     
     

     The calendar starts  with the current year, and
month found in the internal clock of the computer.  The
current day is highlighted for easy reference.  By using
the up/down, left/right arrows you can move the year, and
month.  To exit out of the calendar and return to the
main menu press the ENTER key.


Up/Down Arrow: Increase or decrease the year.


Left/Right Arrow: Increase or decrease the month
