Introduction
VALENTINE CLOCK

Copyright 1995 Jesse I. Deutsch

Valentine clock is a geometrical clock in the shape of a heart. A single arrow points to the time. Due to the unusual shape, the figure is surrounded by small indicators to help estimate the time.

The arrow's position is updated every 5 minutes. An internal timer with period of 1.5 seconds is invoked. This is to limit the footprint of the program on the operating system while keeping the arrow time indicator reasonably accurate.

P.S.  The Reset item under Help on the menu bar will clear and repaint the window.

AUTHOR

REGISTRATION


Author

Jesse Deutsch
the doss boss
PO Box 1626
Sterling, CO 80751


Registration

You are free to use this program for 30 days. If you wish to use it longer than 30 days, registration is $15. This provides you with a copy of the program without the reminder screen. You will be informed of updates and improvements, including a possible GIFT EDITION.

 Please send check or money order in US funds payable on a US bank to:

Jesse Deutsch
the doss boss
PO Box 1626
Sterling, CO 80751