{C8UTIL Command C - Clock Display/Bank Time{C0

{C4CLOCK DISPLAY{C0

This command displays the current time, and how much time you have left in
your RBBS-PC session.  RBBS-PC restricts the amount of time you can stay on
the system so that other callers have a chance to use the system.

{C7TIPS:{C0
1.  A quick reminder of time left on the system is also the "xx minutes
    left" that precedes the command prompt on RBBS-PC.

{C5BANK TIME{C0

This command allows you to store unused session time for later use.
The options of B)ank are:

   {C7D){C0eposit  - take time from your current session and put it in
                 the bank for later use
   {C6W){C0ithdraw - take time out of the bank and add it to your current
                 session time 
   {C3H){C0elp     - display this file
   {C2Q){C0uit     - exit the bank (done depositing/withdrawing)

{C7TIPS:{C0
1.   Banking time is great when you need more time to get a file
     ordinarily too large.   Just call in, deposit the time, log
     off, can withdraw the time on another day.

