
  This program will require your name to play when in LOCAL mode.
  To call up this program, you need to have a .CFG file present in
  in the current directory.

  Modify the supplied TRION.CFG to your needs.  It is commented
  and contains information not supplied here.

  To invoke this program in local mode, simply type TRION or
  TRION LOCAL at the DOS prompt.  Or to get this help type
  TRION ? at the DOS prompt.

  To set this program up as a door, modify the supplied TRION.CFG
  and use the command TRION TRION.CFG at the DOS prompt.
  You can change the name of the .CFG file and include drive and
  pathname.

  If an error occurs during program execution a file named TRION.ERR
  or TRION2.ERR will be created in the current directory and specify 
  the error with a brief description.  Type this file if an error occurs 
  to see what you may have to change to fix it.  If the error cannot be 
  fixed, let me know exactly what the file contains.


