                    A N A L Y S I S
                    =-=-=-=-=-=-=-=

     USAGE LOG FILE NOT FOUND!

     Reason  : You have not configured the communication
               program to turn on the usage log option. 
               
               ANALYSIS is configured with the wrong
               location for the usage log files.

     Solution: Check the configuration of the
               communication program and make sure that
               you have sent the usage log on by
               default. Make sure the path matches that
               of the path you have configured ANALYSIS
               with.

               Check to path location with the utility
               program and make any changes that might
               be necessary to match the path in the
               communication program.  
  
  
