


        █▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
        █  ┬─┬─────┐                                             █
        █  │ │     │                                             █
        █  │ ├─────┘ ┌┬──┐ ┬┬─┐  ┌┬──┐ ┐   ┌ ┌┬──┐ ┌┬──┐ ──┬┬──  █
        █  │ │       ││    │├─┴┐ │├─   └┐ ┌┘ │├─   ││  │   ││    █
        █  ┴─┴       └┴──┘ ┴┴──┘ └┴──┘  └─┘  └┴──┘ ┴┴  ┴   ┴┴    █
        █  The ultimate event manager for PCBoard.  Version 3.0ß █
        █                                                        █
        █                   Copyright (c)  1992                  █
        █                       David Casto                      █
        █                   All Rights Reserved                  █
        █▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█




                             ╔══════════════╗
                             ║HotKeys - Help║
                             ╚══════════════╝
   Using a HotKey will launch a menu item without pulling down the menu.
   HotKeys are listed next to each menu item on the menu.
   ╔══════════════════════ «Listing Of HotKeys» ═════════════════════╗
   ║     F1 = Menu Help                   F = File Maintenance       ║
   ║      1 = Configure PCBEvent          T = Toggle Sound           ║
   ║      2 = Configure Node Events       S = Shell to Dos           ║
   ║      3 = Configure Monthly Event     E = Text Editor            ║
   ║      4 = Reset All Nodes             V = Text Viewer            ║
   ║      5 = Reset A Node                H = HotKeys Help           ║
   ║      6 = Display Node Status         R = Registration Help      ║
   ║      7 = Verify PCBEvent.dat Files   M = Log MAX Bytes          ║
   ║      D = Debug Memory                B = Screen Burn Min        ║
   ║    ESC = Exit PCBEvent               C = Command Line Help      ║
   ║                                      O = View PCBEvent.doc      ║
   ╚═════════════════════════════════════════════════════════════════╝
<End of Help>

        PCBEvent HotKeys.hlp v3.0ß
