' Please read instructions at bottom of page
'
00 5
Security Maintenance allows you to add,change and
delete the customer/product security information. 
Security levels may be associated with both products
and customers. The primary usage is for the
computation of pricing for an individual customer.
'
01 6
Security Code:
A unique code, assigned by you, which will be used
for customers and products. Customers with security
less than product security will not be able to see
or access the product. It is best to setup codes
based upon groups of users.
'
03 3
Min Disc Code :
This is the minimum discount, from the discount db
that a user with this security could receive.
'
04 3
Add. Disc Code :
This is an additional discount, from the discount db
that a user with this security could receive.
'
05 6
Duration:
This is the duration for this security level if you
are running with a membership system. This number is
used to determine the expiry date for the users
membership. This number is in days so for a 1 year
duration, input 365.
'
06 5
Time per Day:
This is the maximum number of minutes per day that the
user is allowed on your system. This is accumulative
across a 24 hour period, no matter how many times in
one day the user logs in.
'
07 7
Max Sessions:
If you want to restrict the number of times a user can
log into your system in one 24 hour period, input that
number here. Even if all of his/her time per day is not
used up, if this number is reached, they will not be
allowed back in. If this value is set to 0, then the
user may enter the system an unlimited number of times.
'
'
'-----------------------------------------------------------------------------
'              VisuaLink Database System - Security Database Help File
'
'       Author:         Lorne Wilson - Perigee Software Corporation
'       Date:           April 9, 1992
'       Version:        1.0
'       Copyright:      (C) 1992 - Perigee Software Corporation
'                               All Rights Reserved
'
'This module is a integral part of the VisuaLink Database System and performs
'the functions of:
'       - GETINFO routine reads this file based upon the KeyWord and loads
'         the MArray$() array which is then used by the SYSHELP modeule to
'         display the help information.
'                
'       Text is to maintained at a width of 56 Characters Max.
'       Text is limited to 15 lines.
'
'       First Two Digits are the KeyWord Required for Access
'       Second set of Digits are the number of lines in the help text
'
'
'-----------------------------------------------------------------------------

