Copyright: Copyright © 1996 Doesn't Byte Software


Bugs/History

1/15/96 --

- Written using Turbo PASCAL for Windows 3.1.

5/25/96 --

- Converted Windows95 version 2.02 to Windows 3.1 version 2.0.

Too many features to list.

8/30/96 --

- Added feature to reverse Header & Body

Special Thanks to the Beta Testers:

(can you really beta test a version 2.1?!?)

Ed Kasky

Ian Stott


Contents
ESig

Copyright © 1996 Doesn't Byte Software

All Rights Reserved

Update 1.x to 2.x

Introduction

Instructions for Use

ESig INI

Bugs/History

Updates/Contact

Register


ESig95 Ini
ESig Ini

ESig.dat has been changed to ESig.ini and placed in the directory with ESig.  The Editor supplied will edit this Ini and make a backup copy to ESig.old.  I recommend using the Editor to avoid problems.

The following changes have been done:

Removed all comments.

[Files]:

MailClient=C:\INTERNET\EUDORA\EUDORA.EXE

(Full Path to Mail Client.)

SigFile=C:\INTERNET\EUDORA\SIGNATUR.PCE

(Full path to primary signature file.)

Sig2File=

(Full path to alternate signature file.)

Time=30

(Interval to randomize signatures.)

Auto=1

(Whether to randomize signature using above time or not. Yes = 1; No = 0)

Sigs=19

(Number of signatures in [Body].)

Rev=0

(Reverse Header & Body.  Yes =1; No = 0)

[Header]

(Whatever you want as a header in your signatures. Last line must be a semi-colon.)

;

[Body]

(Each body you wish to have in your signature must be placed here.  This part gets randomized.  Each body must be seperated by a semi-colon.)

;

(Here's another body..)

;

(Another...)

;

(The last line must be a semi-colon also.)

;


Instructions for Use

ESig is run to change the sig file, run the mail client, and then exit.


Introduction

ESig is the Original E-Mail Signature Manager

ESig is designed to change signature files for most Internet e-mail clients that uses an ASCII file for the signature.

ESig can be used with Eudora Lite, Eudora Pro, Netscape, Agent, News Xpress, and maybe others.

There are features that will be implemented upon the next major release.  These features will be the ESig+ settings that are seen in this help file and in the Editor.

Registered users have the following benefits:

--Free upgrades regardless of version and price increases.

--Notification of new versions before release.

--Whatever I can think of to show my thanks for supporting ESig.


Register

                         ESig 2.1 Order Form

     Name:	______________________________

 Address:	______________________________

 Address:	______________________________

       City:	________________  State:  _______

Zip Code:	_________  Country:  ____________

    E-Mail:	______________________________

COST	QTY	PRICE

ESig 	$7.00 ea.	___	$______

==================================================================

Please complete the following questions:

1) What made you register ESig?  _________________________

2) Where did you receive ESig?  ___________________________

3) How easy was ESig to setup?  __________________________

4) Is the registration price:  Too Low   About Right  Too High

5) What E-Mail Client are you using ESig with?  ______________

==================================================================

Bug Reports/Suggestion:

==================================================================

Mail completed form along with a check/money order in US Funds to:

Check/Money order  payable to: Jerry Jordan

Mail to:

Doesn't Byte Software

5228 Sage St.

Mtn. Home, ID  83648-1160

USA


Update 1.x to 2.0
Update 1.x to 2.x

The file ESIG1x_20.EXE will update ESig.dat from version 1.x to version 2.x.  ESIG1x_20.EXE will rename your current ESig.dat can be deleted or saved after the conversion.  ESig.dat has become ESig.ini.  If you're updating from 1.2 to 2.x then the Time Interval for the Auto Randomize feature will be set to 30.  This was done so any older version of ESig.dat will be updated with this one program.

This must be done before attempting to run ESig+ 2.x!

The following changes are made:

[Files]

MailClient=C:\INTERNET\EUDORA\EUDORA.EXE

SigFile=C:\INTERNET\EUDORA\SIGNATUR.PCE

Time=30

Auto=1

Sigs=19

[Header]

(Your header lines will be placed here.  A semi-colon must be the last line in this section.)

;

[Body]

;

(Your bodies will be placed here.  Each body must be seperated by a semi-colon and the last line must be a semi-colon)

;

(Here's another body...)

;

These changes add unlimited lines to both the header and the bodies and whether the Auto feature is enabled.

You can safely delete ESIG1x_20.EXE to save hard drive space after the conversion.

See ESig Ini for more information of ESig.ini configuration.


Updates/Contact

Future Updates:

1)  Ability to check mail??  (suggested)

2)  Total rewrite to improve performance.

3)  Whatever else people suggest.

Future updates can be found at:

WWW - http://netnow.micron.net/~jjordan/dbs/

Find tech support at:

WWW - http://netnow.micron.net/~jjordan/dbs/

E-Mail - dbs@micron.net