ada,
Version 4.1
(#910711W1.11189)

Stratus Computer,   Stratus XA/R20 (under FTX,     Same as Host
Inc.                2.0.1)
Stratus Ada,
Version 6.1
(#921015W1.11294)

*Validated by Registration
Sun Microsystems    Sun Microsystems Sun-4,        Any Host
Sun Microsystems    SPARCserver, & SPARCstation
Sun Ada, SunOS,     computer families;
ADE-1.0-4-4-21,     SPARCserver 600MP Series; &
Version 1.0         4600MP-64 (under SunOS
(BASE               Version 4.2 releases 4.1 &
#900510W1.11006)    4.1.2, as supported)

*Validated by Registration
Sun Microsystems    Sun Microsystems Sun-4,        Any Host
Sun Microsystems    SPARCserver, SPARCstation,
Sun Ada, SunOS,     & SPARCengine computer
ADE-1.1-4-4-21,     families; SPARCserver 600MP
Version 1.1         Series; & 4600MP-64 (under
(BASE               SunOS Version 4.2 release
#900510W1.11006)    4.1.2)

*Validated by Registration
Sun Microsystems    Sun Microsystems Sun-4,        Any Host
Sun Microsystems    SPARCserver, & SPARCstation
Sun Ada, SunOS,     computer families (under
ADE-1.1-4-4-21,     SunOS 4.1.3)
Versions 1.0 &
1.1
(BASE
#900510W1.11006)

Tartan, Inc.        VAXstation 3100 (under VMS     Texas Instruments TMS320C30
Tartan Ada          5.2)                           Application Board (bare
VMS/C30, Version                                   machine)
4.0
(#901210I1.11121)

*Validated by Registration
Tartan, Inc.        VAXstation 3100 (under VMS     Texas Instruments TMS320C30
Tartan Ada          5.2)                           Application Board (bare
VMS/C30, Version                                   machine)
4.1
(BASE
#901210I1.11121)

*Validated by Registration
Tartan, Inc.        VAXstation 3100 (under VMS     Texas Instruments TMS320C30
Tartan Ada          5.2)                           Application Board, NAVY
VMS/C30, Version                                   SEM-D Key Code ADSP (bare
4.1.1                                              machines)
(BASE
#901210I1.11121)

*Validated by Registration
Tartan, Inc.        VAXstation 3100 (under VMS     Texas Instruments TMS320C30
Tartan Ada          5.2)                           (bare machine)
VMS/C30/IPS,
Version 4.1.2
(BASE
#901210I1.11121)

Tartan, Inc.        Sun 3/60 (under SunOS          Intel ICE960/25 on an Intel
Tartan Ada          Version 4.0.3)                 EXV80960MC board (bare
Sun/960MC,                                         machine)
Version 4.0
(#901210I1.11122)

Tartan, Inc.        Sun 3/60 (under SunOS          Same as Host
Tartan Ada          Version 4.0.3)
Sun/Sun, Version
4.0
(#901211I1.11118)

*Validated by Registration
Tartan, Inc.        Sun 3/60 (under SunOS          Same as Host
Tartan Ada          Version 4.0.3)
Sun/Sun, Version
4.1
(BASE
#901211I1.11118)

*Validated by Registration
Tartan, Inc.        Sun 3/60 (under SunOS          Same as Host
Tartan Ada          Version 4.0.3)
Sun/Sun, Version
4.2
(BASE
#901211I1.11118)

Tartan, Inc.        VAXstation 3100 (under VMS     Intel ICE960/25 on an Intel
Tartan Ada          5.2)                           EXV80960MC board (bare
VMS/960MC,                                         machine)
Version 4.0
(#901212I1.11120)

*Validated by Registration
Tartan, Inc.        VAXstation 3100 (under VMS     Intel EXV80960MC board, &
Tartan Ada          5.2)                           Intel ICE960/25 on an Intel
VMS/960MC,                                         EXV80960MC board (bare
Version 4.1                                        machines)
(BASE
#901212I1.11120)

*Validated by Registration
Tartan, Inc.        VAXstation 3100 (under VMS     Intel ICE960/25 on an Intel
Tartan Ada          5.2)                           EXV80960MC board (bare
VMS/960MC,                                         machine)
Version 4.2.1
(BASE
#901212I1.11120)

*Validated by Registration
Tartan, Inc.        VAXstation 3100 (under VMS     Intel EXV80960MC board (bare
Tartan Ada          5.2)                           machine)
VMS/960MC,
Version 4.2.1
(BASE
#901212I1.11120)

*Validated by Registration
Tartan, Inc.        VAXstation 3100 (under VMS     Intel EXV80960MC board (bare
Tartan Ada          5.2)                           machine)
VMS/960MC,
Version 4.2.2
(BASE
#901212I1.11120)

Tartan, Inc.        Sun 3/50 (under SunOS          Texas Instruments TMS320C30
Tartan Ada          Version 4.0.3)                 Application Board (bare
Sun/C30 Version                                    machine)
4.0
(#901212I1.11123)

*Validated by Registration
Tartan, Inc.        Sun 3/50 (under SunOS          Texas Instruments TMS320C30
Tartan Ada          Version 4.0.3)                 Application Board (bare
Sun/C30, Version                                   machine)
4.1.1
(BASE
#901212I1.11123)

Tartan, Inc.        VAXstation 3200 (under VMS     Texas Instruments STL VHSIC
Tartan Ada          5.2)                           1750A (bare machine)
VMS/1750A,
Version 4.0
(#901213I1.11119)

*Validated by Registration
Tartan, Inc.        VAXstation 3200 (under VMS     Texas Instruments STL VHSIC
Tartan Ada          5.2)                           1750A (bare machine)
VMS/1750A,
Version 4.1
(BASE
#901213I1.11119)

Tartan, Inc.        VAXstation 3100 (under VMS     Motorola MVME134 (MC68020)
Tartan Ada          5.2)                           (bare machine)
VMS/680X0,
Version 4.1
(#910613I1.11171)

*Validated by Registration
Tartan, Inc.        VAXstation 3100 (under VMS     Motorola MVME134 (MC68020),
Tartan Ada          5.2)                           MVME143 (MC68030), & MVME165
VMS/680X0,                                         (MC68040) (bare machines)
Version 4.1.1
(BASE
#910613I1.11171)

*Validated by Registration
Tartan, Inc.        VAXstation 3100 (under VMS     Motorola MVME134 (MC68020)
Tartan Ada          5.2)                           (bare machine)
VMS/680X0/IPS,
Version 4.1.2
(BASE
#910613I1.11171)

Tartan, Inc.        SPARCstation ELC (under        Texas Instruments TMS320C30
Tartan Ada SPARC    SunOS version 4.1.1)           Application Board (bare
C30, Version 4.2                                   machine)
(#920313I1.11244)

Tartan, Inc.        SPARCstation ELC (under        Fairchild F9450 on an SBC-50
Tartan Ada SPARC    SunOS version 4.1.1)           board (MIL-STD-1750A) (bare
1750a, Version                                     machine)
4.2
(#920313I1.11245)

Tartan, Inc.        SPARCstation ELC (under        Motorola MVME134 (MC68020)
Tartan Ada SPARC    SunOS version 4.1.1)           (bare machine)
680X0, Version
4.2
(#920313I1.11246)

Tartan, Inc.        SPARCstation ELC (under        Intel EXV80960MC board (bare
Tartan Ada SPARC    SunOS version 4.1.1)           machine)
960mc, Version
4.2
(#920313I1.11247)

*Validated by Registration
Tartan, Inc.        SPARCstation ELC (under        Intel EXV80960MC board (bare
Tartan Ada SPARC    SunOS Version 4.1.1)           machine)
960mc, Version
4.2.2
(BASE
#920313I1.11247)

*Validated by Registration
Tartan, Inc.        IBM RISC System/6000 Model     Intel EXV80960MC board (bare
Tartan Ada          320H (under AIX Version        machine)
RS6000/960mc,       3.2)
Version 4.2.2
(BASE
#920313I1.11247)

Tartan, Inc.        VAXstation 4000 Model 60       Texas Instruments TMS320C40
Tartan Ada          (under VMS 5.5)                Parallel Processing
VMS/C40 v4.2.1                                     Development System (bare
(#921030I1.11296)                                  machine)

TeleSoft            Sun-3/280 (under Sun UNIX      Same as Host
TeleGen2 Sun-3      4.2, Release 4.0.3)
Ada Development
System, Version
4.01
(#900525I1.11012)

TeleSoft            Sun-4/280 (under Sun UNIX      Same as Host
TeleGen2 Ada Host   4.2, Release 4.1)
Development
System, Version
4.1, for
SPARCSystems
(#901128W1.11090)

*Validated by Registration
TeleSoft            Sun Microsystems Sun-4,        Any Host
TeleGen2 Ada Host   SPARCserver, SPARCstation,
Development         & SPARCengine computer
System for          families (under SunOS 4.2,
SPARCSystems,       release 4.1)
Version 4.1
(BASE
#901128W1.11090)

*Validated by Registration
TeleSoft            Solbourne Series 5 & 5E;       Any Host
TeleGen2 Ada Host   and S4000 (under OS/MP 4.1)
Development
System for
SPARCSystems,
Version 4.1
(BASE
#901128W1.11090)

*Validated by Registration
TeleSoft            Sun Microsystems Sun-4,        Any Host
TeleGen2 Ada Host   SPARCserver, & SPARCstation
Development         computer families (under
System for          Solaris 2.1)
SPARCSystems,
Version 4.1.1
(BASE
#901128W1.11090)

TeleSoft            MicroVAX 3800 (under           Motorola MVME133A-20
TeleGen2 Ada        VAX/VMS Version 5.2)           (MC68020) (bare machine)
Cross Development
System, Version
4.1, for VAX/VMS
to 68K
(#910121I1.11124)

*Validated by Registration
TeleSoft            DEC VAX-11, VAXserver,         Motorola board series
TeleGen2 Ada        VAXstation, MicroVAX, VAX      MVME133*, MVME135*, MVME136*
Cross Development   6000, VAX 8000 & VAX 9000      (MC68020); MVME141* &
System for VAX to   Series of computers (under     MVME147* (MC68030); and
68K, Version 4.1    VMS Versions 5.0, 5.1, 5.2,    Force CPU-30, CPU-31, CPU-32
(BASE               5.3 & 5.4, as supported)       & CPU-37 (bare machines)
#910121I1.11124)

*Validated by Registration
TeleSoft            DEC VAX-11, VAXserver,         Motorola board series
TeleSoft TRIAD      VAXstation, MicroVAX, VAX      MVME147* (MC68030) (bare
System for          6000, VAX 8000 & VAX 9000      machines, using
VAX/VMS to 68K,     Series of computers (under     TeleAda-Exec)
Version 4.1         VMS Versions 5.0, 5.1, 5.2,
(BASE               5.3 & 5.4, as supported)
#910121I1.11124)

*Validated by Registration
TeleSoft            DEC VAX-11, VAXserver,         Motorola MVME165* & MVME167*
TeleGen2 Ada        VAXstation, MicroVAX, VAX      (68040) board families (bare
Cross Development   6000, VAX 8000 & VAX 9000      machines)
System for          Series of computers (as
VAX/VMS to 68K,     supported) (under VMS
Version 4.1         Versions 5.0, 5.1, 5.2, 5.3
(BASE               & 5.4)
#910121I1.11124)

TeleSoft            MicroVAX 3800 (under           Integrated Device Technology
TeleGen2 Ada        VAX/VMS Version 5.2)           IDT7RS301 System
Cross Development                                  (R3000/R3010) (bare machine)
System, Version
4.1, for VAX/VMS
to MIPS
(#910123I1.11125)

TeleSoft            Sun-3/480 (under Sun UNIX,     Motorola MVME135-1 (MC68020)
TeleGen2 Ada        Release 4.1)                   (bare machine)
Cross Development
System, Version
4.1, for SUN-3 to
68K
(#910125I1.11126)

TeleSoft            VAX 6210 (under VMS 5.3)       Intel iSBC 386-120
TeleGen2 Ada                                       (80386/387) (bare machine,
Cross Development                                  using TeleAda-EXEC 1.0)
System, Version
3.1 for VAX/VMS
to 386
(#910325I1.11139)

*Validated by Registration
TeleSoft            VAX 4000-300 (under VMS        Intel iSBC 486/133SE board
TeleGen2 Ada        5.4-3)                         (bare machine, using
Cross Development                                  TeleAda-EXEC 1.0)
System, Version
3.1
(BASE
#910325I1.11139)

TeleSoft            Sun-4/60 (under SunOS 4.1)     Motorola MVME147 (68030)
TeleGen2 Ada                                       (bare machine, using
Cross Development                                  TeleAda-EXEC 1.0)
System, Version
3.1 for SPARC to
68K
(#910325I1.11140)

*Validated by Registration
TeleSoft            Sun Microsystems Sun-4,        Motorola MVME133*, MVME135*,
TeleGen2 Ada        SPARCserver & SPARCstation     MVME136* (68020); MVME141* &
Cross Development   computer families (under       MVME147* (68030); and
System for SPARC    SunOS 4.1)                     MVME165* & MVME167* (68040)
to 68K, Version                                    board families (bare
4.1                                                machines, optionally using
(BASE                                              TeleAda_Exec 2.0)
#910325I1.11140)

TeleSoft            Apple Macintosh IIfx (under    Same as Host
TeleGen2 Ada Host   A/UX 2.0)
Development
System, Version
4.1, for MacII
Systems
(#910721I1.11194)

*Validated by Registration
TeleSoft            Apple Macintosh II family,     Any Host
TeleGen2 Ada Host   & SE/30 (under A/UX Release
Development         2.0)
System for MacII
Systems, Version
4.1
(BASE
#910721I1.11194)

TeleSoft            MicroVAX 3800 (under VMS       MIL-STD-1750A ECSPO ITS RAID
TeleGen2 Ada        Version 5.4)                   Simulator, Version 6.0 (bare
Development                                        machine simulation,
System for VAX to                                  executing on the Host)
1750A, Version
3.25
(#911028I1.11229)

TeleSoft            MicroVAX 3800 (under VMS       Intel EXV 960 MC-MIL (i960
TeleGen2 Ada        Version 5.4)                   XA) (bare machine, using
Compilation                                        Hughes O.S. Ada RTS
System for VAX to                                  interface)
80960, Version
4.1
(#911213I1.11235)

TeleSoft            Sun-4/690 (under SunOS         Integrated Device Technology
TeleGen2 Ada        Release 4.1.2)                 IDT7RS301 System
Cross Development                                  (R3000/R3010) (bare machine)
System Version
4.1.1 for SUN-4
to eMIPS
(#921029I1.11295)

TeleSoft            Sun-4/690 (under SunOS         CVME962 System (i960XA board
TeleGen2(tm) Ada    Release 4.1.2)                 with MC Processor) (bare
Cross Development                                  machine)
System for Sun-4
to i960, Version
4.1.1
(#921218I1.11303)

TeleSoft            Sun-4/690 (under SunOS         Motorola MVME147S-1
TeleGen2(tm) Ada    Release 4.1.2)                 (68030/68882) (bare machine)
Cross Development
System for Sun-4
to e68k, Version
4.1c
(#921218I1.11304)

Texas Instruments   MIPS M/2000 (under RISC/os     TI DP32 R3000 Processor
MIPS-Ada, Version   4.02)                          (bare machine, using TI DP32
3.0                                                RTE Version 1.0)
(#901030W1.11052)

Texas Instruments   MicroVAX 3400 (under VMS       TI DP32 R3000 Processor
TI Ada, Version     5.3-1)                         (bare machine, using TI
1.0                                                Executive and Runtime
(#910403W1.11135)                                  Services (EARS) Version 1.0)

TLD Systems, Ltd.   Sun-4/75 (under SunOS,         Rockwell International
TLD                 Version 4.1.1)                 RI-1750AB Brassboard
Sun-4/MIL-STD-175                                  Development System (bare
0A Ada Compiler                                    machine, using TLDrtx Real
System, Version                                    Time Executive, Version
2.9.0                                              1.0.0)
(#920319W1.11237)

TLD Systems, Ltd.   Data General MV/32 20000-2     Same as Host
TLD MV/MV Ada       (under AOS/VS II, Version
Compiler System,    2.03)
Version 2.9.0
(#920319W1.11238)

TLD Systems, Ltd.   Sun-4/75 (under SunOS,         Honeywell Program
TLD                 Version 4.1.1)                 Development Unit (PDU) with
Sun-4/MIL-STD-175                                  Honeywell Generic VHSIC
0A Ada Compiler                                    Spaceborne Computer (GVSC)
System, Version                                    MIL-STD-1750A (bare machine,
2.9.0                                              using TLDrtx Real Time
(#920319W1.11239)                                  Executive, Version 1.0.0)

TLD Systems, Ltd.   Sun-4/75 (under SunOS,         TLD MIL-STD-1750A Multiple
TLD                 Version 4.1.1)                 Processor Simulator (bare
Sun-4/MIL-STD-175                                  machine simulation, using
0A Ada Compiler                                    TLDrtx Real Time Executive,
System, Version                                    Version 1.0.0, and executing
2.9.0                                              on the Host)
(#920319W1.11240)

TLD Systems, Ltd.   IBM RISC System 6000, Model    TLDmps MIL-STD-1750A
TLD                 530 (under AIX, Version        Multiple Processor Simulator
RISC6000/MIL-STD-   3.1)                           (bare machine simulation,
1750A Ada                                          using TLDrtx Real Time
Compiler System,                                   Executive, Version 1.0.0,
Version 2.9.0                                      and executing on the Host)
(#920319W1.11241)

*Validated by Registration
TLD Systems, Ltd.   IBM RISC System 6000 series    IBM User Console with IBM
TLD                 (under AIX, Version 3.1)       Generic VHSIC Spaceborne
RISC6000/MIL-STD-                                  Computer (bare machine,
1750A Ada                                          using TLDrtx Real Time
Compiler System,                                   Execution, Version 1.0.0)
Version 2.9.0
(BASE
#920319W1.11241)

TLD Systems, Ltd.   MicroVAX 3500 (under VMS,      TLD MIL-STD-1750A Multiple
TLD                 Version 5.1)                   Processor Simulator (bare
VAX/MIL-STD-1750A                                  machine simulation, using
Ada Compiler                                       TLDrtx Real Time Executive,
System, Version                                    Version 1.0.0, and executing
2.9.0                                              on the Host)
(#920319W1.11242)

*Validated by Registration
TLD Systems, Ltd.   DEC VAX-11, VAXserver,         IBM User Console with IBM
TLD                 VAXstation, MicroVAX, VAX      Generic VHSIC Spaceborne
VAX/MIL-STD-1750A   4000, VAX 6000, VAX 8000, &    Computer (bare machine,
Ada Compiler        VAX 9000 Series of             using TLDrtx Real Time
System, Version     computers (under VMS 5.4)      Execution, Version 1.0.0)
2.9.0
(BASE
#920319W1.11242)

TLD Systems, Ltd.   HP 9000/350 (under HP-UX,      TLDmps MIL-STD-1750A
TLD HP              Version 7.0)                   Multiple Processor Simulator
9000/MIL-STD-1750                                  (bare machine simulation,
A Ada Compiler                                     using TLDrtx Real Time
System, Version                                    Executive, Version 1.0.0,
2.9.0                                              and executing on the Host)
(#920319W1.11243)

U.S. Air Force      VAXstation 3100 (under VMS     Air Force RAID MIL-STD-1750A
AFCAS 1750A Ada     Version 5.3)                   simulator (bare machine
Compiler, Version                                  simulation, executing on the
1.0                                                Host)
(#910425W1.11142)

*Validated by Registration
U.S. Air Force      DEC VAXstation 3100 (under     Air Force RAID MIL-STD-1750A
AFCAS 1750A Ada     VMS Version 5.4)               simulator (bare machine
Compiler, Version                                  simulation, executing on the
1.1                                                Host)
(BASE
#910425W1.11142)

U.S. Air Force      VAXstation 3100 (under VMS     Air Force RAID MIL-STD-1750A
AFCAS 1750A/XMEM    Version 5.3)                   simulator (bare machine
Ada Compiler,                                      simulation, executing on the
Version 1.0                                        Host)
(#910425W1.11143)

*Validated by Registration
U.S. Air Force      DEC VAXstation 3100 (under     Air Force RAID MIL-STD-1750A
AFCAS 1750A/XMEM    VMS Version 5.4)               simulator (bare machine
Ada Compiler,                                      simulation, executing on the
Version 1.1                                        Host)
(BASE
#910425W1.11143)

U.S. NAVY           VAX 8600 (under VMS Version    Same as Host
AdaVAX, Version     5.3)
5.0 (/OPTIMIZE)
(#910517S1.11162)

U.S. NAVY           VAX 8600 (under VMS Version    Same as Host
AdaVAX, Version     5.3)
5.0
(/NO_OPTIMIZE)
(#910517S1.11163)

U.S. NAVY           VAX-11/785 (under VMS          Same as Host
AdaVAX, Version     Version 5.3)
5.0 (/OPTIMIZE)
(#910517S1.11164)

U.S. NAVY           VAX-11/785 (under VMS          Same as Host
AdaVAX, Version     Version 5.3)
5.0
(/NO_OPTIMIZE)
(#910517S1.11165)

U.S. NAVY           VAX 8550 (under VMS Version    AN/UYK-43 (single cpu) (bare
Ada/L, Version      5.3)                           machine)
4.0 (/OPTIMIZE)
(#910626S1.11172)

U.S. NAVY           VAX 8550 (under VMS Version    AN/UYK-43 (EMR) (bare
Ada/L, Version      5.3)                           machine)
4.0 (/OPTIMIZE)
(#910626S1.11173)

U.S. NAVY           VAX 8550 (under VMS Version    AN/UYK-44 (EMR) (bare
Ada/M, Version      5.3)                           machine)
4.0 (/OPTIMIZE)
(#910626S1.11174)

U.S. NAVY           VAX 8550 (under VMS Version    AN/AYK-14 (bare machine)
Ada/M, Version      5.3)
4.0 (/OPTIMIZE)
(#910626S1.11175)

U.S. NAVY           VAX-11/785 (under VMS          AN/UYK-43 (single cpu) (bare
Ada/L, Version      Version 5.3)                   machine)
4.0 (/OPTIMIZE)
(#910626S1.11176)

U.S. NAVY           VAX-11/785 (under VMS          AN/UYK-43 (EMR) (bare
Ada/L, Version      Version 5.3)                   machine)
4.0 (/OPTIMIZE)
(#910626S1.11177)

U.S. NAVY           VAX-11/785 (under VMS          AN/UYK-44 (EMR) (bare
Ada/M, Version      Version 5.3)                   machine)
4.0 (/OPTIMIZE)
(#910626S1.11178)

U.S. NAVY           VAX-11/785 (under VMS          AN/AYK-14 (bare machine)
Ada/M, Version      Version 5.3)
4.0 (/OPTIMIZE)
(#910626S1.11179)

U.S. NAVY           VAXstation 4000 (under VMS     Same as Host
AdaVAX, Version     Version 5.5)
5.5 (/OPTIMIZE)
(#920918S1.11270)

U.S. NAVY           VAXstation 4000 (under VMS     Same as Host
AdaVAX, Version     Version 5.5)
5.5
(/NO_OPTIMIZE)
(#920918S1.11271)

U.S. NAVY           VAX Cluster (comprising VAX    Enhanced Processor (EP)
Ada/M, Version      8550, 8600, & 8650             AN/UYK-44 (bare machine)
4.5 (/OPTIMIZE)     machines) (under VMS
(#920918S1.11272)   Version 5.3)

U.S. NAVY           VAX Cluster (comprising VAX    VHSIC Processor Module (VPM)
Ada/M, Version      8550, 8600, & 8650             AN/AYK-14 (bare machine)
4.5 (/OPTIMIZE)     machines) (under VMS
(#920918S1.11273)   Version 5.3)

U.S. NAVY           VAX Cluster (comprising VAX    Enhanced Processor (EP)
Ada/M, Version      8550, 8600, & 8650             AN/UYK-44 (bare machine)
4.5                 machines) (under VMS
(/NO_OPTIMIZE)      Version 5.3)
(#920918S1.11274)

U.S. NAVY           VAX Cluster (comprising VAX    VHSIC Processor Module (VPM)
Ada/M, Version      8550, 8600, & 8650             AN/AYK-14 (bare machine)
4.5                 machines) (under VMS
(/NO_OPTIMIZE)      Version 5.3)
(#920918S1.11275)

UNISYS              UNISYS 2200/600 (under         Same as Host
Corporation         OS1100, Version 43R2)
UCS Ada, Version
1R1
(#910510S1.11161)

*Validated by Registration
UNISYS              UNISYS 1100/90, 2200/100,      Any Host
Corporation         /200, /400, /600, & /900
UCS Ada, Version    (under OS 1100, Versions
1R1                 43R2 & 43R3, as supported)
(BASE
#910510S1.11161)

Verdix              DECstation 3100 (under         Same as Host
Corporation         ULTRIX 3.1)
VAda-110-6161,
Version 6.0.2
(#900228W1.11001)

*Validated by Registration
Verdix              DECstation 2100, 5000;         Any Host
Corporation         DECsystem 5400, 5810, 5820,
VAda-110-6161,      5830, 5840 (under ULTRIX
Version 6.0.2       3.1)
(BASE
#900228W1.11001)

*Validated by Registration
Verdix              DECstation 2100, 3100, 5000    Any Host
Corporation         & 5200; and DECsystem 3100,
VADS DEC-RISC,      5000, 5100, 5200, 5400,
Ultrix 4.0,         5500, 5810, 5820, 5830 &
VAda-110-6161,      5840 (under ULTRIX 4.0)
Version 6.0
(BASE
#900228W1.11001)

*Validated by Registration
Verdix              DECstation 2100, 3100, 5000    Any Host
Corporation         & 5200; and DECsystem 3100,
VADS DEC-RISC,      5000, 5100, 5200, 5400,
Ultrix 4.1,         5500, 5810, 5820, 5830 &
VAda-110-6161,      5840 (under ULTRIX 4.1)
Version 6.0
(BASE
#900228W1.11001)

*Validated by Registration
Verdix              DECstation 2100, 3100, 5000    Any Host
Corporation         & 5200; DECsystem 3100,
VADS DEC-RISC,      5000, 5100, 5200, 5400,
Ultrix 4.2,         5500, 5810, 5820, 5830 &
VAda-110-6161,      5840 (under Ultrix 4.2)
Version 6.0
(BASE
#900228W1.11001)

Verdix              VAXsystem 3100 (under          Same as Host
Corporation         ULTRIX 3.1)
VAda-110-0202,
Version 6.0
(#900228W1.11002)

*Validated by Registration
Verdix              DEC VAX-11, MicroVAX,          Any Host
Corporation         VAXserver, VAXstation, VAX
VAda-110-0202,      6000, VAX 8000 & VAX 9000
Version 6.0         series (under ULTRIX 4.0)
(BASE
#900228W1.11002)

*Validated by Registration
Verdix              DEC VAX-11, VAXserver,         Any Host
Corporation         VAXstation, MicroVAX, VAX
VAda-110-0202,      6000, VAX 8000 & VAX 9000
Version 6.0         Series of computers (under
(BASE               ULTRIX 4.2)
#900228W1.11002)

Verdix              Sun 3/280 (under SunOS 4.0)    Same as Host
Corporation
VADS Sun3 SunOS,
VAda-110-1313,
Version 6.0
(#900510W1.11003)

*Validated by Registration
Verdix              Sun-3/50, /60, /80, /150,      Any Host machine (under same
Corporation         /160, /260, /280, /470 &       OS version)
VADS Sun-3 Sun      /480 (under SunOS 4.0 &
OS,                 4.1)
VAda-110-1313,
Version 6.0
(BASE
#900510W1.11003)

Verdix              IBM PS/2 Model 80 (under       Intel iSBC 386/12 (bare
Corporation         AIX 1.1)                       machine)
VADS IBM PS/2 AIX
=> Intel 80386,
VAda-110-35315,
Version 6.0
(#900510W1.11004)

Verdix              IBM PS/2 Model 80 (under       Motorola MVME133A-20
Corporation         AIX 1.1)                       (MC68020) (bare machine)
VADS IBM PS/2 AIX
=> 68K,
VAda-110-35125,
Version 6.0
(#900510W1.11005)

Verdix              Sun 4/280 (under SunOS 4.0)    Same as Host
Corporation
VADS Sun-4 SunOS,
VAda-110-4040,
Version 6.0
(#900510W1.11006)

*Validated by Registration
Verdix              Sun-4/20, /65, /110, /150 &    Any Host
Corporation         /260; SPARCserver 310, 330,
VAda-110-4040,      370, 390, 470 & 490;
Version 6.0         SPARCstation SLC, 1, 1+, 2,
(BASE               310, 330 & 370; and
#900510W1.11006)    SPARCengine 1 VME (under
                    SunOS 4.1)

Verdix              Sun 3/280 (under SunOS 4.0)    Motorola MVME147 (MC68030)
Corporation                                        (bare machine)
VADS Sun3 SunOS
=> 68K,
VAda-110-13125,
Version 6.0
(#900510W1.11007)

*Validated by Registration
Verdix              Sun-3/50, /60, /80, /150,      Cyclone CVME 44, CVME 46 &
Corporation         /160, /260, /280, /470 &       CVME 48; Force CPU 21, CPU
VADS Sun3 SunOS     /480 (under SunOS 4.0 &        29, CPU 30, CPU 31, CPU 32,
=> 68K,             4.1)                           CPU 37 & Golden Triangle
VAda-110-13125,                                    Firepower; Heurikon HK68/V30
Version 6.0                                        Series, V2E Series & V2F
(BASE                                              Series; Integrated Solutions
#900510W1.11007)                                   VME68K20, VME68K30, VME68225
                                                   & Liberator SBC; Matrix
                                                   MS-CPU220 & MS-CPU320; Mizar
                                                   MZ7120, MZ7122, MZ7124,
                                                   MZ7130, MZ8120 & MZ8130; Sun
                                                   Microsystems 3E Board Set;
                                                   Motorola MVME147 Series &
                                                   MVME141 (MC68030), MVME133
                                                   Series, MVME134, MVME135 &
                                                   MVME136 (MC68020), MVME-110,
                                                   MVME-165 & MVME-167; Tadpole
                                                   TP32V & TP33M (bare
                                                   machines)

Verdix              IBM RISC System/6000 Model     Same as Host
Corporation         530 (under AIX 3.1)
VADS IBM RISC
System/6000, AIX
3.1,
VAda-110-7171,
Version 6.0
(#900726W1.11017)

*Validated by Registration
Verdix              IBM RISC System/6000 Models    Any Host
Corporation         320, 520, 540, 730 & 930
VADS IBM RISC       (under AIX 3.1)
System/6000, AIX
3.1,
VAda-110-7171,
Version 6.0
(BASE
#900726W1.11017)

*Validated by Registration
Verdix              IBM RISC System/6000 Models    Any Host
Corporation         220, 320, 320H, 340, 350,
VADS IBM RISC       520, 520H, 530H, 540, 550,
System/6000, AIX    560, 730, 930, & 950 (under
3.1,                AIX 3.2)
VAda-110-7171,
Version 6.0
(BASE
#900726W1.11017)

Verdix              HP 9000/350 (under HP-UX       Same as Host
Corporation         7.0)
VADS HP 9000/300,
HP-UX 7.0,
VAda-110-1515,
Version 6.0
(#900726W1.11018)

*Validated by Registration
Verdix              HP 9000 Series 300 Models      Any Host
Corporation         310, 320, 330, 340, 350,
VADS HP 9000/300,   360 & 370 (under HP-UX 7.0)
HP-UX 7.0,
VAda-110-1515,
Version 6.0
(BASE
#900726W1.11018)

Verdix              Prime EXL/320 (under UNIX      Same as Host
Corporation         System V/386 3.2)
VADS Prime
EXL/320, UNIX
System V/386 3.2,
VAda-110-3232,
Version 6.0
(#900726W1.11019)

Verdix              MicroVAX 3100 (under           Same as Host
Corporation         VAX/VMS V5.2)
VADS VAX/VMS 5.2,
VAda-110-0303,
Version 6.0
(#900726W1.11020)

*Validated by Registration
Verdix              DEC VAX-11, VAXserver,         Any Host
Corporation         VAXstation, MicroVAX, VAX
VADS VAX/VMS 5.3,   6000, VAX 8000 & VAX 9000
VAda-110-0303,      Series of computers (under
Version 6.0         VMS 5.3)
(BASE
#900726W1.11020)

Verdix              MicroVAX 3100 (under           Motorola MVME147 (MC68030)
Corporation         VAX/VMS V5.2)                  (bare machine)
VADS
VAX/VMS=>68k, VMS
5.2,
VAda-110-03125,
Version 6.0
(#900726W1.11021)

*Validated by Registration
Verdix              DEC VAX-11, VAXserver,         Cyclone CVME 44, CVME 46 &
Corporation         VAXstation, MicroVAX, VAX      CVME 48; Force CPU 21, CPU
VADS VAX/VMS =>     6000, VAX 8000 & VAX 9000      29, CPU 30, CPU 31, CPU 32,
68K, VMS 5.2,       Series of computers (under     CPU 37 & Golden Triangle
VAda-110-03125,     VMS 5.2)                       Firepower; Heurikon HK68/V30
Version 6.0                                        Series, V2E Series & V2F
(BASE                                              Series; Integrated Solutions
#900726W1.11021)                                   VME68K20, VME68K30, VME68225
                                                   & Liberator SBC; Matrix
                                                   MS-CPU220 & MS-CPU320; Mizar
                                                   MZ7120, MZ7122, MZ7124,
                                                   MZ7130, MZ8120 & MZ8130; Sun
                                                   Microsystems 3E Board Set;
                                                   Motorola MVME147 Series &
                                                   MVME141 (MC68030), MVME133
                                                   Series, MVME134, MVME135 &
                                                   MVME136 (MC68020), MVME-165
                                                   & MVME167; Tadpole TP32V &
                                                   TP33M (bare machines)

Verdix              MicroVAX 3100 (under           Intel iSBC 386/32 (bare
Corporation         VAX/VMS V5.2)                  machine)
VADS
VAX/VMS=>Intel
386, VMS 5.2,
VAda-110-03315,
Version 6.0
(#900726W1.11022)

*Validated by Registration
Verdix              DEC VAX-11, VAXserver,         Intel iSBC 386/32 (bare
Corporation         VAXstation, MicroVAX, VAX      machine)
VADS                6000, VAX 8000 & VAX 9000
VAX/VMS=>Intel      Series of computers (under
386, VMS 5.3,       VMS 5.3)
VAda-110-03315,
Version 6.0
(BASE
#900726W1.11022)

Verdix              MicroVAX 3100 (under Ultrix    Tektronix MV System, MV
Corporation         3.1)                           68020 Support System, using
VADS                                               TekDB Version 5.0.2
VAX/Ultrix=>68k,                                   emulation software (bare
Ultrix 3.1,                                        machine simulation)
VAda-110-02125,
Version 6.0
(#900726W1.11023)

*Validated by Registration
Verdix              DEC VAX-11, VAXserver,         Cyclone CVME 44, CVME 46 &
Corporation         VAXstation, MicroVAX, VAX      CVME 48; Force CPU 21, CPU
VADS VAX/ULTRIX     6000, VAX 8000 & VAX 9000      29, CPU 30, CPU 31, CPU 32,
=> 68K, ULTRIX      Series of computers (under     CPU 37 & Golden Triangle
3.1,                Ultrix 3.1)                    Firepower; Heurikon HK68/V30
VAda-110-02125,                                    Series, V2E Series & V2F
Version 6.0                                        Series; Integrated Solutions
(BASE                                              VME68K20, VME68K30, VME68225
#900726W1.11023)                                   & Liberator SBC; Matrix
                                                   MS-CPU220 & MS-CPU320; Mizar
                                                   MZ7120, MZ7122, MZ7124,
                                                   MZ7130, MZ8120 & MZ8130; Sun
                                                   Microsystems 3E Board Set;
                                                   Motorola MVME147 Series &
                                                   MVME141 (MC68030), MVME133
                                                   Series, MVME134 & MVME135
                                                   (MC68020); Tadpole TP32V &
                                                   TP33M (bare machines);
                                                   Tektronix MV System, MV
                                                   68020 Support System using
                                                   TekDB Version 5.0.2
                                                   emulation software (bare
                                                   machine simulation)

Verdix              DECstation 3100 (under         Motorola MVME147 (MC68030)
Corporation         Ultrix 3.1)                    (bare machine)
VADS
DEC-RISK=>68k,
Ultrix 3.1,
VAda-110-61125,
Version 6.0
(#900726W1.11024)

*Validated by Registration
Verdix              DECstation 2100, 3100, 5000    Cyclone CVME 44, CVME 46 &
Corporation         & 5200; and DECsystem 3100,    CVME 48; Force CPU 21, CPU
VADS DEC-RISC =>    5000, 5100, 5200, 5400,        29, CPU 30, CPU 31, CPU 32,
68K, Ultrix 4.0,    5500, 5810, 5820, 5830 &       CPU 37 & Golden Triangle
VAda-110-61125,     5840 (under ULTRIX 4.0)        Firepower; Heurikon HK68/V30
Version 6.0                                        Series, V2E Series & V2F
(BASE                                              Series; Integrated Solutions
#900726W1.11024)                                   VME68K20, VME68K30, VME68225
                                                   & Liberator SBC; Matrix
                                                   MS-CPU220 & MS-CPU320; Mizar
                                                   MZ7120, MZ7122, MZ7124,
                                                   MZ7130, MZ8120 & MZ8130; Sun
                                                   Microsystems 3E Board Set;
                                                   Motorola MVME147 Series
                                                   (MC68030), MVME133 Series,
                                                   MVME134 & MVME135 (MC68020);
                                                   Tadpole TP32V & TP33M (bare
                                                   machines)

Verdix              IBM RISC System/6000 Model     Motorola MVME147 (MC68030)
Corporation         530 (under AIX 3.1)            (bare machine)
VADS IBM RISC
System/6000=>68k,
AIX 3.1,
VAda-110-71125,
Version 6.0
(#900726W1.11025)

*Validated by Registration
Verdix              IBM RISC System/6000 Models    Cyclone CVME 44, CVME 46 &
Corporation         320, 520, 540, 730 & 930       CVME48; Force CPU 21, CPU
VADS IBM RISC       (under AIX 3.1)                29, CPU 30, CPU 31, CPU 32,
System/6000=>68K,                                  CPU 37 & Golden Triangle
AIX 3.1,                                           Firepower; Heurikon HK68/V30
VAda-110-71125,                                    Series, V2E Series & V2F
Version 6.0                                        Series; Integrated Solutions
(BASE                                              VME68K20, VME68K30, VME68225
#900726W1.11025)                                   & Liberator SBC; Matrix
                                                   MS-CPU220 & MS-CPU320; Mizar
                                                   MZ7120, MZ7122, MZ7124,
                                                   MZ7130, MZ8120 & MZ8130; Sun
                                                   Microsystems 3E Board Set;
                                                   Motorola MVME133 Series,
                                                   MVME134, MVME135 & MVME147
                                                   Series; and Tadpole TP32V &
                                                   TP33M (bare machines)

Verdix              IBM RISC System/6000 Model     Intel iSBC 386/116 (bare
Corporation         530 (under AIX 3.1)            machine)
VADS IBM RISC
System/6000=>386,
AIX 3.1,
VAda-110-71315,
Version 6.0
(#900726W1.11026)

*Validated by Registration
Verdix              IBM RISC System/6000 Models    Intel iSBC 386/116 (bare
Corporation         320, 520, 540, 730 & 930       machine)
VADS IBM RISC       (under AIX 3.1)
System/6000=>386,
AIX 3.1,
VAda-110-71315,
Version 6.0
(BASE
#900726W1.11026)

*Validated by Registration
Verdix              IBM RISC System/6000 Models    Intel iSBC 486/125 (bare
Corporation         220, 320, 320H, 340, 350,      machine)
VADS IBM RISC       520, 520H, 530H, 540, 550,
System/6000=>386,   560, 730, 930, & 950 (under
AIX 3.1,            AIX 3.2)
VAda-110-71315,
Version 6.0
(BASE
#900726W1.11026)

Verdix              MicroVAX 3100 (under VMS       Intel iSBC 386/116 using a
Corporation         Version 5.2)                   WEITEK 3167 fpu (bare
VADS VAX/VMS 5.2                                   machine)
=> Intel
80386/WEITEK
3167,
VAda-110-03315,
Version 6.0
(#901129W1.11094)

*Validated by Registration
Verdix              DEC VAX-11, VAXserver,         Intel iSBC 386/116 using a
Corporation         VAXstation, MicroVAX, VAX      WEITEK 3167 fpu (bare
VADS VAX/VMS 5.3    6000, VAX 8000 & VAX 9000      machine)
=> Intel            Series of computers (under
80386/WEITEK        VMS 5.3)
3167,
VAda-110-03315,
Version 6.0
(BASE
#901129W1.11094)

Verdix              Intel 302 System (under        Same as Host
Corporation         UNIX System V/386, Release
VADS UNIX System    4)
V/386, Rel. 4,
VAda-110-3232,
Version 6.0
(#901129W1.11095)

*Validated by Registration
Verdix              NCR 3000, 3320, 3335, 3345,    Any Host
Corporation         3445, 3447, 3450, & 3550
VADS UNIX System    (under UNIX System V/486,
V/486, Rel. 4,      Release 4)
VAda-110-3232,
Version 6.0
(BASE
#901129W1.11095)

*Validated by Registration
Verdix              NCR 3000, 3320, 3335, 3345,    Any Host
Corporation         3445, 3447, 3450, & 3550
VADS UNIX System    (under NCR UNIX System V,
V/486, Rel.4,       Release 4.0); AST Premium
VAda-110-3232,      486/33 (under UNIX System
Version 6.0         V/486, Release 4.0)
(BASE
#901129W1.11095)

Verdix              Sequent Balance 8000 (under    Same as Host
Corporation         DYNIX Version 3.0)
VADS Sequent
Balance DYNIX
V3.0,
VAda-110-2323,
Version 6.0
(#901129W1.11096)

Verdix              Sun-4/260 (under SunOS 4.0)    Motorola MVME147 (68030)
Corporation                                        (bare machine)
VADS Sun4 => 68K,
Sun OS 4.0,
VAda-110-40125,
Version 6.0
(#901129W1.11097)

*Validated by Registration
Verdix              Sun-4/20, /65, /110 & /150;    Cyclone CVME 44, CVME 46 &
Corporation         SPARCserver 330, 370, 390,     CVME 48; Force CPU 21, CPU
VADS Sun4 => 68K,   470 & 490; SPARCstation        29, CPU 30, CPU 31, CPU 32,
Sun OS 4.0,         SLC, 1, 1+, 2, 330 & 370;      CPU 37 & Golden Triangle
VAda-110-40125,     and SPARCengine 1 VME          Firepower; Heurikon HK68/V30
Version 6.0         (under SunOS 4.1)              Series, V2E Series & V2F
(BASE                                              Series; Integrated Solutions
#901129W1.11097)                                   VME68K20, VME68K30, VME68225
                                                   & Liberator SBC; Matrix
                                                   MS-CPU220 & MS-CPU320; Mizar
                                                   MZ7120, MZ7122, MZ7124,
                                                   MZ7130, MZ8120 & MZ8130; Sun
                                                   Microsystems 3E Board Set;
                                                   Motorola MVME110 (MC68000),
                                                   MVME133 Series, MVME134,
                                                   MVME135 & MVME136 (MC68020),
                                                   MVME147 Series & MVME141
                                                   (MC68030), MVME-165 &
                                                   MVME-167 (MC68040); Tadpole
                                                   TP32V & TP33M (bare
                                                   machines)

*Validated by Registration
Verdix              Sun Microsystems Sun-4,        Cyclone CVME 44, 46, & 48;
Corporation         SPARCserver, SPARCstation,     Force CPU 21, CPU 29, CPU
VADS Sun4 => 68K,   & SPARCengine computer         30, CPU 31, CPU 32, CPU 37,
Sun OS 4.1,         families (under SunOS 4.1)     & Golden Triangle Firepower;
VAda-110-40125,                                    Heurikon HK68/V2E Series,
Version 6.0                                        /V2F Series, & /V30 Series;
(BASE                                              Integrated Solutions
#901129W1.11097)                                   VME68K20, 68K30, 68225, &
                                                   Liberator SBC; Matrix
                                                   MS-CPU220 & MS-CPU320; Mizar
                                                   MZ7120, MZ7122, MZ7124,
                                                   MZ7130, MZ8120, MZ8130, &
                                                   CPU330; Motorola MVME133
                                                   Series, MVME134, MVME135, &
                                                   MVME147 Series; Sun
                                                   Microsystems 3E board set;
                                                   and Tadpole Technology TP32V
                                                   & TP33M (bare machines)

Verdix              Sun-4/260 (under SunOS 4.0)    Sun-3/260 (under SunOS 4.0)
Corporation
VADS Sun-4 =>
Sun-3, Sun OS
4.0,
VAda-110-4013,
Version 6.0
(#901129W1.11098)

*Validated by Registration
Verdix              Sun-4/20, /65, /110, /150,     Sun-3/50, /60, /80, /150,
Corporation         /260 & /280; SPARCserver       /160, /260, /280, /470 &
VADS Sun-4 =>       330, 370, 390, 470 & 490;      /480 (under SunOS 4.1)
Sun-3, Sun OS       SPARCstation SLC, 1, 1+, 2,
4.0,                330 & 370; and SPARCengine
VAda-110-4013,      1 VME (under SunOS 4.1)
Version 6.0
(BASE
#901129W1.11098)

Verdix              AT&T 3B2/600G (under UNIX      Same as Host
Corporation         System V, Release 3.2.2)
VADS AT&T
3B2/600G UNIX
System V, Release
3.2.2,
VAda-110-5151,
Version 6.0
(#901129W1.11099)

Verdix              HP 9000 Model 350 (under       Motorola MVME133A (68020)
Corporation         HP-UX 7.0)                     (bare machine)
VADS HP-9000/300
=> 68K, HP-UX 7.0
, VAda-110-15125,
Version 6.0
(#901129W1.11100)

*Validated by Registration
Verdix              HP 9000 Series 300 Models      Cyclone CVME 44, CVME 46 &
Corporation         310, 320, 330, 340, 350,       CVME 48; Force CPU 21, CPU
VADS HP-9000/300    360 & 370 (under HP-UX 7.0)    29, CPU 30, CPU 31, CPU 32,
=> 68K, HP-UX                                      CPU 37 & Golden Triangle
7.0,                                               Firepower; Heurikon HK68/V30
VAda-110-15125,                                    Series, V2E Series & V2F
Version 6.0                                        Series; Integrated Solutions
(BASE                                              VME68K20, VME68K30, VME68225
#901129W1.11100)                                   & Liberator SBC; Matrix
                                                   MS-CPU220 & MS-CPU320; Mizar
                                                   MZ7120, MZ7122, MZ7124,
                                                   MZ7130, MZ8120 & MZ8130; Sun
                                                   Microsystems 3E Board Set;
                                                   Motorola MVME147 Series
                                                   (MC68030), MVME133 Series,
                                                   MVME134 & MVME135 (MC68020);
                                                   Tadpole TP32V & TP33M (bare
                                                   machines)

Verdix              Data General AViiON Model      Same as Host
Corporation         5120 (under DG/UX 4.3)
VADS BCS/88K,
AViion DGUX 4.3,
VAda-110-8080,
Version 6.1
(#901129W1.11101)

*Validated by Registration
Verdix              DG AViiON Models 4000,         Any Host
Corporation         4000GHI, 4020, 4100, 4120,
VADS BCS/88K,       5010, 5200, 5220, 5240,
AViion DGUX 4.3,    5300, 5310, 5400, 5402,
VAda-110-8080,      5410, 5412, 6200 & 6220
Version 6.1         (under DG/UX 4.3)
(BASE
#901129W1.11101)

*Validated by Registration
Verdix              Data General AViiON Models     Any Host
Corporation         4000, 4000GHI, 4020, 4100,
VADS BCS/88K        4120, 5010, 5200, 5220,
AViion DGUX 5.4,    5240, 5300, 5310, 5400,
VAda-110-8080,      5402, 5410, 5412, 6200 &
Version 6.1         6220; MODCOMP Real Star
(BASE               Family (under DG/UX 5.4)
#901129W1.11101)

*Validated by Registration
Verdix              MODCOMP Real Star Family       Any Host
Corporation         (under REAL/IX C.0.2)
VADS BCS/88K,
VAda-110-8080,
Version 6.1
(BASE
#901129W1.11101)

*Validated by Registration
Verdix              Motorola 8000 Delta Series     Any Host
Corporation         (MC88000), all models
VADS BCS/88K,       (under Unix System V/88,
VAda-110-8080,      R32V3)
Version 6.1
(BASE
#901129W1.11101)

Verdix              Sun-4/490 (under SunOS 4.1)    SPARCengine 1E (bare
Corporation                                        machine)
VADS Sun4 =>
SPARC, Sun OS
4.1,
VAda-110-40440,
Version 6.0
(#901129W1.11102)

*Validated by Registration
Verdix              Sun-4/20, /65, /110, /150 &    SPARCengine 1E (bare
Corporation         /260; SPARCserver 330, 370,    machine)
VADS Sun4=>SPARC,   390, 470 & 490; and
Sun OS 4.1,         SPARCstation SLC, 1, 1+, 2,
VAda-110-40440,     330 & 370 (under SunOS 4.1)
Version 6.0
(BASE
#901129W1.11102)

Verdix              Sun 3/260 (under SunOS         Motorola MVME165 (68040)
Corporation         Release 4.0)                   (bare machine)
VADS Sun-3 SunOS
=> 68k,
VAda-110-13140,
Version 6.0
(#910517W1.11149)

*Validated by Registration
Verdix              Sun Microsystems Sun-3         Motorola MVME 165 (MC68040)
Corporation         computer family (under         (bare machine)
VADS Sun-3 SunOS    SunOS 4.1)
=> 68k,
VAda-110-13140,
Version 6.0
(BASE
#910517W1.11149)

Verdix              DECstation 5000-200 (under     Lockheed Sanders STAR MVP
Corporation         ULTRIX V4.0)                   (R3000) (bare machine)
VADS DEC-RISC =>
MIPS R3000,
VAda-110-61620,
Version 6.1
(#910517W1.11150)

*Validated by Registration
Verdix              DEC DECstation & DECsystem     Lockheed Sanders STAR MVP
Corporation         computer families (under       (R3000) (bare machine)
VADS DEC-RISC =>    ULTRIX 4.0)
MIPS R3000,
VAda-110-61620,
Version 6.1
(BASE
#910517W1.11150)

Verdix              MicroVAX 3600 (under VMS       Integrated Device Technology
Corporation         V5.2)                          IDT7RS302 (bare machine)
VADS VMS => MIPS
R3000,
VAda-110-03620,
Version 6.1
(#910517W1.11151)

*Validated by Registration
Verdix              DEC VAX-11, VAXserver,         Integrated Device Technology
Corporation         VAXstation, MicroVAX, VAX      IDT7RS302 (bare machine)
VADS VMS => MIPS    6000, VAX 8000 & VAX 9000
R3000,              Series of computers (under
VAda-110-03620,     VMS 5.3)
Version 6.1
(BASE
#910517W1.11151)

Verdix              Sun 4/280 (under SunOS         Motorola MVME165 (68040)
Corporation         Release 4.0)                   (bare machine)
VADS Sun-4 SunOS
=> 68k,
VAda-110-40140,
Version 6.0
(#910517W1.11152)

*Validated by Registration
Verdix              Sun Microsystems Sun-4,        Motorola MVME165 (68040)
Corporation         SPARCserver & SPARCstation     (bare machine)
VADS Sun4 SunOS     computer families (under
=> 68k,             SunOS 4.1)
VAda-110-40140,
Version 6.0
(BASE
#910517W1.11152)

Verdix              DECstation 2100 (under         Motorola MVME181 (bare
Corporation         ULTRIX V4.0)                   machine)
VADS DEC-RISC =>
88k,
VAda-110-61680,
Version 6.1
(#910517W1.11153)

*Validated by Registration
Verdix              DEC DECstation & DECsystem     Motorola MVME181 (88000)
Corporation         computer families (under       (bare machine)
VADS DEC-RISC =>    ULTRIX 4.0)
88k,
VAda-110-61680,
Version 6.1
(BASE
#910517W1.11153)

Verdix              Sun 4/20 (under SunOS          Motorola MVME147SA (bare
Corporation         4.1.1)                         machine, using vxWorks 5.0)
VADSworks Sun4 =>
68k,
VAda-115-40800,
Version 2.0
(#910517W1.11154)

*Validated by Registration
Verdix              Sun Microsystems Sun-4,        Force CPU 21, CPU 29, CPU
Corporation         SPARCserver & SPARCstation     30, CPU 31, CPU 32, CPU 33,
VADSworks Sun4 =>   computer families (under       CPU 37, & Golden Triangle
68k,                SunOS 4.1)                     Firepower; General Micro
VAda-115-40800,                                    Systems GMSV17 & GMSV37;
Version 2.0                                        Heurikon HK68/V20, /V2E,
(BASE                                              /V2F, /V2FA, /V30, /V30XE,
#910517W1.11154)                                   /V3E, & /V3F; Ironics
                                                   IV-3201a, 3204a, 3220, &
                                                   3230; Matrix MS-CPU320;
                                                   Mizar MZ7122 & MZ7124;
                                                   Motorola MVME133 Series,
                                                   MVME135, MVME135A, MVME141,
                                                   MVME143, & MVME147; Radstone
                                                   PME 68-25 & 68-31; SBE
                                                   VLAN-e & VPU30; Sun
                                                   Microsystems 3E; and Tadpole
                                                   Technology TP32V-4MB (bare
                                                   machines, using vxWorks 5.0)

Verdix              Zenith Z-486/25E (under SCO    Same as Host
Corporation         UNIX i386 release 3.2)
VADS UNIX System
V/486, SCO UNIX
3.2,
VAda-110-3232,
Version 6.0
(#910517W1.11155)

*Validated by Registration
Verdix              Zenith Z-486/33E (under SCO    Same as Host
Corporation         UNIX i386 release 3.2)
VADS UNIX System
V/486, SCO UNIX
3.2,
VAda-110-3232,
Version 6.0
(BASE
#910517W1.11155)

*Validated by Registration
Verdix              Any Computer System            Same as Host
Corporation         Comprising:  cpu:  any that
VADS 386/486        executes the Intel
System V, Rel.      80386/i486 instruction set
3.2,                (under Any operating system
VAda-110-3232,      compatible with Unix System
Version 6.0         V Release 3.2)
(BASE
#910517W1.11155)

Verdix              Sun 4/280 (under SunOS         Ironics IV9001 board (AMD
Corporation         4.0.3)                         29000) (bare machine)
VADS Sun-4 SunOS
=> AMD 29K, 6.0
VAda-110-40525,
Version 6.0
(#910517W1.11156)

*Validated by Registration
Verdix              Sun Microsystems Sun-4,        Ironics IV9001 board (AMD
Corporation         SPARCserver & SPARCstation     29000) (bare machine)
VADS Sun4 SunOS     computer families (under
=> AMD 29K,         SunOS 4.1)
VAda-110-40525,
Version 6.0
(BASE
#910517W1.11156)

Verdix              Intel 402 (under SCO UNIX      Same as Host
Corporation         3.2v2.e)
VADS UNIX System
V/486, SCO UNIX
3.2,
VAda-110-3232,
Version 6.1
(#910517W1.11157)

*Validated by Registration
Verdix              Any Computer System            Same as Host
Corporation         Comprising:  cpu:  any that
VADS 386/486        executes the Intel
System V, Rel.      80386/i486 instruction set
3.2,                (under Any operating system
VAda-110-3232,      compatible with Unix System
Version 6.1         V Release 3.2)
(BASE
#910517W1.11157)

Verdix              MIPS RC3230 (under RISC/os     Same as Host
Corporation         4.52)
VADS MIPS,
VAda-110-6262,
Version 6.1
(#910920W1.11200)

Verdix              MicroVAX 3100 (under VMS       Motorola MVME165 (68040)
Corporation         5.3)                           (bare machine)
VADS VAX/VMS =>
68040,
VAda-110-03140,
Version 6.0
(#910920W1.11201)

*Validated by Registration
Verdix              DEC VAX-11, VAXserver,         Motorola MVME165 (68040)
Corporation         VAXstation, MicroVAX, VAX      (bare machine)
VADS VAX/VMS =>     6000, VAX 8000, & VAX 9000
68040,              Series of computers (under
VAda-110-03140,     VMS 5.3)
Version 6.0
(BASE
#910920W1.11201)

Verdix              IBM RISC System/6000 Model     IDT 7RS302 (R3000) (bare
Corporation         530 (under AIX 3.1)            machine)
VADS IBM RS/6000
=> MIPS R3000,
VAda-110-71620,
Version 6.1
(#910920W1.11202)

*Validated by Registration
Verdix              IBM RISC System/6000 Models    IDT 7RS302 (R3000) (bare
Corporation         320, 520, 540, 730, & 930      machine)
VADS IBM RS/6000    (under AIX 3.1)
AIX 3.1,
VAda-110-71620,
Version 6.1
(BASE
#910920W1.11202)

Verdix              SPARCserver 490 (under         LSI LR33000 Pocket Rocket
Corporation         SunOS Release 4.1)             Evaluation board (R3000)
VADS Sun-4 =>                                      (bare machine)
MIPS R3000,
VAda-110-40620,
Version 6.1
(#910920W1.11205)

*Validated by Registration
Verdix              Sun Microsystems Sun-4,        LSI LR33000 Pocket Rocket
Corporation         SPARCserver, & SPARCstation    Evaluation board (R3000)
VADS Sun-4 =>       computer families (under       (bare machine)
MIPS R3000,         SunOS 4.1)
VAda-110-40620,
Version 6.1
(BASE
#910920W1.11205)

Verdix              Sun-4/280 (under SunOS         Motorola MVME101 (68000)
Corporation         Release 4.0.3)                 with MVME222-1 memory board
VADS Sun-4 SunOS                                   (bare machine)
=> MC68000/10,
VAda-110-40128,
Version 6.0
(#910920W1.11206)

*Validated by Registration
Verdix              Sun Microsystems Sun-4,        Motorola MVME101 (68000)
Corporation         SPARCserver, & SPARCstation    with MVME222-1 memory board
VADS Sun4 =>        computer families (under       (bare machine)
MC68000/10,         SunOS 4.1)
VAda-110-40128,
Version 6.0
(BASE
#910920W1.11206)

*Validated by Registration
Verdix              Sun Microsystems Sun-4,        Motorola 68302,
Corporation         SPARCserver, SPARCstation,     Philips-Signetics 68070, &
VADS Sun-4 =>       & SPARCengine computer         Toshiba 68301 (bare
MC68000/10, SunOS   families (under SunOS 4.1)     machines)
4.1,
VAda-110-40128,
Version 6.0
(BASE
#910920W1.11206)

Verdix              Sun-4/280 (under SunOS         Motorola CPU32 - M68332EVS
Corporation         Release 4.0.3)                 Evaluation System (68332)
VADS Sun-4 SunOS                                   (bare machine)
=> CPU32,
VAda-110-40150,
Version 6.0
(#910920W1.11207)

*Validated by Registration
Verdix              Sun Microsystems Sun-4,        Motorola CPU32 - M68332EVS
Corporation         SPARCserver, & SPARCstation    Evaluation System (68332)
VADS Sun-4 SunOS    computer families (under       (bare machine)
=> CPU32,           SunOS 4.1)
VAda-110-40150,
Version 6.0
(BASE
#910920W1.11207)

*Validated by Registration
Verdix              Sun Microsystems Sun-4,        Motorola CPU32-68331,
Corporation         SPARCserver, SPARCstation,     -68333, & -68340 Evaluation
VADS Sun-4 SunOS    & SPARCengine computer         Systems (bare machines)
=> CPU32,           families (under SunOS 4.1)
VAda-110-40150,
Version 6.0
(BASE
#910920W1.11207)

Verdix              IBM PS/2 Model 80 (under       Same as Host
Corporation         AIX 1.1)
VADS IBM PS/2,
AIX 1.1,
VAda-110-3535,
Version 6.1
(#910920W1.11208)

Verdix              MIPS RC3230 (under RISC/os     Lockheed Sanders STAR MVP
Corporation         4.52)                          (R3000) (bare machine)
VADS MIPS => MIPS
R3000,
VAda-110-62620,
Version 6.1
(#910920W1.11209)

Verdix              Sun-3/280 (under SunOS         Motorola MVME147 (68030)
Corporation         Release 4.0)                   (bare machine)
VADS Sun-3 SunOS
=> 68020/30 ARTX,
VAda-110-13120,
Version 6.0
(#910920W1.11210)

*Validated by Registration
Verdix              Sun Microsystems Sun-3         Cyclone CVME 44, 46, & 48;
Corporation         computer family (under         Force CPU 21, CPU 29, CPU
VADS Sun3 SunOS     SunOS 4.1)                     30, CPU 31, CPU 32, CPU 37,
=> 68020/30 ARTX,                                  & Golden Triangle Firepower;
VAda-110-13120,                                    Heurikon HK68/V2E Series,
Version 6.0                                        /V2F Series, & /V30 Series;
(BASE                                              Integrated Solutions
#910920W1.11210)                                   VME68K20, 68K30, 68225, &
                                                   Liberator SBC; Matrix
                                                   MS-CPU220 & MS-CPU320; Mizar
                                                   MZ7122, MZ7124, MZ7130,
                                                   MZ8120, & MZ8130;  Motorola
                                                   MVME133 Series, MVME134,
                                                   MVME135, MVME136, MVME141, &
                                                   MVME147 Series; Sun
                                                   Microsystems 3E board set;
                                                   and Tadpole Technology TP32V
                                                   & TP32M (bare machines)

Verdix              SPARCstation 2 (under SunOS    Motorola MVME147 (68030)
Corporation         Release 4.1.1)                 (bare machine)
VADS Sun4 SunOS
=> 68020/30 ARTX,
VAda-110-40120,
Version 6.0
(#910920W1.11211)

*Validated by Registration
Verdix              Sun Microsystems Sun-4,        Motorola MVME147 (68030)
Corporation         SPARCserver, & SPARCstation    (bare machine)
VADS Sun4 SunOS     computer families (under
=> 68020/30 ARTX,   SunOS 4.1)
VAda-110-40120,
Version 6.0
(BASE
#910920W1.11211)

Verdix              IBM RISC System/6000 Model     Motorola MVME147 (68030)
Corporation         530 (under AIX 3.1)            (bare machine)
VADS IBM RISC
System/6000 AIX
=> 68020/30 ARTX,
VAda-110-71120,
Version 6.0
(#910920W1.11212)

*Validated by Registration
Verdix              IBM RISC System/6000 Models    Motorola MVME147 (68030)
Corporation         320, 520, 540, 730, & 930      (bare machine)
VADS IBM RISC       (under AIX 3.1)
System/6000 AIX
=> 68020/30 ARTX,
VAda-110-71120,
Version 6.0
(BASE
#910920W1.11212)

Verdix              Okidata I860 Workstation       Same as Host
Corporation         (under UNIX SYSTEM V/860
VADS SYSTEM V/860   RELEASE 4 v1.0)
RELEASE 4,
VAda-110-9090,
Version 6.1
(#910920W1.11213)

Verdix              MicroVAX 3600 (under VMS       Ironics IV9001 board (AMD
Corporation         5.2)                           29000) (Am29000 bare VME
VADS VMS =>                                        machine)
AMD29000,
VAda-110-03525,
Version 6.04
(#910920W1.11214)

*Validated by Registration
Verdix              DEC VAX-11, VAXserver,         Ironics IV9001 board (AMD
Corporation         VAXstation, MicroVAX, VAX      29000) (Am29000 bare VME
VADS VAX VMS =>     6000, VAX 8000, & VAX 9000     machine)
AMD 29K,            Series of computers (under
VAda-110-03525,     VMS 5.3)
Version 6.04
(BASE
#910920W1.11214)

Verdix              Sun-3/180 (under SunOS         Ironics IV9001 board (AMD
Corporation         4.1.1)                         29000) (Am29000 bare VME
VADS Sun-3 SunOS                                   machine)
=> AMD 29K,
VAda-110-13525,
Version 6.04
(#910920W1.11215)

*Validated by Registration
Verdix              Sun Microsystems Sun-3         Ironics IV9001 board (AMD
Corporation         computer family (under         29000) (Am29000 bare VME
VADS Sun-3 SunOS    SunOS 4.1)                     machine)
=> AMD 29K,
VAda-110-13525,
Version 6.04
(BASE
#910920W1.11215)

Verdix              AT&T 3B2/600GR (under UNIX     Same as Host
Corporation         System V, Release 4.0)
VADS AT&T
3B2/600GR UNIX
System V, Release
4.0,
VAda-110-6363,
Version 6.1
(#920513W1.11252)

Verdix              IBM RISC System/6000 Model     IBM RISC System/6000 Model
Corporation         530 (under AIX 3.2)            320 (bare machine)
VADS IBM RISC
System/6000 =>
IBM RISC
System/6000,
VAda-110-71710,
Version 6.2
(#920513W1.11253)

Verdix              Motorola 88000 Delta (under    Motorola MVME187 (88000)
Corporation         R32V3 920117)                  (bare machine)
VADS BCS => 88K,
VAda-110-80680,
Version 6.1
(#920513W1.11254)

Verdix              Sun-4/20 (under SunOS,         Motorola MVME167A (68040)
Corporation         4.1.1)                         (bare machine, using VxWorks
VADSworks Sun4 =>                                  5.0)
68K,
VAda-115-40800,
Version 2.0
(#920513W1.11256)

Verdix              Sun-4/20 (under SunOS,         Sun SPARCengine 1e (bare
Corporation         4.1.1)                         machine, using VxWorks v5.0)
VADSworks Sun4 =>
SPARC,
VAda-115-40850,
Version 2.0
(#920513W1.11257)

Verdix              Sun-4/260 (under SunOS,        Intel iSBC 386/20p (bare
Corporation         Version 4.1.2)                 machine)
VADS Sun SPARC =>
386,
VAda-110-40315,
Version 6.2
(#920513W1.11258)

*Validated by Registration
Verdix              Sun Microsystems Sun-4,        Any single-board computer
Corporation         SPARCserver, & SPARCstation    that executes the Intel
VADS Sun SPARC =>   computer families (under       80386 or i486 instruction
386/486,            SunOS 4.1 & 4.2)               set (bare machine)
VAda-110-40315,
Version 6.2 under
SunOS4.x
(BASE
#920513W1.11258)

Verdix              DECstation 5000/200 (under     Lockheed Sanders STAR MVP
Corporation         Ultrix V4.1)                   board (bare machine, using
VADSworks                                          vxWorks 5.0)
DEC-RISC=>MIPS
R3000,
VAda-115-61640,
Version 2.0
(#921004W1.11277)

Verdix              IBM RISC System/6000 model     Same as Host
Corporation         220 (under AIX 3.2)
VADS IBM RISC
System/6000,
VAda-110-7171,
Version 6.2
(#921004W1.11278)

Verdix              IBM RISC System/6000 model     Same as Host
Corporation         530H (under AIX 3.2)
VADS IBM RISC
System/6000,
VAda-110-7171,
Version 6.2
(#921004W1.11279)

Verdix              ASL 486/33 (under UNIX         Same as Host
Corporation         System V, Release 3.2)
VADS System
V/386/486,
VAda-110-3232,
Version 6.1
(#921004W1.11280)

Verdix              AST Premium 486 (under UNIX    Same as Host
Corporation         System V, Release 4.0)
VADS System
V/386/486,
VAda-110-3232,
Version 6.1
(#921004W1.11281)

Verdix              NCR model 3450 (under NCR      Same as Host
Corporation         UNIX SVR4 MP-RAS Release 2)
VADS System
V/386/486,
VAda-110-3232,
Version 6.1
(#921004W1.11282)

Verdix              NCR model 3550 (under NCR      Same as Host
Corporation         UNIX SVR4 MP-RAS Release 2)
VADS System
V/386/486,
VAda-110-3232,
Version 6.1
(#921004W1.11283)

Verdix              RDI Britelite IPX Laptop       Same as Host
Corporation         (under Solaris 2.1)
VADS Sun SPARC
Solaris 2.1,
VAda-110-4040,
Version 6.2
(#921004W1.11284)

Verdix              SPARCstation LX 4/30 (under    Same as Host
Corporation         Solaris 2.1)
VADS Sun-4
Solaris 2.1,
VAda-110-4040,
Version 6.2
(#921004W1.11285)

*Validated by Registration
Verdix              Sun Microsystems Sun-4,        Any Host
Corporation         SPARCstation, & SPARCserver
SPARCompiler Ada    computer families (under
Porting Kit,        Solaris 2.1)
Version 2.0
(BASE
#921004W1.11285)

*Validated by Registration
Verdix              Sun Microsystems Sun-4,        Any Host
Corporation         SPARCstation, & SPARCserver
SPARCworks          computer families (under
Professional Ada,   Solaris 2.1 & 2.2)
Version 2.0
(BASE
#921004W1.11285)

Verdix              SPARCstation 10 model 30       Same as Host
Corporation         (under Solaris 2.1)
VADS Sun SPARC
Solaris 2.1,
VAda-110-4040,
Version 6.2
(#921004W1.11286)

Verdix              SPARCstation 10 model 41       Same as Host
Corporation         (under Solaris 2.1)
VADS Sun SPARC
Solaris 2.1,
VAda-110-4040,
Version 6.2
(#921004W1.11287)

Verdix              SPARCstation 10 model 42       Same as Host
Corporation         (under Solaris 2.1)
VADS Sun SPARC
Solaris 2.1,
VAda-110-4040,
Version 6.2
(#921004W1.11288)

Verdix              Sun SPARCserver 690 (under     Same as Host
Corporation         Solaris 2.1)
VADS Sun SPARC
Solaris 2.1,
VAda-110-4040,
Version 6.2
(#921004W1.11289)

Verdix              Sun SPARCserver 690 (under     Same as Host
Corporation         Solaris 2.1)
VADS MP Sun SPARC
Solaris 2.1,
VAda-110-4141,
Version 6.2
(#921004W1.11290)

Verdix              Silicon Graphics IRIS          Same as Host
Corporation         4D/440 (under IRIX 4.0.1)
VADS Silicon
Graphics Self,
VAda-110-6464,
Version 6.2
(#921004W1.11291)

Verdix              Silicon Graphics IRIS          Same as Host
Corporation         4D/440 (under IRIX 4.0.1)
VADS MP Silicon
Graphics,
VAda-110-6565,
Version 6.2
(#921004W1.11292)

Verdix              HP 9000/720 (under HP-UX       Same as Host
Corporation         8.0.7)
VADSself HP 9000
series 700
VAda-110-7575,
Version 6.2
(#930226W1.11311)

Verdix              Sun-4/20 (under SunOS          Heurikon HKMIPS/3500 (R3000)
Corporation         Release 4.1.1)                 board (bare machine, using
VADSworks Sun-4                                    vxWorks 5.0)
=> MIPS R3000
VAda-115-40640,
Version 2.0
(#930226W1.11312)

Wang                Wang VS 8480 (under Wang       Same as Host
Laboratories,       VSOS 7.30.02)
Inc.
Wang VS Ada
Version 5.00.00
(#901129W1.11093)

*Validated by Registration
Wang                Wang VS Models:  100 & 300;    Same as Host
Laboratories,       5430, 5440, 5450 & 5460;
Inc.                7010, 7110, 7120, 7150 &
Wang VS Ada         7310; 8220, 8230, 8260,
Version 5.00.00     8430, 8460, 8470 & 8480;
(BASE               and 10050, 10075 & 10100
#901129W1.11093)    (under all VS OS versions
                    7.21.xx & 7.30.xx)

York Software       Intergraph InterPro 3050       Same as Host
Engineering         Workstation (under CLIX
Limited             R3.1)
York Ada Compiler
Environment (ACE)
Release 5
(#901127N1.11073)

*Validated by Registration
York Software       Intergraph Mobile GIS/C2       Same as Host
Engineering         (under CLIX Release 3.1)
Limited
York Ada Compiler
Environment (ACE)
Release 5
(BASE
#901127N1.11073)

*Validated by Registration
York Software       InterPro 125, 225, 340,        Any Host
Engineering         360, 2020, 3070, 6040,
Limited             6240, 6080 & 6280 (under
York Ada Compiler   CLIX Release 3.1)
Environment (ACE)
Release 5
(BASE
#901127N1.11073)

*Validated by Registration
York Software       InterView 220 & 3050 (under    Any Host
Engineering         CLIX Release 3.1)
Limited
York Ada Compiler
Environment (ACE)
Release 5
(BASE
#901127N1.11073)

*Validated by Registration
York Software       InterAct 220, 2020, 3050,      Any Host
Engineering         6040, 6080, 6240 & 6280
Limited             (under CLIX Release 3.1)
York Ada Compiler
Environment (ACE)
Release 5
(BASE
#901127N1.11073)

*Validated by Registration
York Software       InterServe 200, 300, 2000,     Any Host
Engineering         3000, 4200, 5200, 6000,
Limited             6105 & 6505 (under CLIX
York Ada Compiler   Release 3.1)
Environment (ACE)
Release 5
(BASE
#901127N1.11073)

*Validated by Registration
York Software       Intergraph Series 2400 &       Any Host
Engineering         6400--all models that use
Limited             the C400 chip (under CLIX
York Ada Compiler   Release 3.1)
Environment (ACE)
Release 5
(BASE
#901127N1.11073)
                             CONTACT NAMES, ADDRESSES
                                AND PHONE NUMBERS
                               FOR COMPILER VENDORS


AETECH                                  Jim Dorman      (619) 431-7714
5841 Edison Place, Suite 110
Carlsbad, CA 92008

Aitech Systems Ltd                      Uri Gries       (408) 980-6200
3080 Olcott St., Suite 105A
Santa Clara, CA 95054

Alenia Aeritalia & Selenia S.p.A    Dr. Nicola Botta   +39 6 41972520
Via Tiburtina km. 12,4
00131 Roma
ITALY

Alliant Computer Systems                Diane Capps     (508) 486-4950
1 Monarch Drive
Littleton, MA 01460

Alsys                                   Sally Burke     (617) 270-0030
67 South Bedford Street
Burlington, MA 01803-5152

Alsys                                   Karen Johnson   (619) 457-2700
(formerly TeleSoft)
5959 Cornerstone Court West
San Diego, CA 92121

ATLAS ELEKTRONIK GmbH                   Dieter Weigel   +49-291/457-3058
Sebaldsbruecker Heerstr. 235
P.O. Box 44 85 45
W-2800 Bremen 44,
Germany

Concurrent Computer Corp.               Michael Devlin  (908) 758-7531
106 Apple Street
Tinton Falls, NJ 07724

CONVEX Computer Corp.                   Brian Allison   (214) 497-4346
3000 Waterview Parkway
P.O. Box 833851
Richardson, TX 75083

Cray Research                           Sylvia Crain    (505) 988-2468
500 Montezuma, Suite 118
Santa Fe, NM 87501

DDC-I, Inc.                             Jennifer Collins (602) 275-7172
P.O. Box 37767
Phoenix, AZ 85069

DDC International A/S                   Ole Oest       +45 45 871144
G1 Lundtoftevej 1B
Lyngby DK-2800
DENMARK

DDC-INTER, Inc.                         Paul Houlihan   (212) 661-5100 ext 201
(formerly InterACT)
295 Madison Ave.
New York, NY 10017

DESC Ltd.                               Les Fairbrother +44 256 819711
Jays Close
Viables Industrial Estate
Basingstoke
Hampshire, RG22 4BY
England


Digital Equipment Corp.                 MaryAnne Cacciola (603) 881-1028
MS: ZK2-1/M11
110 Spit Brook Road
Nashua, NH 03062

E-Systems, Inc.                         Tim Holton      (813) 381-2000
ECI Division
1501 72nd Street North
St. Petersburg, FL 33733

Encore Computer                         Gary Beerman    (305) 587-2900
6901 W. Sunrise Blvd.                                  
Ft. Lauderdale, FL 33313

GSE Gesellschaft fur                    Michael Gedon   +49-89 36008-213
 Software-Engineering mbH
Brabanter Strasse 4
W-8000 Munich 40,
Germany

Harris                                  Jeff Hollensen  (305) 973-5427
2101 W. Cypress Creek Road
Ft. Lauderdale, FL 33309

Hewlett-Packard                         Dick Rupp       (408) 447-5742
19447 Pruneridge Ave.
MS: 47LH
Cupertino, CA 95014

IBM                                     Don Malcho      (416) 448-3727
IBM Canada Ltd
844 Don Mills
North York,Ontario,  M3C 1V7
Canada

Intel Corporation                       Kevin Priest   (602) 554-2420
Military Division
5000 W. Chandler Blvd.
MS: SP1-82
Chandler, AZ 85226

Intermetrics                            Mike Ryer       (617) 661-1840
733 Concord Avenue
Cambridge, MA 02138

International Computers             Christine Saunders  +44 734 693131
 Limited
Eskdale Road, Winnersh
Wokingham
Berkshire RG11 5TT,
United Kingdom

Irvine Compiler                         Joe Kohli       (714) 250-1366
34 Executive Park
Suite 270
Irvine, CA 92714

Meridian Software Systems               Jim Smith       (800) 653-2522
10 Pasteur Street                                       (714) 727-0700
Irvine, CA 92718

MIPS Computer Systems                   Ankur Saha      (408) 524-8095
928 Arques Ave.
Sunnyvale, CA 94086

NEC Corporation                 Dr. Toshio Miyachi      +81-3-5476-1107
Environment Systems Department
C&C Common Software Development
 Laboratory
Shibaura 2-11-5, Minato-ku
Tokyo 108,
Japan

North China Institute of                Mr. Li Xin     (01) 500-4372
 Computing Technology 
Beijing Green Valley Software
3 Floor CITIC Building
19, Jianguomenwai Dajie
Beijing 100004,
China

Proprietary Software Systems       Richard Gilinsky    (310) 394-5233
429 Santa Monica Blvd.
Suite 430
Santa Monica, CA 90401

R.R. Software                         Randall Brukardt  (608) 251-3133
P.O. Box 1512
Madison, WI 53701

Rational                                Teresa Baxter   (408) 496-3765
3320 Scott Blvd.
Santa Clara, CA 95054-3197

Rockwell International                  Sally Olsen     (319) 395-1729
Mail Station 124-211
400 Collins Rd. NE
Cedar Rapids, IA 52498

SD-SCICON plc                        Moss Mossakowski   (617) 273-3030
(U.S. Software Products Group, Inc.)
8 New England Executive Park
Burlington, MA 01803

Siemens Nixdorf                        Klaus Engelke    +49 89 636 82549
 Informationssysteme AG
PSW SW 33
Otto-Hahn-Ring 6
W-8000 Muenchen 83,
Germany

Silicon Graphics                    Michelle Chambers   (415) 960-1980
2011 N. Shoreline Blvd.
P.O. Box 7311
Mountain View, CA 94039-7311

SKY Computers, Inc.                     Ted Van Allen   (410) 740-5675
10480 Little Patuxent Parkway
Suite 500
Columbia, MD 21044

Stratus Computer, Inc.                  Lisa Ludwig    (508) 460-2695
55 Fairbanks Blvd.
Marlboro, MA 01752-1298

Sun Microsystems, Inc.                  David Spenhoff  (415) 336-5672
2550 Garcia Ave.
MS: MTV12-03
Mountain View, CA 94043-1100

Tartan, Inc.                            Susan Englert   (412) 856-3600
300 Oxford Drive
Pittsburgh, PA 15146

Texas Instruments                       Dave Struble    (214) 575-5346
6500 Chase Oaks Blvd.
P.O. Box 869305
Plano, TX 75086

TLD Systems, Inc.                    Mr. Terry Dunbar   (310) 542-5433
3625 Del Amo Blvd., Suite 100
Torrance, CA 90503

U.S. Air Force                      LtCol Joseph Hall   (513) 255-5577
Common Avionics Directorate
Wright-Patterson AFB, OH 45433

U.S. NAVY                               Bill Wilder     (703) 602-8204
U.S. Navy NAVSEA PMS-412
Washington, DC 20362-5101

UNISYS Corp.                            Jack Dobratz    (215) 542-6209
Unisys U.S. Information System
P.O. Box 500, MS: B360
Blue Bell, PA 19424

Verdix                                  Tim Ruhe        (703) 318-5800
205 Van Buren St., 4th Floor
Herndon, VA 22070

Wang Laboratories                       Fred Rozakis    (508) 967-7002
One Industrial Ave.
MS: 019-890
Lowell, MA 01851

York Software Engineering Ltd        Prof. I.C. Wand    +44 904 432725
University of York
York, YO1 5DD,
England
****************************************************************************
****************************************************************************

AN INTRODUCTION TO THE VALIDATION PROCESS

An "Ada implementation" is an Ada compiler, linker, and any other necessary
software with both its host computer (on which the compiler is run) and the
target computer (on which the generated code will be run).

The purpose of validation is to encourage conformity of Ada implementations
with the standard -- the Ada Programming Language, ANSI/MIL-STD-1815A
(1983).  However, users are cautioned that the yardstick of conformity
testing is the collection of test programs contained in the Ada Compiler
Validation Capability (ACVC).  Thus, compliance is measured only within the
limits of these tests.

Also, characteristics not specified by the standard, such as performance or
suitability for a particular application, are outside the scope of Ada
validation.

The validation process is carried out by the Ada certification body; this
consists of: the Ada Joint Program Office (AJPO) for overall direction; the
Ada Validation Organization (AVO) and the ACVC Maintenance Organization
(AMO) for technical support; and the Ada Validation Facilities (AVFs) for
performing validations.

THE Ada COMPILER VALIDATION CAPABILITY (ACVC):

As indicated above, the Ada Compiler Validation Capability (ACVC) is a
suite of programs (and support software) that are designed to test whether
an Ada implementation complies with the Ada programming language.

Each new version of the ACVC test suite is available for at least six
months before it is used for validation.  The final ACVC version for Ada83
is version 1.11.  Version 1.11 will be used for validation of Ada 83
compilers until one year following the ANSI adoption of Ada9X.
Certificates for the compilers tested under ACVC version 1.11 will expire
two years following ANSI adoption of Ada9X.

There are two ways of obtaining validated status: validation by AVF
testing; and for "derived" compilers only, validation by registration.

VALIDATION BY AVF TESTING:

In order to obtain a validation certificate, there are six steps that must
be completed by a customer and the Ada certification body.  These steps
are:

(1) A formal validation agreement between the customer and an AVF -- this
is required in order to obtain validation services.

(2) Prevalidation -- this consists of customer testing, submission of
results to the AVF, and resolution of any test issues that may arise (for
instance, a missing or incomplete result to a test).

(3) Validation testing performed by an AVF at the customer's site.

(4) A Declaration of Conformance -- this is completed and signed by the
customer not later than at validation testing.  A validation certificate
will not be issued until a Declaration of Conformance has been completed.

(5) A Validation Summary Report (VSR) -- this is prepared by the AVF to
document the validation by testing.

(6) A Validation Certificate -- this is issued by authority of the AJPO for
a successfully tested Ada implementation.

For each certificate issued, the AJPO makes an entry in the list of
validated Ada compilers.  This entry will be removed when the certificate
expires.

VALIDATION BY REGISTRATION:

An Ada implementation may be "derived" from one that has been validated by
testing (a base implementation).  The implementor of a derived compiler may
request that it be validated by registration, rather than by AVF testing.

For an implementation to be derived, four conditions must be true:

(1) the Ada compiler was obtained from the Ada compiler of the base
implementation by changes that are within the scope of accepted software
maintenance practices;

(2) the target machine of the base and derived Ada implementation have
compatible instruction sets and operating system or kernel;

(3) the Ada compiler has been tested with the customized test suite that
was used to validate the base implementation; and

(4) the "result profile" for the Ada implementation is either the same as
the base implementation or, if there are differences, these differences are
justified as being within the scope of accepted software maintenance
practices.

Registration requests may be sent directly to the AVO.  A registration
request must comply with the format and content of the sample given in
Appendix D of the Validation Procedures (version 3.1).

A derived compiler that is accepted by the AVO will be forwarded to the
AJPO to be added to the public list of validated Ada compilers.

FOR FURTHER INFORMATION:

For further information, see "Ada Compiler Validation Procedures, Version
3.1, August 1992".  An electronic copy of the document is available on the
Ada Information Clearinghouse Bulletin Board as file VAL-PROC.HLP.

Also, copies may be purchased through the Defense Technical Information
Center (DTIC) and the National Technical Information Service (NTIS).  The
accession number is AD A257 705.

The National Technical Information Service (NTIS) sells documents to the
public.  The Defense Technical Information Center (DTIC) distributes
documents only to Military, government, or defense contractors who are
registered users of DTIC.

National Technical Information Service (NTIS)
U.S. Department of Commerce
5285 Port Royal Road
Springfield, Virginia 22161
703/487-4650

Defense Technical Information Center (DTIC)
Cameron Station
Alexandria, Virginia 22314
703/274-7633; AV 284-7633

Ada VALIDATION FACILITY MANAGERS:

Dr. William Dashiell
National Institute of Standards and Technology
Computer Systems Lab
Software Standards Validation Group
Building 255, Room A266
Gaithersburg, MD 20899
Phone:  301/975-2490
Fax:    301/590-0932, 301/948-1784
E-mail: nist-avf@ajpo.sei.cmu.edu, dashiell@ecf.ncsl.nist.gov

Mr. Dale Lange
Ada Validation Facility
Language Control Facility
645 C-CSG/SCSL
Area B, Building 676
Wright-Patterson Air Force Base
Ohio 45433-6503
Phone:  513/255-4472
Fax:    513/255-4585
E-mail: langed@ss1.sews.wpafb.af.mil

Mr. Jon Leigh
Mr. Dave Bamber
The National Computing Centre, Ltd.
Oxford Road
Manchester
England, M1 7ED
Phone:  +44 61 228 6333
Fax:    +44 61 236 9877
E-mail: ncc-avf@ncc.co.uk, uk-avf@ajpo.sei.cmu.edu

Mr. Alphonse Philippe
AFNOR
Tour Europe, Cedex 7
F-92049 Paris la Defence
France
Phone:  +33 1 42 91 5960
E-mail: afnor@ajpo.sei.cmu.edu

Mr. Michael Tonndorf
IABG, Dept ITE
Einsteinstrasse 20
D-85521 Ottobrunn
Germany
Phone:  +49 89 6088 2477
Fax:    +49 89 6088 3418
E-mail: tonndorf@ite.iabg.de, tonndorf@ajpo.sei.cmu.edu


Ada VALIDATION ORGANIZATION:

Ada Validation Organization
Attn: Ms. Audrey A. Hook
Institute for Defense Analyses
1801 North Beauregard Street
Alexandria, VA 22311
Phone:  703/845-6639
Fax:    703/845-6848
E-mail: hook@ida.org

*******************************************************************************
*******************************************************************************



                                **********************


Ada Information Clearinghouse (AdaIC)
P.O. Box 46593
Washington, DC  20050-6593
703/685-1477, 800/AdaIC-11, FAX 703/685-7019
adainfo@ajpo.sei.cmu.edu; CompuServe 70312,3303

The AdaIC is sponsored by the Ada Joint Program Office and
operated by IIT Research Institute.
