

  To edit a canal comment (c), or the REMARKS file (C), you are proposed a
  rather simplified word-processor (only 5 Ko memory needed):


   - There is no copy/paste function,
   - F1 function key displays this HELP page,
   - HIGH, LOW, RIGHT, LEFT, HOME and END keys move the cursor,
   - insertion mode is the only available mode: when typing a character,
     the following text on the same line moves to the right,
   - DEL erases the character on the right of cursor, and moves to the left
     the following text on the same line.
     If the cursor is at the end of a line, DEL recalls the beginning of the
     following line.
   - ENTER goes to next line from cursor position. To insert a blank line,
     locate cursor at the beginning of line and hit ENTER.
   - Ctrl y erase a line,
   - ESC quits the word-processor.

 You may also edit a canal comment outside a RADIOSIM session, with your
 own word-processor: follow User's guide indications.



 REMARKS.!!! file
 ---------------
 - this file includes 10 independent screen pages instead of one. Pages can
   be scrolled using PgUp and PgDn keys.
   Write here any remark of general type. You will find them again at the
   next session, whatever canal is used.
 - this file is an ASCII file, named REMARKS.!!!, saved in the STOCK
   directory. Every line include 80 characters, using right padding blanks.
   If you edit it outside RADIOSIM, do not modify it in any way: it would
   become unusable within a RADIOSIM session.
 - you can re-initiate it (not erase it) using the F3 key. Then, a file named
   REMARKS.TXT will be created, image of the former REMARKS.!!!.
   REMARKS.TXT can be edited without any restriction.
