ATEasy version 1.10
Copyright (c) 1991,1992 Geotest Inc.
All Rights Reserved.

                   ATEasy Driver Library                  Last Update: 2-1-92
                   =====================

GPIB Instruments:
=================
Manufacturer     Model #    Description     FileName(.INS)  DLL Files(.DLL)
------------     -------    -----------     --------------  -------------------
FLUKE            8840A      DMM             F8840A          F8840A (Virtual Pnl)
FLUKE            8842A      DMM             F8842A
FLUKE            910XA      uP Tester       F910x           (see note below)
FLUKE            9100-286H  80286H POD      F91_286H


VXI Instruments:
================
Manufacturer     Model #    Description     FileName(.INS)  DLL Files(.DLL)
------------     -------    -----------     --------------  -------------------
RACAL-DANA       1260/01    Sw Controller   R1260-01
RACAL-DANA       1260-20    40 Ch. Relay    R126020
RACAL-DANA       1260-30A   Scanner 1x1x40  R126030A
RACAL-DANA       1260-30B   Scanner 2x1x20  R126030B
RACAL-DANA       1260-30C   Scanner 4x1x10  R126030C
RACAL-DANA       1260-30D   Scanner 8x1x5   R126030D
RACAL-DANA       1260-40A   Relay Matrix    R126040A
RACAL-DANA       1260-40B   Relay Matrix    R126040B
RACAL-DANA       1260-40C   Relay Matrix    R126040C
TEK-CDS          73A-353    32 Ch. Relay    CDS-353
KINETIC SYS      V265-WXYZ  16 Ch. D/A      KSC-V265     


PC Based Instruments:
=====================
Manufacturer     Model #    Description     FileName(.INS)  DLL Files(.DLL)
------------     -------    -----------     --------------  -------------------
ADVANTECH        PCL-860    DMM             PCL-860         PCL-860
DSA              DSA-16     16 Ch. Switch   DSA-16          DSA-16
METRABYTE        PCIO-AWFG  Arbitrary Gen.  MB_AWFG
METRABYTE        PCIO-SCOPE Digital Scope   MB_SCOPE
SIGNAMETRIX      SM-1020    Arbitrary Gen.  SM-1020         SM-1020


RS-232 Instruments:
===================
Manufacturer     Model #    Description     FileName(.INS)  DLL Files(.DLL)
------------     -------    -----------     --------------  -------------------
DALE             APD-480MO  Touch Panel     DALE-480


NOTE:
-----
Additional drivers for all Fluke 910xA PODS (35+) are available upon request.