

     Updating the system statistics will place all the
information found in the current usage log file into a
data base record.  All file transfer, mail transfers,
aborted transfer, and connect times are stored for later
use.  All file transfers are placed into a data base so 
you will be able to make a hard copy of them later. Once
the statistics are updated the usage log file is deleted.
 
     If you do not update the statistics the usage log
file will remain in the directory.
  
  

