                    A N A L Y S I S
                    =-=-=-=-=-=-=-=

     The error that occurred on your screen is an error
created by an invalid parameter setting.  You might have
a bad disk (IN THAT CASE SEND IT BACK TO ME!).  If you
are installing from a hard drive, you may have a bad
cluster which will not allow ANALYSIS to install.  You
might have entered the wrong location for the ANALYSIS
program and related files.
 
Make sure that you have specified the correct location
for the ANALYSIS file parameters.
