
     ==[ TurboKeys Toggle ]================================================

     This command toggles whether TQM will use "turbokeys," where to enter
     a command, you need only press one key.  No [ENTER] key is required
     when you have turbokeys on.

     When TQM starts up, it sets the value on this parameter to the same
     value that you have configured in the BBS.

     You currently have turbokeys {TK.

