Data Encryption Shell help file
%%
1,0:1
2,0:2
3,0:3
4,0:4
5,0:5
6,0:6
%%
.1
The Main Menu

This menu controls the flow of the program.  
The following options are available :

Encrypt
───────
Selecting this option will allow you to 
encrypt a file.

Decrypt
───────
Selecting this option will allow you to 
decrypt a file.

Setup
─────
Selecting this option will allow you to 
specify CBC or ECB encryption, and allow
you to select long or short keys.

Help [F1]
─────────
Allows you to view this help screen or 
read a blurb about this program.

To exit the program, press escape from
the Main Menu.
.2
The Enter Password Screen

Type in the password that you wish to use as the
encryption key for this file, then press [Enter]
or [Return].  The characters that you type will 
not be displayed.

Select Keep to accept the key.
Select Abort or press Escape to discard the key.
.3
The Verify Password Screen

Type in the password that you wish to use as the
encryption key for this file, then press [Enter]
or [Return].  The characters that you type will
not be displayed.

Select Keep to accept the key.
Select Abort or press Escape to discard the key.
.4
The "Are you sure?" Menu

Select Yes if you are sure, otherwise select No 
or press Escape.
.5
The Setup Screen

Position the cursor to the option you wish to
change then press the spacebar to toggle.

Select Keep to save the changes.
Select Abort or press Escape to discard the
changes.
.6
The Help Menu

About
─────
This displays a short blurb about this program and
Hurricane Software.

Get Help
────────
Brings up the top-level help screen which can also
be obtained by pressing [F1] in the main menu.
