╓────────────────────┬──────────────────────────────┬───────────────────────╖║  BYWHEN.EXE v1.11  │ copr. 1994-96 William Burlew │  All Rights Reserved  ║╟────────────────────┴──────────────────────────────┴───────────────────────╢║  BYWHEN  [d:\]filename.ext [options] /thh:mm:ss [options]                 ║╟───────────────────────────────────────────────────────────────────────────╢║  d:\              program's valid path                                    ║║  filename.ext     program to execute.  extension must be given.           ║║  /p{a1,a2,a3...}  arguments to pass to your executable program.           ║║  /d{mm/dd/yy[yy]} date to execute on.  assumes current date if not given. ║║  /t{hh:mm:ss}     time to execute program on. (24h or use a|p[m])         ║║  /m{owner}        name for blinking warning message. (max 20 characters)  ║║  /w               default warning message.                                ║║  /b               blanks the screen leaving only the DOS prompt           ║║  /s               continuously scrolls the status window.                 ║║  /k               log keys pressed to KEY$OBJ.DAT (current sub-dir)       ║║  /e{nnnn}         resets environment size.  defaults to 512 bytes.        ║╟───────────────────────────────────────────────────────────────────────────╢║  If /p you may use commas to separate the arguments: /parg1,arg2,arg3...  ║║    if your args require a comma, pass two together: /parg1,,arg2,arg3...  ║║  If /b && /s options are specified together, it is illegal.               ║║  If /b specified it disables the /m,/s, and /w option(s).                 ║║  International dates and times are supported.                             ║╙───────────────────────────────────────────────────────────────────────────╜╓────────────────────┬──────────────────────────────┬───────────────────────╖║  BYWHEN.EXE v1.11  │ copr. 1994-96 William Burlew │  All Rights Reserved  ║╟────────────────────┴──────────────────────────────┴───────────────────────╢║  BYWHEN  [d:\]filename.ext [options] /thh:mm:ss [options]                 ║╟───────────────────────────────────────────────────────────────────────────╢║  Examples of command line:                                                ║║                                                                           ║║  bywhen  c:\tp\bin\tpc.exe  /p-b,-gd,-$d+r+x+,compile.pas /t15:30:00      ║║                                                                           ║║ - executes TPC.EXE to compile COMPILE.PAS with options "-b -gd -$d+r+x+"  ║║   with execution time at 15:30:00 on the current day.                     ║║                                                                           ║║  bywhen  make  /p-ftest.mak /t00:01a /d9/01/95 /w /s                      ║║                                                                           ║║ - executes MAKE to make TEST.MAK at 24:01:00 on 09/01/1995 with the       ║║   status box scrolling and the default warning message displayed.         ║║                                                                           ║║  bywhen file.bat /t7:00a /e1024                                           ║║                                                                           ║║ - execute FILE.BAT at 7am, current date and reset environment size to     ║║   1024 bytes.  BYWHEN will search the DOS path for FILE.BAT.              ║║                                                                           ║╙───────────────────────────────────────────────────────────────────────────╜╓────────────────────┬──────────────────────────────┬───────────────────────╖║  BYWHEN.EXE v1.11  │ copr. 1994-96 William Burlew │  All Rights Reserved  ║╟────────────────────┴──────────────────────────────┴───────────────────────╢║  BYWHEN  [/@[d:\]filename.ini]                                            ║╟───────────────────────────────────────────────────────────────────────────╢║  Examples using BYWHEN INI files:                                         ║║                                                                           ║║  bywhen <enter>                                                           ║║                                                                           ║║ - loads the default INI file, BYWHEN.INI.  BYWHEN.INI must reside in      ║║   the same sub-dir as BYWHEN.EXE.                                         ║║                                                                           ║║  bywhen /@filename.ini                                                    ║║                                                                           ║║ - loads a different INI file other than the default. you must specify     ║║   the path if it does not reside in the same sub-dir as BYWHEN.EXE.       ║║                                                                           ║║   See BYWHEN.INI for an example.                                          ║╟───────────────────────────────────────────────────────────────────────────╢║   The files BYWHEN.HLP, TYPEHLP.EXE and BYWHEN.INI must reside in the     ║║   same sub-dir, as BYWHEN.EXE.                                            ║║   The key combination <CTRL-END> terminates BYWHEN.                       ║╙───────────────────────────────────────────────────────────────────────────╜