`MW Main Help
 |A# (Adapter Number)
  What network adapter the node is connected to.  On a single adapter
  system this number will be '0'.
 |NAME (Node Name)
  The name typed when LANCHECK was started.  The node name is case
  sensitive, so both joe and JOE could be node names.
 |NODE NUMBER
  The node number assigned to an adapter.  Every node should have a unique
  node number.
 |MINUTES RUNNING
  How many minutes a node has been active.
 |STATUS
  Tells you if a node is active, inactive or local.  A local node is the
  node associated with your computer.
 |ERROR INDEX
  What percentage of good transmissions and receives are errors.  It is
  calculated by adding the CRC errors, Alignment errors and bad
  transmissions then dividing this number by the successful transmissions
  and receives.

  This percentage is only a general indicator of the state of your node.
  It should only be compared against other nodes using the same hardware
  and software.

  A more complete status report can be obtained by highlighting a node and
  pressing return or by pressing the INSert key and typing the name of the
  node you want a status report on.
`SH Status Help
 The name of the node you are getting the status report from is being
 displayed at the top of the window.

 |Adapter Number
  The network adapter the node is connected to.  On a single adapter system
  this number will be '0'.
 |Node Number
  The unique node number assigned to the node.
 |Software Version
  The version number of the NETBIOS software a node is running.

                    |TRAFFIC AND ERROR STATISTICS

 |Minutes Running
  How many minutes a node has been active.
 |CRC Errors
  A hardware generated error associated with corruption of data as it
  passes through the network.
 |Alignment Errors
  A hardware generated error associated with misalignment of data as it is
  received.
 |Collisions
  Collisions result when two or more adapters attempt to access the network
  simultaneously.
 |Bad Transmissions
  The number of unsuccessful transmissions.
 |Good Transmissions
  The number of successful transmissions.
 |Good Receives
  The number of successful receives.
 |Retransmissions
  Number of times a retransmission was made due to an error.
 |Resource Exhaust
  Number of times a receive could not be made because there were no receive
  buffers available.

                        |ADAPTER RESOURCE STATISTICS

 |NCBs Available
  How many Network Control Blocks (NCBs) are available.
 |NCBs Allocated
  Maximum number of NCBs supported by the adapter as configured by the
  Reset command.
 |Max NCBs Possible
  Maximum number of NCBs the adapter could support.
 |Active Sessions
  Number of active sessions.
 |Sessions Allocated
  Maximum number of sessions supported by the adapter as configured by the
  Reset command.
 |Sessions Possible
  Maximum number of sessions the adapter can support.
 |Max Packet Size
  Maximum size of a session data packet.
 |Number of Names
  How many names are present on the local name table.
`AW Select Adapter Help
 If you have multiple adapters installed on your system, you will need to
 specify which adapter to use to find the requested username.
`NS Enter the Node Name Help
 Enter the node name of the adapter you want to see an adapter status report
 on.

 NETBIOS is case sensitive so you MUST enter the node name exactly as it
 appears in the main window.  You can request an adapter status of any node
 running NETBIOS if you know it's node name.  Because you cannot enter
 ASCII zeros you will be unable to access some nodes.
`CE Critical Error Help
 |Retry the Network, Disk or Device operation
  Will attempt the operation again.  First, check if a floppy door is open
  or if some other minor problem caused the error.  If so, correct the
  problem and select this option.
~01 |Fail the Network, Disk or Device operation
  Will cancel the operation in progress and return to the last window.  You
  should then correct any problems or type ESC to exit the window.
~02 |Ignore the error, continue with program
  The program will continue as though nothing happened.  NOTE that the
  operation will NOT be properly completed and may lead to future errors.
  Do NOT normally select this option.
~03 |Abort the program and return to DOS immediately
  Will exit the program immediately.
`ZZ THIS MUST BE THE LAST LINE IN THE HELP FILE
