  ▄▄▄▄▄▄▄▄
  BET SIZE
  ▀▀▀▀▀▀▀▀

  Your bet size is measured in units.
  1 to 50 units per bet may be placed.

  After your initial bet is placed, you
  can continue to bet the same amount, by
  pressing the ENTER key when the Bet Size
  Prompt is re-displayed.
