     The utility main menu has a variety of options to
the user. 
 
     To select an item to work with use the arrow keys to
move the highlight bar, then press ENTER.  If using a
mouse, move the cursor to an item, press the right
button, press ENTER.

     Color Selection:    This option will allow you to
                         change the colors of ANALYSIS
                         to what you wish.

     Drive/Path Name:    This option will allow you to
                         change the location of the some
                         default path location.

     UL/DL Data Base:    This option will allow you to
                         print out the files on record
                         to a printer by date range.

                Quit:    Leave the utility program.
