;-----------------------------------------------------------------------;
;									;
;	LOGIMENU File definition for EXTYPE				;
;	Copyright (C) 1987 LOGITECH, Inc.				;
;									;
;-----------------------------------------------------------------------;
BEGIN LeftB, MidB, RightB
;
;NOTE: with 2-button mouse, "MidB" means both buttons,
;

; This will call the TIME command without changing the time
LeftB:	TYPE "TIME", ENTER, ENTER

; This will call the DATE command without changing the date
MidB:	TYPE "DATE", ENTER, ENTER

; The VER DOS command gives you the DOS version number
RightB:	TYPE "VER", ENTER
