Printer Settings

This screen allows paper sizes, control codes and report
headings to be specified.

Page sizes should be in inches. If you do not have a wide
carrage printer specifiy the wide page size to be the same
as the standard page.

Top and Bottom margins are in the number of lines

                                        .....PgDn for more


The Printer reset code and the pitch control codes are the
Esc code sequences accepted by your printer.  These are
specified using the \ character followed by a three digit
number corresponding to the ASCII value of the Esc code.
eg. 'ESC A' would be given as \027\065

Note that all codes must be given.  The printer reset code
is the ESC sequence to reset the printer to its default
conditions.  NOTE:-If your printer has a default page
length different from the current paper size the ESC code
sequence to set the page length should be given at the 
start of EACH pitch control code.       ....PgDn for more

A heading, of up to three lines, to print at the top of
each page of the report can be given.  If no headings are
given the report starts on the first line after the top
margin.