[?7h[40m[2J[19C[0;1;34;44m                                       [40m
[19C[44m ┌───────────────────────────────────[0;30;44m┐ [40m
[19C[44m [1;34m│         [37mQuote System Help         [0;30;44m│ [40m
[19C[44m [1;34m└[0;30;44m───────────────────────────────────┘ [40m
[19C[44m                                       [40m


[1;37mBelow are instructions for manipulating text in SyncEdit's quoting system.

First, the screen is divided into two major sections.  The top "window"
contains the text from the message you're writing.  The bottom window
contains the text from the message you're quoting from.  In the message
window (top window), a blinking white '[5m>[0;1m' marks where the next quoted line
will go.  In the quote window (bottom window), the "[33m->[37m" to the far left of
the screen is a marker that shows which line of text to quote.

To "quote" one line of text from the quote window into your message, simply
move the marker (or the "[33m->[37m")  using the arrow or page up/down ([36mCTRL+Z/X[37m)
keys to the desired line to quote and press [33m<[36mENTER[33m>[37m.  When you're done
quoting, press '[36mQ[37m' to bring you back to the main message editing screen.

In case of line noice, press [33m<[36mCTRL-R[33m> [37mto redraw the screen.
[0m
