This program simulates a system of damped
harmonic motion, very similar to a harmonograph.
Harmonic motion is also called sinusoidal
motion because the position of the
pen and paper can be determined by the
SINE function, with time as a parameter.

Click on "DONE" to return to the PARAMETERS
screen.
