
Try using keys on the CURSOR KEYPAD:

              Esc(ape)

              Home      PgUp

                          

              End       PgDn


... to BROWSE articles, codebook, data files, instructions ...

... ALWAYS   ====>   Press <Esc> to go to next file   <====

... PRESS PgDn for more








The files you are browsing now are called by a batch (.BAT) command file.

To quit, hold down <Ctrl> and press <Break> several times in quick succession.



    ALWAYS   ====>   Press <Esc> to go to next file   <====

    BUT NOTE  ====>  you cannot return to last file  <====
             ====>   except to restart this program   <====


    NOW       ====>  Press <ESC>   for the next file, 

                     or   <Pg UP>   to review the BROWSE commands
