|01      ∙.■▀▄▀▌█|17|15 Listing of ReneWave's Area Selection Commands |16|01█▐▀▄▀■.∙
|00
|03     Command  Description
|08     ───────────────────────────────────────────────────────────────────
|15     ##      |07 TOGGLES area ##.
|15     ##-##   |07 TOGGLES a range of area numbers, between ## and ##.
|15     +##-##  |07 Sets a range of area numbers, between ## and ## to ON.  
|15     -##-##  |07 Sets a range of numbers, between ## and ## to OFF.  
|15     *       |07 TOGGLES ALL areas available to you.
|15     +*      |07 Sets ALL areas available to you ON.
|15     -*      |07 Sets ALL areas available to you OFF.
|15     [, ]    |07 Move to the previous or next page.
|15     Q       |07 Quit the areas selection.
|08     ───────────────────────────────────────────────────────────────────
|00
|07     Note: If an area is FORCED read (indicated by a ! beside the area), 
           the area will be ignored.

     Multiple commands can be used on one line, if they are separated by
     spaces.  The length of your commandline can not exceed 78 characters
     in length.  Here are a few examples:
%PA      53                   = Toggles area 53.
      1 7 23 22 15         = Toggles areas 1, 7, 23, 22 and 15.
      35-77 25             = Toggles areas 25, and 35-77.
      +3-10 -11-13 20-28   = Sets areas 3-10 ON, areas 11-13 OFF, and
                             toggles areas 20-28. 
      -* 1 7 9-17 25 27-28 = Switches ALL areas OFF, then turns on areas
                             1, 7, 9-17, 25, and 27-28.

%PA
