NAME xmas windowcompat

DESCRIPTION 'test'

PROTMODE

STACKSIZE 32767

IMPORTS
VioGetCurType=vio32.Vio32GetCurType
VioSetCurType=vio32.Vio32SetCurType
VioGetCurPos=vio32.Vio32GetCurPos
VioSetCurPos=vio32.Vio32SetCurPos
VioGetMode=vio32.Vio32GetMode
VioSetMode=vio32.Vio32SetMode
VioReadCellStr=vio32.Vio32ReadCellStr
VioWrtTTY=vio32.Vio32WrtTTY
VioWrtNAttr=vio32.Vio32WrtNAttr
VioGetConfig=vio32.Vio32GetConfig
VioScrollUp=vio32.Vio32ScrollUp
VioWrtCellStr=vio32.Vio32WrtCellStr
VioWrtNCell=vio32.Vio32WrtNCell
VioWrtCharStr=vio32.Vio32WrtCharStr
Kbd32CharIn=kbd32.Kbd32CharIn
Kbd32Peek=kbd32.Kbd32Peek
Kbd32FlushBuffer=kbd32.Kbd32FlushBuffer
Kbd32GetStatus=kbd32.Kbd32GetStatus
Kbd32SetStatus=kbd32.Kbd32SetStatus
