
█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█                                                                             █
█  The EtherLink III adapter is not supported by the IBM OS/2 EE NOS.         █
█  The utility program on the EtherDisk diskette lets you install the         █
█  EtherLink III adapter driver to an OS/2 EE server.  Make sure that you     █
█  have selected the EtherLink II adapter as the network controller during    █
█  the OS/2 EE server installation (refer to your IBM OS/2 EE installation    █
█  manual). The CONFIG.SYS file in the root directory and the PROTOCOL.INI    █
█  file in the CMLIB directory must not be modified after installation.       █
█                                                                             █
█  The utility program on the EtherDisk diskette copies the EtherLink III     █
█  OS/2 NDIS driver to the CMLIB directory.  Next, it will copy and modify    █
█  your existing CONFIG.SYS and PROTOCOL.INI files to use the EtherLink III   █
█  driver when the system is rebooted.  If this operation is not successful,  █
█  the original CONFIG.SYS and PROTOCOL.INI files remain unchanged.  Before   █
█  the modified CONFIG.SYS and PROTOCOL.INI files are installed, the          █
█  original files are copied to the files CONFIG.OLD and PROTOCOL.OLD.        █
█                                                                             █
█  You can customize the new PROTOCOL.INI file for your specific needs.       █
█  After the installation is completed, make sure that you can boot the       █
█  system.  Modify the PROTOCOL.INI file using the editor of your choice.     █
█                                                                             █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

