Copyright: MC Software® 1995


Contents
Contents-MCS Clock V2.0

Introduction

What is MCS Clock

Procedures

Options Menu


What is MCS Clock

MCS Clock is a time/date visual display clock that is diplayed through Windows. It is designed to load when Windows is loaded by being placed in the Startup program group in Windows program manager. If you click on the date area of MCS Clock, the Options menu will be displayed and if you click on the time area of MCS Clock, this will load Windows file manager.

To register MCS Clock send $5.00 to...

MC Software
P.O. Box 562
Morrison, CO  80465-0562

Options Menu


Options Menu

This is the dialog box you will view if you click the date area of MCS Clock to load the Options menu. By clicking the mouse on the top tabs you will select the option you wish to change. The System Info tab is just what it says. It will display your system information.

This is the dialog box displayed if you click the Colors tab. You can select any of the colors for the clock background color.

This is the dialog box displayed if you click the Location tab. You can select up to four locations for the clock to be displayed. You can also select whether the clock stays on top of other applications.

This is the dialog box displayed if you click the Time tab. You can change the system time if need be. Enter the time in the entry box and click the Set Time button.

This is the dialog box displayed if you click the Date tab. You can change the system date if need be. Enter the date in the entry box and click the Set Date button.


Index


Index