
Current Paths Enhanced V1.00, (C)Copr. 1992, By Mark Vitt


CPE is a Shareware program - After a 30 day trial you are required either
to Register your copy or remove it from use on your system. When you
Register your copy of CPE you get the latest version and unlimited EMAIL
support. Registration is $6.00 US dollars.


      USAGE:   CPE  <Drive:> <option> NULL

    OPTIONS    C  = Set all Drives to Root Directory
               R  = Print Registration Form (Same as REGISTER)
          Drive:  = Drive Information for this drive only. (ie. D:)
               T  = Toggle Drive On or Off');
            NULL  = Do not display On/Off Toggle


Menu Selections are:

      Goto Drive ?>           = Goto this Drive and Current Directory

      Turn Drive ?> OFF/ON    = Turn this Drive ON or OFF
            or
      Undo SUBST/JOIN         = If SUBST or JOINED undo it

      Drive ?> Information    = Technical and Usage Information on Drive

      Set All Drives to Root  = Set all Physical Drives to their Root
                                Directories. (SUBST/JOINED excluded)

      About this software     = Brief information on CPE

      Exit this menu          = Return to Drive Listing




Current DiskType(s) are:

      JOINED    =  by DOS's JOIN  command
      SUBST     =  by DOS's SUBST command
      LOCAL     =  A Drive on your machine
      NETWORK   =  A Network Drive
      UNKNOWN   =  Some other type of drive
      OFF       =  Drive not available or turned off


HINTS:

    You may make only certain directories available for use on any
    LOCAL drive by using the SUBST command with CPE.
    Example: You only want your D:\SYSTEM directory to be accessed
    on your D> Drive, do the following:

            SUBST E: D:\SYSTEM
            CPE D: OFF

    Now by typing E: and pressing enter the D:\SYSTEM directory is
    available for use but no other directories or files are accessible
    on your D: Drive.



CPE MESSAGES
------------

MESSAGE:
WARNING: Turning On a Drive which is not a real Physical
Drive can cause your system to lockup if any attempt is
made to access it. If Drive ?> is not a Physical Drive
then press the Esc key. Otherwise Press Enter to Continue.

MEANING/ACTIONú If this is not a Physical Drive press the Esc key.


MESSAGE:
Drive ?> is currently not available
or
Information not available for Drive ?>

MEANING/ACTIONú This drive cannot be accessed and may not be present


MESSAGE:
Error encountered getting CDS memory addresses

MEANING/ACTIONú DOS returned an invalid address, program will abort.


MESSAGE:
DOS CDS Structure is not available in DOS Versions 2.XX

MEANING/ACTIONú CPE will only work on DOS Versions 3.00 and higher.


MESSAGE:
COMMAND.COM is reloaded from here - Unsafe to Turn Off

MEANING/ACTIONú You tried to turn Off your COMSPEC drive. Doing so
                would soon cause the error "Unable to find COMMAND.COM,
                System Halted" to appear, so CPE will not allow you to
                do this.


MESSAGE:
Disk Type not in table

MEANING/ACTIONú Your Disk returned a non-standard Media ID byte


MESSAGE:
Safe Capacity Available

MEANING/ACTIONú Your current disk usage is under the standard 75%
                usage safety margin. Older Hard disks which are using
                more than 75% of there space are considered to be at an
                increased risk of data loss.


MESSAGE:
Nearing SAFE Capacity Limit

MEANING/ACTIONú Your disk is getting close to 75% capacity. You should
                remove unneeded files.


MESSAGEú
WARNING - Exceeding Safe Capacity

MEANING/ACTIONú Your disk has exceeded the 75% capacity mark. You should
                remove unneeded files.
