Printing Options

The printing options allow the structure file contents to
be printed to a printer or file.  If you use a serial port
printer use the DOS mode command before running this
programme. The printing options are:-

    LISTINGS    The contents of the report is determined
                by the Index in use.  If the index is on
                the declared functions a report in
                declared function alpha order is produced.
                This will show the source PRG file, the
                                        .....PgDn for more

                declared function name and a list of
                functions called with the line numbers
                where they occur in the PRG file.
                When the index is by Called functions the
                report will have the same contents but the
                listing is in called function alpha order
                and will show the Declared functions where
                calls are made to a function.
                If indexed by PRG file the report is the
                same as the Declared Functions report
                except that it is in PRG file alpha order.
                                        ....PgDn for more

                After selecting the LISTINGS option a menu
                appears to select if documentation notes
                should be included in the report.
                Next the Contents option menu allows the
                selction of the report's contents.  This
                can be:-
                All Functions - Lists the complete
                                structure file
                Current PRG File-Produces report for the
                                 PRG file highlighted when
                                 report options selected
                                          ....PgDn for more

                Current Function-Report limited to the
                                 current function, declared
                                 or called depending on the
                                 current index

                Finally the option to set the output
                destination can be selected.  If the file
                option is selected the full
                drive:\directory\filename.extension must be
                given.

                                        ....PgDn for more

    REDUNDANCIES This produces a report similar to the
                Listings reports but is limited to the 
                functions which are not called by others in
                the appication.

    SETTINGS    Selecting this option will allow the
                printer to be set up for the control codes
                and paper sizes to be used in reports.  A
                separate help screen is available for this.

    QUIT        Returns to the browse window.