' Please read instructions at bottom of page
'
00 9
Prompt Maintenance allows you to change user and sysop 
prompt records. The prompts are the words being shown 
on the display screens that make up this system. 
Some prompts have embedded macros which are identified
with a tilde ~ character. Should you change any prompt
that has this character, ensure that the tilde stays.
An example of a prompt change would be to change the
word Province to State. Locate each prompt with 
Province in it and rekey it with the word State.
'
01 6
Language Code:
A three character language identifier which matches
back to the SYSPROM.??? prompt text files. The ???
or extension of the file is what is input here. This
is automatically done when you load a new language
file.
'
02 15
Database ID:
Each database has its own identifier for which
prompts are associated with its fields:
D02 - Category DB
D03 - Product DB
D04 - Order Header DB
D05 - Order Detail DB
D06 - Extra Files DB
D07 - Customer DB
D08 - Shipping DB
D09 - Security DB
D10 - Disc/Terms DB
D11 - Supplier DB
D12 - Taxation DB
D13 - Prompt DB
'
03 3
Prompt ID:
A unique, incremental number for each prompt within
a database.
'
04 6
Text:
This is the literal prompt that you would see on the
screen for the paricular data entry field. It is
recommended that you do not exceed the length of the
existing prompt if you are going to modify these in
any way. This is due to screen positioning.
'
'
'-----------------------------------------------------------------------------
'              VisuaLink Database System - Prompt Database Help File
'
'       Author:         Lorne Wilson - Perigee Software Corporation
'       Date:           April 9, 1992
'       Version:        1.0
'       Copyright:      (C) 1992 - Perigee Software Corporation
'                               All Rights Reserved
'
'This module is a integral part of the VisuaLink Database System and performs
'the functions of:
'       - GETINFO routine reads this file based upon the KeyWord and loads
'         the MArray$() array which is then used by the SYSHELP modeule to
'         display the help information.
'                
'       Text is to maintained at a width of 56 Characters Max.
'       Text is limited to 15 lines.
'
'       First Two Digits are the KeyWord Required for Access
'       Second set of Digits are the number of lines in the help text
'
'
'-----------------------------------------------------------------------------

