
█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█                                                                             █
█  The EtherLink III adapter can be added to the Microsoft LAN Manager 2.0    █
█  or 2.1 network operating systems.                                          █
█                                                                             █
█  The EtherDisk diskette is formatted so that the NDIS drivers can be        █
█  installed using the import network driver function of the Microsoft LAN    █
█  Manager Setup utility.  Exit from the EtherDisk Menu Program.  Install     █
█  and run the Microsoft LAN Manager Setup utility.  If this is a new         █
█  installation, follow the standard procedure until the "Setup allows        █
█  loading of network drivers from other disks" screen appears.  Change       █
█  the answer to "yes" and press enter.  Setup will ask you to insert the     █
█  network driver diskette.  Place the EtherDisk diskette into the drive and  █
█  press enter.  A menu will appear with "EtherLink III ..."  To select this  █
█  driver press the space bar and then press enter.  The files are copied     █
█  to the hard disk.  Continue the installation until the menu "Network       █
█  drivers configuration" appears.  On this menu, select the EtherLink III    █
█  driver and a protocol stack, and continue with the installation.  If you   █
█  are updating an existing installation, pick the "import driver" function   █
█  from the Setup menu to copy the driver, followed by "View/Modify" to       █
█  install, and "Save" to change the configuration permanently.               █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

