
                       SUB ATTACK - Install Information

          Thank you for evaluating Sub Attack a submarine attack
       game.  This install program will write the required con-
       figuration file NODExx.CNF.  This file contains specific
       information about your system.  The Default configuration
       filename is:  NODE01.CNF.

                   --- Multi Line BBS Installation ---

       If you have a multi line BBS you may want to make individual
       configuration files.  This is necessary if your nodes comm-
       ports are dissimilar.  In otherwords lets suppose you have a
       high speed modem on node 1 and is locked at 38400 baud,  but
       Node 2 is unlocked at 2400 baud, you would use this install
       program to write NODExx.CNF   (where xx= Node Number).  Each
       configuration file shall contain the correct locked baudrate
       information for each node.

       It is your responsibility to tell the SUB ATTACK which config
       file to use.  For example your node 2 batch file would call:


                  SA  NODE02.CNF     <use node 02 cnf file>

       If no config file is specified the default NODE01.CNF is used.
       For more details on command line statments please print out
       and read the documentation.


      ---------------------> Sample Batch File  <--------------------

           CD C:\PATH\DOOR
           SA NODE01.CNF              <NODExx.CNF  is optional if node 1>
           CD C:\BBS
           {reload BBS}

       --------------------------------------------------------------

       For further information or help please feel free to call.

       Contact:   Rick Salinas
                  Dark Side of the Moon - FIDO (1:205/72)
                  Fresno, CA  (209)-447-5515  300-14400 HST/V.32

       For latest revision FREQ filename SUBATK or call my BBS
       You can Download on the first call if you wish!


