@00@@CLS@@NOPAUSE@@0E@
         PDOOR wcMAIL PreScan Selection Door v1.0 Command Help File@0F@
         ----------------------------------------------------------

   @0E@[@0F@S@0E@]@0A@et pre-scan and return to BBS@0F@

   This command will set up the process to prescan your .QWK mail packet
   and then return you to the BBS. The prescan process will be run one 
   time only after you logoff. 

   @0E@[@0F@L@0E@]@0A@ogoff now and run pre-scan@0F@

   This command will set up the process to prescan your .QWK mail packet
   and then immediately log you off the BBS. Prescan will be run once only.

   @0E@[@0F@A@0E@]@0A@dd name to prescan process@0F@

   This command will add your name to the regular prescan mail process that
   will be run after our scheduled mail imports. If you call in via script 
   regularly for mail this is a good choice.

@PAUSE@@CLS@
   @0E@[@0F@R@0E@]@0A@emove name from prescan process@0F@

   This command will remove your name from the regular prescan process if
   it is already there. If you are not already on the list it does nothing. 

   @0E@[@0F@H@0E@]@0A@elp with the above commands@0F@

   This command displays the file you are reading now. If the file is not
   available the command will display:@0D@

   PDOOR.HLP file not found...

   @0E@[@0F@Q@0E@]@0A@uit back to the BBS@0F@

   This command will exit the PDOOR wcMAIL PreScan Door and return you to 
   the BBS.

   Entering any other command will display:@0D@

   Invalid choice, please try again...@0F@

@PAUSE@