0a122d0e33304000000000000000000000000000          REPORT OPTIONS MENU
   This menu does the preliminary set up
   for your reports. The selections are:
                PRINT
   This will present you with the
   destination screen. The destination
   screen will allow you to route your
   report either to the screen, printer
   or to disk.
         CHECK PAPER ALIGNMENT
   This selection will tell you the
   default column size and ask if you
   want to run a test for alignment.
          SELECT ALTERNATE KEY
   As with all the the displays in the
   coin manager this will allow you to
   select an alternate key value to
   sort your report on. It is identical
   to the on-line alternate key select-
   ion.
           RANGE SELECTION
   This is the option that can refine
   your reports by the selection of a
   key and further selecting a dynamic
   range of values within that key.
   For example: By selecting RANGE,
   then selecting STATUS from the key
   screen afterwards. You can produce
   a want list by specifying "W" as
   the FROM and TO range.
         "ESC" TO CONTINUE
0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
0f1a1d0733301000000000000000000000000000         OUTPUT
   You can specify the
   destination of your
   report, on this menu.
    "ESC" TO CONTINUE
