OmniFSPd Version 1.0

OmniFSPd is a high performance 32 bit FSP server designed specifically for the Win32 platform.  OmniFSPd requires a 486 or higher system with full Win32 support (including Windows 95).  This software has not been tested under Win32s.

Note:	OmniFSPd uses floating point calculations and will detect and compensate for Pentium processors with the floating point division flaw.

Installing OmniFSPd

There is no installation program for OmniFSPd yet.  You must:

1)	Copy all files to a directory.

2)	Move the OFSPD.INI file to your Windows directory.

3)	Move CTL3D32.DLL to your System directory.  This file is the Microsoft 3D Control library.  Until I can get a hold of the newer Windows 95 interface libraries, this file will be required.  If you already have a copy of this, remove it from the OmniFSPd directory.  The controls will not work properly with this file in the program directory.

Troubleshooting

Why isnt anything showing up when I try using a client?

Make sure the path in the .INI file is set correctly.  If that still doesnt work, make sure the path ends with a back slash \.

I get an error saying that CTL3D32.DLL is installed incorrectly.

The control library will complain if it finds extra copies of this file.  If a copy of this file already exists in your WINDOWS/SYSTEM directory, delete the one in the program (OmniFSPd) directory.  Otherwise, move the DLL to your system directory.

Contact the Author

Questions, comments and suggestions are welcome.

Email them to glau@husc.harvard.edu