DORINFO1.DEF
%4
%1
%2
%C
%P

%F
%L
%O
%G
%A
%M


 These are the characters that will be interpreted by ALLDOOR.EXE.
 They must be on the first two columns of each line to be interpreted.
 Case is not significant.  This program is distributed set up to read a
 DORINFO1.DEF file in the current dirtory, and convert it into an DOORINFO.DAT
 file, also in the current directory.  The first line in the file specifies
 the filename and the path of the door info file that you want to convert.

 Codes:
 %F - User's first name                 %L - User's last Name
 %P - Port settings (including baud)    %C - COM Port (i.e. COMx)
 %B - Baud rate                         %S - Port Settings (no baud)
 %M - Remaining time in minutes         %T - Remaining time in seconds
 %1 - SysOp's First name                %2 - SysOp's Last name
 %3 - SysOp's Full Name                 %4 - BBS's name
 %A - User's Access/Security Level      %O - Origin of call (City, State)
 %G - ANSI Graphics flag

