




         8.8   Password                                     Page 8.8.1
         =============================================================

         This little utility lets you change the password providing
         access to the "Stewardship" menu. The default password is
         "PASSWORD".

         To change the current password:

         A. Select "Password" at the "Utilities" menu and then press
            <Enter>.

            The "Password" window will appear:

         B. Type in the current password (default: PASSWORD).

            If you typed an incorrect password you will be returned to
            the "Utilities" menu.

            If you typed in the correct password you will be prompted
            to type in the new password.

         C. Type in the new password and press <Enter>.

            You will be prompted to re-type the new password. This is
            a security precaution.

         D. Re-type the new password and press <Enter>.

            If you typed the new password differently the second time,
            then the old password will be restored.

            Only if you typed the new password both times the same
            way, will the new password be installed, and the old
            password setting will be lost.

         E. You will be returned to the "Utilities" menu.











         =============================================================
         PASSWORD                                          Page  8.8.1