                    A N A L Y S I S
                    =-=-=-=-=-=-=-=

     ANALYSIS needs a minimum of 500,000 bytes free on
the drive specified in order for it to install correctly
on the system.
 
     The program files, the data created are stored on
the drive specified.  Recommended space free is 1 million
bytes free.  Again this all depends on the length of the
usage log files that you will be analyzing.  
